Gain phs vs UTC time for OQ208.MULTI.1 SN 3 Rpol & Lpol IF 1 - 2

Plot file version 1 created 30-DEC-2005 12:09:43

1 JB IF 1R 40 20 0 1 JB IF 1L 100 50 0 1 JB IF 2R 150 100 50 0 1 JB IF 2L 10 0 -10 -20 -30 2 WB IF 1R 50 0 -50 -100 -150 2 WB IF 1L

Degrees

100 0 -100

2 WB IF 2R 0 -50 -100

2 WB IF 2L 0 -50 -100 3 EF IF 1R

0.010 0.005 0.000 -0.005

3 EF IF 1L

TIME (HOURS)

14 16 18 20 22 1/00 1/02 1/04 1/06 1/08 1/10 1/12 1/14 1/16 1/18 1/20 1/22 2/00 2/02 2/04

0.010 0.005 0.000 -0.005

Gain phs vs UTC time for OQ208.MULTI.1 SN 3 Rpol & Lpol IF 1 - 2

Plot file version 2 created 30-DEC-2005 12:09:43

3 EF IF 2R

0.010 0.005 0.000 -0.005

3 EF IF 2L

0.010 0.005 0.000 -0.005

4 ON IF 1R 40 20 0 4 ON IF 1L 100 0 -100

4 ON IF 2R 100 0 -100 4 ON IF 2L

Degrees

0 -10 -20 5 MC IF 1R 40 20 0 5 MC IF 1L 100 0 -100

5 MC IF 2R 150 100 50 0 5 MC IF 2L

TIME (HOURS)

14 16 18 20 22 1/00 1/02 1/04 1/06 1/08 1/10 1/12 1/14 1/16 1/18 1/20 1/22 2/00 2/02 2/04

0 -10 -20 -30

Gain phs vs UTC time for OQ208.MULTI.1 SN 3 Rpol & Lpol IF 1 - 2

Plot file version 3 created 30-DEC-2005 12:09:43

6 TR IF 1R 100 0 -100

6 TR IF 1L 100 0 -100 6 TR IF 2R 100 0 -100 6 TR IF 2L 100 0 -100 7 SH IF 1R 50 0 -50 7 SH IF 1L

Degrees

50 0 -50 7 SH IF 2R 50 0 -50 7 SH IF 2L 50 0 -50 8 UR IF 1R 50 0 -50 -100

8 UR IF 1L

TIME (HOURS)

14 16 18 20 22 1/00 1/02 1/04 1/06 1/08 1/10 1/12 1/14 1/16 1/18 1/20 1/22 2/00 2/02 2/04

100 0 -100

Gain phs vs UTC time for OQ208.MULTI.1 SN 3 Rpol & Lpol IF 1 - 2

Plot file version 4 created 30-DEC-2005 12:09:43

8 UR IF 2R 150 100 50 0 -50 8 UR IF 2L 50 0 -50 -100

9 CM IF 1R 10 0 -10 -20 9 CM IF 1L 0 -50 -100

9 CM IF 2R 150 100 50 0 9 CM IF 2L

Degrees

20 0 -20 10 NT IF 1R 0 -50 -100 -150

10 NT IF 1L 10 0 -10 10 NT IF 2R 10 0 -10 10 NT IF 2L

TIME (HOURS)

14 16 18 20 22 1/00 1/02 1/04 1/06 1/08 1/10 1/12 1/14 1/16 1/18 1/20 1/22 2/00 2/02 2/04

0 -50 -100

Gain phs vs UTC time for OQ208.MULTI.1 SN 3 Rpol & Lpol IF 1 - 2

Plot file version 5 created 30-DEC-2005 12:09:43

11 HH IF 1R 10 5 0 -5 11 HH IF 1L 100 50 0 11 HH IF 2R 150 100 50 0 11 HH IF 2L

Degrees

TIME (HOURS)

14 16 18 20 22 1/00 1/02 1/04 1/06 1/08 1/10 1/12 1/14 1/16 1/18 1/20 1/22 2/00 2/02 2/04

10 0 -10 -20 -30