Center at RA 09 21 36.23105 DEC 62 15 52.1804

CONT: J0921+62 IPOL 1652.803 MHZ J0921+6215.ICL001.3

PLot file version 1 created 13-SEP-2002 11:52:58

Cont peak flux = 1.3469E+00 JY/BEAM Levs = 1.347E+00 * (-0.004, 0.004, 0.008, 0.015, 0.031, 0.062, 0.123, 0.246, 0.493, 0.986)

MilliARC SEC

MilliARC SEC

200 100 0 -100 -200

250

200

150

100

50

0

-50

-100

-150

-200

-250