Gain amp vs UTC time for 03359+1523.MULTI.1 SN 2 Rpol & Lpol IF 1 - 8

Plot file version 1 created 18-DEC-2003 15:21:11

1 ON IF 1L

1.040 1.035 1.030 1.025 1 ON IF 2R

0.420 0.415 0.410 0.405

1 ON IF 2L

0.395 0.390 0.385 0.380 1 ON IF 3R

0.200 0.195 0.190 0.185

1 ON IF 4L 0.5 0.4 0.3 0.2 2 WB IF 1R

Gain

2 1 0 2 WB IF 1L 2.0 1.5 1.0 0.5 2 WB IF 2R 1.5 1.0 0.5 2 WB IF 2L 2 1 0 2 WB IF 3R

TIME (HOURS)

06 08 10 12 14 16 18 20 22 1/00 1/02 1/04 1/06 1/08

1.0 0.5 0.0

Gain amp vs UTC time for 03359+1523.MULTI.1 SN 2 Rpol & Lpol IF 1 - 8

Plot file version 2 created 18-DEC-2003 15:21:11

2 WB IF 3L 3 2 1 2 WB IF 4R 2.0 1.5 1.0 0.5 2 WB IF 4L 1.0 0.5 3 MC IF 1R

0.15

0.10

0.05

3 MC IF 1L 0.5 0.4 0.3 0.2 3 MC IF 2R

Gain

1.0 0.5 0.0 3 MC IF 2L 0.6 0.4 0.2 3 MC IF 3R

0.20 0.15 0.10 0.05

3 MC IF 3L 0.6 0.4 0.2 3 MC IF 4R

TIME (HOURS)

06 08 10 12 14 16 18 20 22 1/00 1/02 1/04 1/06 1/08

0.210 0.205 0.200 0.195

Gain amp vs UTC time for 03359+1523.MULTI.1 SN 2 Rpol & Lpol IF 1 - 8

Plot file version 3 created 18-DEC-2003 15:21:11

3 MC IF 4L

0.495 0.490 0.485 0.480 4 EF IF 1R 1.5 1.0 0.5 4 EF IF 1L 1.4 1.2 1.0 0.8 0.6 0.4 4 EF IF 2R 2.0 1.5 1.0 0.5 4 EF IF 2L 2.5 2.0 1.5 1.0 0.5 4 EF IF 3R

Gain

1.4 1.2 1.0 0.8 0.6 4 EF IF 3L 1.5 1.0 0.5 4 EF IF 4R 2.0 1.5 1.0 4 EF IF 4L 1.5 1.0 0.5 4 EF IF 7L

TIME (HOURS)

06 08 10 12 14 16 18 20 22 1/00 1/02 1/04 1/06 1/08

1.2 1.0 0.8 0.6 0.4

Gain amp vs UTC time for 03359+1523.MULTI.1 SN 2 Rpol & Lpol IF 1 - 8

Plot file version 4 created 18-DEC-2003 15:21:11

5 NT IF 1R 1.0 0.5 0.0 5 NT IF 1L 1.0 0.8 0.6 0.4 0.2 5 NT IF 2R 0.8 0.6 0.4 0.2 0.0 5 NT IF 3L 0.8 0.6 0.4 0.2 5 NT IF 7L

0.190 0.185 0.180 0.175

6 JB IF 1R

Gain

0.7 0.6 0.5 0.4 6 JB IF 1L

0.770 0.765 0.760 0.755

6 JB IF 2R 1.2 1.0 0.8 0.6 6 JB IF 2L 1.0 0.8 0.6 0.4 0.2 6 JB IF 3R

TIME (HOURS)

06 08 10 12 14 16 18 20 22 1/00 1/02 1/04 1/06 1/08

0.810 0.805 0.800 0.795

Gain amp vs UTC time for 03359+1523.MULTI.1 SN 2 Rpol & Lpol IF 1 - 8

Plot file version 5 created 18-DEC-2003 15:21:11

6 JB IF 3L 1.0 0.8 0.6 0.4 6 JB IF 4R

0.335 0.330 0.325 0.320

6 JB IF 4L 2.0 1.5 1.0 7 TR IF 1R 1.5 1.0 0.5 0.0 7 TR IF 1L 3 2 1 7 TR IF 2R

Gain

1.5 1.0 0.5 7 TR IF 2L 2.0 1.5 1.0 0.5 7 TR IF 3R 0.6 0.4 0.2 7 TR IF 3L 1.0 0.5 0.0 7 TR IF 4R

TIME (HOURS)

06 08 10 12 14 16 18 20 22 1/00 1/02 1/04 1/06 1/08

1.0 0.8 0.6 0.4 0.2

Gain amp vs UTC time for 03359+1523.MULTI.1 SN 2 Rpol & Lpol IF 1 - 8

Plot file version 6 created 18-DEC-2003 15:21:11

7 TR IF 4L 0.7 0.6 0.5 0.4 0.3 7 TR IF 7L 3 2 1 8 CM IF 7L

Gain

TIME (HOURS)

06 08 10 12 14 16 18 20 22 1/00 1/02 1/04 1/06 1/08

0.565 0.560 0.555 0.550