Gain amp vs UTC time for J1127+5650.MULTI.1 SN 2 Rpol IF 1

Plot file version 1 created 13-SEP-2002 11:03:40

1R ON

1300 1200 1100

2R WB

1200 1180 1160 1140 1120 3R MC

1300 1200 1100

4R EB

1050 1000 950 5R JB

1050 1000 950 900 7R TR

MilliGain

TIME (HOURS)

01 02 03 04 05 06 07 08 09

1400

1200

1000

Gain amp vs UTC time for J1127+5650.MULTI.1 SN 2 Rpol IF 2

Plot file version 2 created 13-SEP-2002 11:03:44

1R ON 2.0 1.5 1.0 2R WB

1.35 1.30 1.25

3R MC 1.3 1.2 1.1 1.0 4R EB 1.05 1.00

5R JB

1.10 1.05 1.00 0.95 7R TR

Gain

TIME (HOURS)

01 02 03 04 05 06 07 08 09

3 2 1

Gain amp vs UTC time for J1127+5650.MULTI.1 SN 2 Rpol IF 3

Plot file version 3 created 13-SEP-2002 11:03:49

1R ON 1.4 1.3 1.2 1.1 2R WB

1.12 1.10 1.08 1.06 3R MC 1.3 1.2 1.1 4R EB

1.05 1.00 0.95 5R JB 1.3 1.2 1.1 1.0 7R TR

Gain

TIME (HOURS)

01 02 03 04 05 06 07 08 09

2.0 1.5 1.0

Gain amp vs UTC time for J1127+5650.MULTI.1 SN 2 Rpol IF 4

Plot file version 4 created 13-SEP-2002 11:03:53

1R ON

1400 1300 1200 1100 2R WB

1060 1040 1020 1000

3R MC

1400

1200

1000 4R EB

1050 1000 950 5R JB

MilliGain

TIME (HOURS)

01 02 03 04 05 06 07 08 09

1100 1050 1000 950

Gain amp vs UTC time for J1127+5650.MULTI.1 SN 2 Lpol IF 1

Plot file version 5 created 13-SEP-2002 11:03:57

1L ON

1100 1080 1060 1040 1020

2L WB

1150

1100

1050

3L MC

1050 1000 950 900 4L EB

1050 1000 950 5L JB

1050 1000 950 900 7L TR

MilliGain

TIME (HOURS)

01 02 03 04 05 06 07 08 09

1300 1200 1100

Gain amp vs UTC time for J1127+5650.MULTI.1 SN 2 Lpol IF 2

Plot file version 6 created 13-SEP-2002 11:04:01

1L ON

1100 1050 1000

2L WB 1300 1250 1200

3L MC

1600 1400 1200 1000

4L EB

1150 1100 1050 1000 950 5L JB

1400

1200

1000

7L TR

MilliGain

TIME (HOURS)

01 02 03 04 05 06 07 08 09

1300 1200 1100

Gain amp vs UTC time for J1127+5650.MULTI.1 SN 2 Lpol IF 3

Plot file version 7 created 13-SEP-2002 11:04:05

1L ON

1250 1200 1150 1100

2L WB

1180 1160 1140 1120 1100 1080

3L MC

1300 1200 1100 1000 900 4L EB

1020 1000 980 960 940 920 5L JB

1150 1100 1050 1000

7L TR

MilliGain

TIME (HOURS)

01 02 03 04 05 06 07 08 09

1400 1300 1200 1100

Gain amp vs UTC time for J1127+5650.MULTI.1 SN 2 Lpol IF 4

Plot file version 8 created 13-SEP-2002 11:04:09

1L ON

1.35 1.30 1.25 1.20 1.15

2L WB

1.12 1.10 1.08 1.06 1.04

3L MC

1.05 1.00 0.95 0.90

4L EB

1.00

0.95

0.90

5L JB

1.10 1.05 1.00 0.95

7L TR

Gain

TIME (HOURS)

01 02 03 04 05 06 07 08 09

6 4 2

Gain amp vs UTC time for DA193.MULTI.1 SN 2 Rpol IF 1

Plot file version 1 created 13-SEP-2002 11:10:14

1R ON

1020 1000 980 960 940 920 2R WB

1100 1080 1060 1040 1020

3R MC

1150 1100 1050 1000 950 4R EB 1040

1020

1000

5R JB 875 870 865 860 855 6R JV

MilliGain

970 960 950 940 7R TR

TIME (HOURS)

18 19 20 21 22 23 1/00 1/01 1/02

1200

1100

1000

Gain amp vs UTC time for DA193.MULTI.1 SN 2 Rpol IF 2

Plot file version 2 created 13-SEP-2002 11:10:18

1R ON

1000 980 960 940 920 2R WB

1200 1150 1100

3R MC

1100 1000 900 4R EB

1040 1020 1000

5R JB 900 895 890 885 6R JV

MilliGain

940 930 920 7R TR

TIME (HOURS)

18 19 20 21 22 23 1/00 1/01 1/02

1050 1000 950

Gain amp vs UTC time for DA193.MULTI.1 SN 2 Rpol IF 3

Plot file version 3 created 13-SEP-2002 11:10:22

1R ON

1100 1050 1000

2R WB

1020 1000 980 960 940 3R MC

1150 1100 1050 1000

4R EB

1020

1000 980 5R JB 985 980 975 970 965 6R JV

MilliGain

1040 1030 1020 1010

7R TR

TIME (HOURS)

18 19 20 21 22 23 1/00 1/01 1/02

1080 1060 1040 1020 1000

Gain amp vs UTC time for DA193.MULTI.1 SN 2 Rpol IF 4

Plot file version 4 created 13-SEP-2002 11:10:26

1R ON

1100 1050 1000

2R WB 960 940 920 3R MC

1050 1000 950 900 4R EB 980 960 940 6R JV

MilliGain

TIME (HOURS)

18 19 20 21 22 23 1/00 1/01 1/02

920 910 900 890

Gain amp vs UTC time for DA193.MULTI.1 SN 2 Lpol IF 3

Plot file version 7 created 13-SEP-2002 11:10:39

1L ON

1080 1060 1040 1020 1000 2L WB

1040 1020 1000 980 3L MC 850 800 750 4L EB 980 960 940 5L JB 965 960 955 6L JV

MilliGain

1160 1150 1140 1130

7L TR

TIME (HOURS)

18 19 20 21 22 23 1/00 1/01 1/02

1100 1080 1060 1040

Gain amp vs UTC time for DA193.MULTI.1 SN 2 Lpol IF 4

Plot file version 8 created 13-SEP-2002 11:10:43

1L ON 1100 1050 1000 2L WB 980 960 940 3L MC 900 850 800 4L EB 980 960 940 6L JV

1090 1080 1070 1060 7L TR

MilliGain

TIME (HOURS)

18 19 20 21 22 23 1/00 1/01 1/02

1060 1040 1020 1000 980

Gain amp vs UTC time for 3C345.MULTI.1 SN 2 Rpol IF 1

Plot file version 1 created 13-SEP-2002 11:16:08

1R ON

1060 1040 1020 1000 980 2R WB

1400 1300 1200 1100

3R MC

1150

1100

4R EB

1080 1060 1040 1020

5R JB

1100 1050 1000 950 6R JV

MilliGain

970 960 950 940 7R TR

TIME (HOURS)

02 04 06 08 10 12 14 16 18 20 221/00 1/02 1/04 1/06 1/08

1150 1100 1050 1000

Gain amp vs UTC time for 3C345.MULTI.1 SN 2 Rpol IF 2

Plot file version 2 created 13-SEP-2002 11:16:12

1R ON

1.04 1.02 1.00 0.98 0.96

2R WB 1.5 1.4 1.3 1.2 3R MC 1.8 1.6 1.4 1.2 1.0 4R EB

1.06

1.04

1.02

5R JB 1.2 1.1 1.0 6R JV

Gain

1.10 1.05 1.00 0.95

7R TR

TIME (HOURS)

02 04 06 08 10 12 14 16 18 20 221/00 1/02 1/04 1/06 1/08

1.05 1.00 0.95

Gain amp vs UTC time for 3C345.MULTI.1 SN 2 Rpol IF 3

Plot file version 3 created 13-SEP-2002 11:16:16

1R ON

1120 1100 1080 1060 1040

2R WB

1200 1100 1000

3R MC

1200

1150

1100

4R EB

1060 1040 1020 1000 980 5R JB

1200 1150 1100 1050 6R JV

MilliGain

1050 1040 1030 1020 1010

7R TR

TIME (HOURS)

02 04 06 08 10 12 14 16 18 20 221/00 1/02 1/04 1/06 1/08

1100 1050 1000

Gain amp vs UTC time for 3C345.MULTI.1 SN 2 Rpol IF 4

Plot file version 4 created 13-SEP-2002 11:16:20

1R ON

1100 1080 1060 1040 1020

2R WB

1200 1100 1000

3R MC

1120 1100 1080 1060

4R EB

1000 980 960 5R JB

1200

1100

1000

6R JV

MilliGain

TIME (HOURS)

02 04 06 08 10 12 14 16 18 20 221/00 1/02 1/04 1/06 1/08

890 880 870 860 850

Gain amp vs UTC time for 3C345.MULTI.1 SN 2 Lpol IF 1

Plot file version 5 created 13-SEP-2002 11:16:24

1L ON

1000 980 960 940 2L WB

1300 1200 1100 1000

3L MC

980960 940920 900880

4L EB

1040 1020 1000 980 5L JB

1100 1050 1000 950 6L JV

MilliGain

1070 1060 1050 1040

7L TR

TIME (HOURS)

02 04 06 08 10 12 14 16 18 20 221/00 1/02 1/04 1/06 1/08

1200

1100

1000

Gain amp vs UTC time for 3C345.MULTI.1 SN 2 Lpol IF 2

Plot file version 6 created 13-SEP-2002 11:16:28

1L ON

1.04 1.02 1.00 0.98 0.96

2L WB 1.6 1.4 1.2 3L MC 0.9 0.8 0.7 4L EB

1.06 1.04 1.02 1.00

5L JB

1.25 1.20 1.15 1.10 1.05

6L JV

Gain

1.30 1.25 1.20 1.15

7L TR

TIME (HOURS)

02 04 06 08 10 12 14 16 18 20 221/00 1/02 1/04 1/06 1/08

1.10 1.05 1.00

Gain amp vs UTC time for 3C345.MULTI.1 SN 2 Lpol IF 3

Plot file version 7 created 13-SEP-2002 11:16:32

1L ON

1120 1100 1080 1060 1040

2L WB

1300 1200 1100 1000

3L MC 900 880 860 840 820 4L EB 980 960 940 920 5L JB

1200

1100

1000

6L JV

MilliGain

1180 1160 1140

7L TR

TIME (HOURS)

02 04 06 08 10 12 14 16 18 20 221/00 1/02 1/04 1/06 1/08

1150 1100 1050 1000

Gain amp vs UTC time for 3C345.MULTI.1 SN 2 Lpol IF 4

Plot file version 8 created 13-SEP-2002 11:16:36

1L ON

1150 1100 1050

2L WB

1200 1100 1000

3L MC 960 940 920 900 880 4L EB 960 940 920 5L JB

1150 1100 1050 1000

6L JV

MilliGain

1100 1080 1060

7L TR

TIME (HOURS)

02 04 06 08 10 12 14 16 18 20 221/00 1/02 1/04 1/06 1/08

1100 1050 1000

Gain amp vs UTC time for 3C286.MULTI.1 SN 2 Rpol IF 1

Plot file version 1 created 13-SEP-2002 11:21:54

1R ON

1200 1100 1000 900 2R WB

1160 1140 1120

3R MC

1200 1000 800 4R EB

1080 1060 1040 1020 1000

5R JB 965 960 955 6R JV

MilliGain

1000 980 960 940 7R TR

TIME (HOURS)

08 10 12 14 16 18 20 22 1/00 1/02 1/04 1/06 1/08

1100 1050 1000

Gain amp vs UTC time for 3C286.MULTI.1 SN 2 Rpol IF 2

Plot file version 2 created 13-SEP-2002 11:21:58

1R ON

1200 1000 800 2R WB

1300 1280 1260

3R MC

1100 1000 900 800 700 4R EB

1080 1060 1040 1020 1000

5R JB

1070 1060 1050 1040

6R JV

MilliGain

1020 1000980 960940 920 7R TR

TIME (HOURS)

08 10 12 14 16 18 20 22 1/00 1/02 1/04 1/06 1/08

1100 1050 1000 950

Gain amp vs UTC time for 3C286.MULTI.1 SN 2 Rpol IF 3

Plot file version 3 created 13-SEP-2002 11:22:02

1R ON 1200 1000 800 2R WB

1105 1100 1095 1090

3R MC

1200

1000 800 4R EB

1120 1100 1080 1060 1040 1020

5R JB

1170 1160 1150 1140

6R JV

MilliGain

1150 1100 1050

7R TR

TIME (HOURS)

08 10 12 14 16 18 20 22 1/00 1/02 1/04 1/06 1/08

1200 1100 1000

Gain amp vs UTC time for 3C286.MULTI.1 SN 2 Lpol IF 2

Plot file version 6 created 13-SEP-2002 11:22:14

1L ON

1200 1000 800 2L WB

1180 1170 1160 1150

3L MC 900 800 700 600 4L EB

1080 1060 1040 1020 1000 5L JB

1120 1110 1100 6L JV

MilliGain

1250 1200 1150 1100 7L TR

TIME (HOURS)

08 10 12 14 16 18 20 22 1/00 1/02 1/04 1/06 1/08

1150 1100 1050 1000

Gain amp vs UTC time for 3C286.MULTI.1 SN 2 Lpol IF 3

Plot file version 7 created 13-SEP-2002 11:22:18

1L ON 1200 1000 800 2L WB

1070 1065 1060 1055 3L MC 900 800 700 600 4L EB 1000 950 5L JB 1070 1060 1050

6L JV

MilliGain

1250 1200 1150 7L TR

TIME (HOURS)

08 10 12 14 16 18 20 22 1/00 1/02 1/04 1/06 1/08

1200 1100 1000

Gain amp vs UTC time for 3C286.MULTI.1 SN 2 Lpol IF 4

Plot file version 8 created 13-SEP-2002 11:22:22

1L ON

1400 1200 1000

2L WB

1035 1030 1025 1020 1015

3L MC 950 900 850 800 750 4L EB 980 960 940 920 5L JB

1030 1020 1010

6L JV

MilliGain

1220 1200 1180 7L TR

TIME (HOURS)

08 10 12 14 16 18 20 22 1/00 1/02 1/04 1/06 1/08

1200 1150 1100 1050

Gain amp vs UTC time for J0836+2728.MULTI.1 SN 2 Rpol IF 1

Plot file version 1 created 13-SEP-2002 11:28:26

1R ON 3 2 1 2R WB 1.2 1.0 0.8 3R MC 4 3 2 1 4R EB 1.2 1.0 0.8 6R JV 1.8 1.6 1.4 1.2 1.0 7R TR

Gain

TIME (HOURS)

23 1/00 1/01 1/02 1/03 1/04 1/05 1/06

2.0 1.5 1.0

Gain amp vs UTC time for J0836+2728.MULTI.1 SN 2 Rpol IF 2

Plot file version 2 created 13-SEP-2002 11:28:30

1R ON 2.5 2.0 1.5 1.0 2R WB 1.3 1.2 1.1 1.0 0.9 3R MC 8 6 4 2 4R EB 1.1 1.0 0.9 6R JV 1.8 1.6 1.4 1.2 1.0 0.8 7R TR

Gain

TIME (HOURS)

23 1/00 1/01 1/02 1/03 1/04 1/05 1/06

4 3 2 1

Gain amp vs UTC time for J0836+2728.MULTI.1 SN 2 Rpol IF 3

Plot file version 3 created 13-SEP-2002 11:28:34

1R ON 2.0 1.5 1.0 2R WB 1.1 1.0 0.9 0.8 3R MC 4 3 2 1 4R EB 1.2 1.0 0.8 6R JV 1.8 1.6 1.4 1.2 1.0 7R TR

Gain

TIME (HOURS)

23 1/00 1/01 1/02 1/03 1/04 1/05 1/06

2.0 1.5 1.0

Gain amp vs UTC time for J0836+2728.MULTI.1 SN 2 Rpol IF 4

Plot file version 4 created 13-SEP-2002 11:28:38

1R ON 1.6 1.4 1.2 1.0 0.8 2R WB 1.0 0.9 0.8 3R MC 6 4 2 4R EB

1.05 1.00 0.95 0.90 0.85

6R JV

Gain

TIME (HOURS)

23 1/00 1/01 1/02 1/03 1/04 1/05 1/06

1.2 1.1 1.0 0.9

Gain amp vs UTC time for J0836+2728.MULTI.1 SN 2 Lpol IF 1

Plot file version 5 created 13-SEP-2002 11:28:42

1L ON 2.0 1.5 1.0 2L WB 1.1 1.0 0.9 3L MC 4 3 2 1 4L EB 1.1 1.0 0.9 6L JV 1.6 1.4 1.2 1.0 7L TR

Gain

TIME (HOURS)

23 1/00 1/01 1/02 1/03 1/04 1/05 1/06

2.0 1.5 1.0

Gain amp vs UTC time for J0836+2728.MULTI.1 SN 2 Lpol IF 2

Plot file version 6 created 13-SEP-2002 11:28:46

1L ON 2.0 1.5 1.0 2L WB 1.3 1.2 1.1 1.0 0.9 3L MC 2.5 2.0 1.5 1.0 0.5 4L EB 1.1 1.0 0.9 6L JV 1.8 1.6 1.4 1.2 7L TR

Gain

TIME (HOURS)

23 1/00 1/01 1/02 1/03 1/04 1/05 1/06

4 3 2 1

Gain amp vs UTC time for J0836+2728.MULTI.1 SN 2 Lpol IF 3

Plot file version 7 created 13-SEP-2002 11:28:50

1L ON 2.0 1.5 1.0 2L WB 1.1 1.0 0.9 3L MC 1.6 1.4 1.2 1.0 0.8 4L EB 1.1 1.0 0.9 0.8 6L JV 2.5 2.0 1.5 1.0 7L TR

Gain

TIME (HOURS)

23 1/00 1/01 1/02 1/03 1/04 1/05 1/06

4 3 2 1

Gain amp vs UTC time for J0836+2728.MULTI.1 SN 2 Lpol IF 4

Plot file version 8 created 13-SEP-2002 11:28:54

1L ON 10 5 0 2L WB 1.1 1.0 0.9 3L MC 2.5 2.0 1.5 1.0 4L EB 1.0 0.9 0.8 6L JV 1.8 1.6 1.4 1.2 7L TR

Gain

TIME (HOURS)

23 1/00 1/01 1/02 1/03 1/04 1/05 1/06

2.5 2.0 1.5 1.0

Gain amp vs UTC time for J1657+5705.MULTI.1 SN 2 Rpol IF 1

Plot file version 1 created 13-SEP-2002 11:35:56

1R ON 1.4 1.2 1.0 2R WB 1.3 1.2 1.1 1.0 0.9 3R MC 1.8 1.6 1.4 1.2 1.0 4R EB 1.1 1.0 0.9 5R JB 1.4 1.2 1.0 7R TR

Gain

TIME (HOURS)

09 10 11 12 13 14 15 16

1.6 1.4 1.2 1.0

Gain amp vs UTC time for J1657+5705.MULTI.1 SN 2 Rpol IF 2

Plot file version 2 created 13-SEP-2002 11:36:00

1R ON 1.4 1.2 1.0 2R WB 1.4 1.2 1.0 3R MC 3 2 1 4R EB 1.2 1.0 0.8 5R JB 1.4 1.2 1.0 0.8 7R TR

Gain

TIME (HOURS)

09 10 11 12 13 14 15 16

1.4 1.2 1.0

Gain amp vs UTC time for J1657+5705.MULTI.1 SN 2 Lpol IF 1

Plot file version 5 created 13-SEP-2002 11:36:12

1L ON 1.3 1.2 1.1 1.0 0.9 2L WB 1.2 1.1 1.0 3L MC 1.4 1.2 1.0 0.8 4L EB 1.1 1.0 0.9 5L JB 5 4 3 2 1 7L TR

Gain

TIME (HOURS)

09 10 11 12 13 14 15 16

1.6 1.4 1.2

Gain amp vs UTC time for J1657+5705.MULTI.1 SN 2 Lpol IF 2

Plot file version 6 created 13-SEP-2002 11:36:16

1L ON 1.3 1.2 1.1 1.0 0.9 2L WB 1.4 1.2 1.0 3L MC 1.4 1.2 1.0 0.8 4L EB 1.2 1.0 0.8 5L JB 8 6 4 2 7L TR

Gain

TIME (HOURS)

09 10 11 12 13 14 15 16

1.6 1.4 1.2 1.0

Gain amp vs UTC time for J1657+5705.MULTI.1 SN 2 Lpol IF 3

Plot file version 7 created 13-SEP-2002 11:36:20

1L ON 1.4 1.2 1.0 2L WB 1.2 1.1 1.0 3L MC 1.1 1.0 0.9 0.8 4L EB 1.1 1.0 0.9 0.8 5L JB 8 6 4 2 7L TR

Gain

TIME (HOURS)

09 10 11 12 13 14 15 16

1.6 1.4 1.2 1.0

Gain amp vs UTC time for J1657+5705.MULTI.1 SN 2 Lpol IF 4

Plot file version 8 created 13-SEP-2002 11:36:24

1L ON 1.4 1.2 1.0 2L WB 1.1 1.0 0.9 3L MC 1.4 1.2 1.0 0.8 4L EB

1.00 0.95 0.90 0.85 5L JB 5 4 3 2 1 7L TR

Gain

TIME (HOURS)

09 10 11 12 13 14 15 16

1.4 1.2 1.0

Gain amp vs UTC time for J1332+4722.MULTI.1 SN 2 Rpol IF 1

Plot file version 1 created 13-SEP-2002 11:43:08

1R ON 1.8 1.6 1.4 1.2 1.0 0.8 2R WB

1.20 1.15 1.10 1.05 3R MC 3 2 1 4R EB 1.2 1.0 0.8 6R JV 15 10 5 0 7R TR

Gain

TIME (HOURS)

1/06 1/07 1/08 1/09 1/10 1/11 1/12 1/13

6 4 2

Gain amp vs UTC time for J1332+4722.MULTI.1 SN 2 Rpol IF 2

Plot file version 2 created 13-SEP-2002 11:43:12

1R ON 2.0 1.5 1.0 2R WB 3 2 1 3R MC 3 2 1 4R EB 1.1 1.0 0.9 6R JV 1.3 1.2 1.1 1.0 0.9 7R TR

Gain

TIME (HOURS)

1/06 1/07 1/08 1/09 1/10 1/11 1/12 1/13

3 2 1

Gain amp vs UTC time for J1332+4722.MULTI.1 SN 2 Rpol IF 3

Plot file version 3 created 13-SEP-2002 11:43:16

1R ON 1.6 1.4 1.2 1.0 0.8 2R WB

1.10 1.05 1.00

3R MC 1.8 1.6 1.4 1.2 1.0 4R EB 1.1 1.0 0.9 6R JV 20 10 0 7R TR

Gain

TIME (HOURS)

1/06 1/07 1/08 1/09 1/10 1/11 1/12 1/13

10 8 6 4 2

Gain amp vs UTC time for J1332+4722.MULTI.1 SN 2 Rpol IF 4

Plot file version 4 created 13-SEP-2002 11:43:20

1R ON 1.6 1.4 1.2 1.0 2R WB

1.05

1.00

0.95

3R MC 2.5 2.0 1.5 1.0 4R EB 1.0 0.9 0.8 6R JV

Gain

TIME (HOURS)

1/06 1/07 1/08 1/09 1/10 1/11 1/12 1/13

8 6 4 2

Gain amp vs UTC time for J1332+4722.MULTI.1 SN 2 Lpol IF 1

Plot file version 5 created 13-SEP-2002 11:43:24

1L ON 1.4 1.2 1.0 0.8 2L WB

1.15 1.10 1.05 1.00

3L MC 1.2 1.0 0.8 4L EB 1.1 1.0 0.9 6L JV 1.6 1.4 1.2 1.0 7L TR

Gain

TIME (HOURS)

1/06 1/07 1/08 1/09 1/10 1/11 1/12 1/13

8 6 4 2

Gain amp vs UTC time for J1332+4722.MULTI.1 SN 2 Lpol IF 2

Plot file version 6 created 13-SEP-2002 11:43:28

1L ON 1.4 1.2 1.0 0.8 2L WB

1.30 1.25 1.20 1.15

3L MC 1.5 1.0 4L EB 1.2 1.0 0.8 6L JV 3 2 1 7L TR

Gain

TIME (HOURS)

1/06 1/07 1/08 1/09 1/10 1/11 1/12 1/13

1.6 1.4 1.2 1.0

Gain amp vs UTC time for J1332+4722.MULTI.1 SN 2 Lpol IF 3

Plot file version 7 created 13-SEP-2002 11:43:32

1L ON 1.6 1.4 1.2 1.0 2L WB

1.15 1.10 1.05

3L MC 1.2 1.0 0.8 4L EB

1.05 1.00 0.95 0.90 0.85

6L JV 10 8 6 4 2 7L TR

Gain

TIME (HOURS)

1/06 1/07 1/08 1/09 1/10 1/11 1/12 1/13

10 5 0

Gain amp vs UTC time for J1332+4722.MULTI.1 SN 2 Lpol IF 4

Plot file version 8 created 13-SEP-2002 11:43:36

1L ON 1.6 1.4 1.2 1.0 2L WB

1.10 1.05 1.00 0.95

3L MC 1.1 1.0 0.9 0.8 4L EB

1.05 1.00 0.95 0.90 0.85

6L JV 4 3 2 1 7L TR

Gain

TIME (HOURS)

1/06 1/07 1/08 1/09 1/10 1/11 1/12 1/13

1.8 1.6 1.4 1.2 1.0

Gain amp vs UTC time for J0921+6215.MULTI.1 SN 2 Rpol IF 1

Plot file version 1 created 13-SEP-2002 11:50:30

1R ON 1100 1000 900 2R WB

1250 1200 1150 1100 1050

3R MC

1300 1200 1100 1000

4R EB

1100

1000 900 5R JB

1100 1050 1000

6R JV

MilliGain

1100 1050 1000

7R TR

TIME (HOURS)

16 17 18 19 20 21 22

1300 1200 1100 1000

Gain amp vs UTC time for J0921+6215.MULTI.1 SN 2 Rpol IF 4

Plot file version 4 created 13-SEP-2002 11:50:42

1R ON 1.1 1.0 0.9 2R WB 1.05 1.00 0.95

3R MC 1.2 1.1 1.0 4R EB 1.0 0.9 0.8 5R JB 2.5 2.0 1.5 1.0 6R JV

Gain

TIME (HOURS)

16 17 18 19 20 21 22

1.15 1.10 1.05 1.00 0.95

Gain amp vs UTC time for J0921+6215.MULTI.1 SN 2 Lpol IF 1

Plot file version 5 created 13-SEP-2002 11:50:46

1L ON

1100

1000 900 2L WB

1200

1100

1000 3L MC

1200 1000 800 4L EB

1100 1050 1000 950 5L JB

1020 1000 980 960 6L JV

MilliGain

1250 1200 1150 1100 1050 7L TR

TIME (HOURS)

16 17 18 19 20 21 22

1300 1200 1100

Gain amp vs UTC time for J0921+6215.MULTI.1 SN 2 Lpol IF 2

Plot file version 6 created 13-SEP-2002 11:50:50

1L ON 1.1 1.0 0.9 2L WB 1.4 1.3 1.2 3L MC 1.0 0.8 0.6 4L EB 1.1 1.0 0.9 5L JB

1.25 1.20 1.15 1.10 6L JV

Gain

1.4 1.3 1.2 7L TR

TIME (HOURS)

16 17 18 19 20 21 22

1.8 1.6 1.4 1.2 1.0

Gain amp vs UTC time for J0921+6215.MULTI.1 SN 2 Lpol IF 3

Plot file version 7 created 13-SEP-2002 11:50:54

1L ON

1200 1100 1000

2L WB

1200 1150 1100 1050 3L MC

1000 900 800 4L EB

1050 1000 950 900 5L JB

1140 1120 1100 1080 1060 1040

6L JV

MilliGain

1500 1400 1300 1200

7L TR

TIME (HOURS)

16 17 18 19 20 21 22

1300 1200 1100

Gain amp vs UTC time for J0921+6215.MULTI.1 SN 2 Lpol IF 4

Plot file version 8 created 13-SEP-2002 11:50:58

1L ON 1.2 1.1 1.0 2L WB

1.15 1.10 1.05 1.00

3L MC 1.0 0.9 0.8 4L EB

1.00 0.95 0.90

5L JB 5 4 3 2 1 6L JV

Gain

1.35 1.30 1.25 1.20 1.15

7L TR

TIME (HOURS)

16 17 18 19 20 21 22

10 5 0