Gain amp vs UTC time for 15250+3608.MULTI.1 SN 2 Rpol & Lpol IF 1 - 8

Plot file version 1 created 18-DEC-2003 15:40:37

1 ON IF 1R

0.84 0.82 0.80

1 ON IF 1L 1.0 0.8 0.6 0.4 0.2 1 ON IF 2R 0.8 0.6 0.4 0.2 1 ON IF 2L 1.2 1.0 0.8 0.6 0.4 0.2 1 ON IF 3R 1.0 0.5 1 ON IF 3L

Gain

3.115 3.110 3.105 3.100 1 ON IF 4R

0.26 0.25 0.24 0.23

1 ON IF 4L 0.8 0.6 0.4 0.2 2 WB IF 1R 1.2 1.0 0.8 0.6 2 WB IF 1L

TIME (HOURS)

18 20 22 1/00 1/02 1/04

1.2 1.0 0.8 0.6 0.4

Gain amp vs UTC time for 15250+3608.MULTI.1 SN 2 Rpol & Lpol IF 1 - 8

Plot file version 2 created 18-DEC-2003 15:40:37

2 WB IF 2R 1.5 1.0 0.5 2 WB IF 2L 1.5 1.0 0.5 2 WB IF 3R 1.0 0.8 0.6 2 WB IF 3L 1.2 1.0 0.8 0.6 0.4 2 WB IF 4R 1.2 1.0 0.8 0.6 0.4 2 WB IF 4L

Gain

1.0 0.8 0.6 3 MC IF 1R 0.8 0.6 0.4 3 MC IF 1L 0.6 0.4 0.2 0.0 3 MC IF 2R

0.50

0.45

0.40

3 MC IF 2L

TIME (HOURS)

18 20 22 1/00 1/02 1/04

0.8 0.6 0.4

Gain amp vs UTC time for 15250+3608.MULTI.1 SN 2 Rpol & Lpol IF 1 - 8

Plot file version 3 created 18-DEC-2003 15:40:37

3 MC IF 3R

0.515 0.510 0.505 0.500

3 MC IF 3L 0.5 0.4 0.3 0.2 3 MC IF 4R 0.5 0.4 0.3 3 MC IF 4L 1.8 1.6 1.4 1.2 4 EF IF 1R 1.2 1.0 0.8 0.6 4 EF IF 1L

Gain

1.2 1.0 0.8 0.6 0.4 4 EF IF 2R 1.2 1.0 0.8 0.6 4 EF IF 2L 1.2 1.0 0.8 0.6 4 EF IF 3R 1.2 1.0 0.8 4 EF IF 3L

TIME (HOURS)

18 20 22 1/00 1/02 1/04

1.4 1.2 1.0 0.8 0.6 0.4

Gain amp vs UTC time for 15250+3608.MULTI.1 SN 2 Rpol & Lpol IF 1 - 8

Plot file version 4 created 18-DEC-2003 15:40:37

4 EF IF 4R 1.2 1.0 0.8 4 EF IF 4L 1.2 1.0 0.8 4 EF IF 7L 1.0 0.8 0.6 0.4 5 NT IF 1R

6.125 6.120 6.115 6.110

5 NT IF 1L 1.0 0.8 0.6 0.4 0.2 5 NT IF 3L

Gain

0.275 0.270 0.265 0.260

5 NT IF 7L 2 1 0 6 JB IF 1R 1.0 0.9 0.8 0.7 6 JB IF 1L 1.0 0.5 6 JB IF 2R

TIME (HOURS)

18 20 22 1/00 1/02 1/04

2.0 1.5 1.0 0.5

Gain amp vs UTC time for 15250+3608.MULTI.1 SN 2 Rpol & Lpol IF 1 - 8

Plot file version 5 created 18-DEC-2003 15:40:37

6 JB IF 2L 2.0 1.5 1.0 6 JB IF 3R

5.030 5.025 5.020 5.015

6 JB IF 3L 0.8 0.6 0.4 6 JB IF 4R 2.0 1.5 1.0 6 JB IF 4L

0.760 0.755 0.750 0.745

7 TR IF 1R

Gain

0.5 0.4 0.3 0.2 7 TR IF 1L 0.6 0.4 0.2 0.0 7 TR IF 2R 0.8 0.6 0.4 0.2 0.0 7 TR IF 2L 0.6 0.4 0.2 0.0 7 TR IF 3L

TIME (HOURS)

18 20 22 1/00 1/02 1/04

1.0 0.5 0.0

Gain amp vs UTC time for 15250+3608.MULTI.1 SN 2 Rpol & Lpol IF 1 - 8

Plot file version 6 created 18-DEC-2003 15:40:37

7 TR IF 4R

0.260 0.255 0.250 0.245

7 TR IF 4L

0.035 0.030 0.025 0.020

7 TR IF 7L 2 1 0 8 CM IF 7L

Gain

TIME (HOURS)

18 20 22 1/00 1/02 1/04

1.2 1.0 0.8 0.6 0.4