Center at RA 01 20 02.63755 DEC 14 21 42.2479

CONT: 01173+14 IPOL 1634.021 MHZ 01173+1405.ICL001.5

PLot file version 1 created 18-DEC-2003 15:23:25

Cont peak flux = 2.2336E-03 JY/BEAM Levs = 2.234E-03 * (-0.068, 0.068, 0.136, 0.273, 0.545)

MilliARC SEC

MilliARC SEC

200 100 0 -100 -200

250

200

150

100

50

0

-50

-100

-150

-200

-250