Center at RA 11 27 40.13507 DEC 56 50 14.7941

CONT: J1127+56 IPOL 1652.803 MHZ J1127+5650.ICL001.3

PLot file version 1 created 13-SEP-2002 11:05:56

Cont peak flux = 5.1205E-01 JY/BEAM Levs = 5.120E-01 * (-0.003, 0.003, 0.007, 0.013, 0.026, 0.053, 0.105, 0.210, 0.420, 0.840)

MilliARC SEC

MilliARC SEC

200 100 0 -100 -200

250

200

150

100

50

0

-50

-100

-150

-200

-250