Center at RA 14 07 00.39441 DEC 28 27 14.6902

CONT: OQ208 IPOL 1656.365 MHZ OQ208.IIM001.2

PLot file version 1 created 30-DEC-2005 12:02:49

Cont peak flux = 9.9277E-01 JY/BEAM Levs = 9.928E-01 * (-0.134, 0.134, 0.268, 0.536)

MilliARC SEC

MilliARC SEC

200 100 0 -100 -200

250

200

150

100

50

0

-50

-100

-150

-200

-250