Center at RA 13 32 45.24644 DEC 47 22 22.6676

CONT: J1332+47 IPOL 1652.803 MHZ J1332+4722.ICL001.3

PLot file version 1 created 13-SEP-2002 11:45:51

Cont peak flux = 3.2855E-01 JY/BEAM Levs = 3.286E-01 * (-0.010, 0.010, 0.020, 0.040, 0.081, 0.162, 0.323, 0.647)

MilliARC SEC

MilliARC SEC

200 100 0 -100 -200

250

200

150

100

50

0

-50

-100

-150

-200

-250