Center at RA 03 38 47.10013 DEC 15 32 53.5136

CONT: 03359+15 IPOL 1634.021 MHZ 03359+1523.ICL001.5

PLot file version 1 created 18-DEC-2003 15:24:54

Cont peak flux = -7.5585E-04 JY/BEAM Levs = 5.709E-04 * (-0.329, 0.329, 0.659)

MilliARC SEC

MilliARC SEC

200 100 0 -100 -200

250

200

150

100

50

0

-50

-100

-150

-200

-250