Gain amp vs UTC time for 3C345.MULTI.1 SN 2 Rpol & Lpol IF 1 - 8

Plot file version 1 created 18-DEC-2003 15:50:31

4 EF IF 6L

1.21 1.20 1.19 1.18 1.17

4 EF IF 7L

0.985

0.980

0.975

5 NT IF 6L

0.79 0.78 0.77 0.76 0.75

5 NT IF 7L

0.93

0.92

0.91

7 TR IF 6L

1.75

1.70

1.65

7 TR IF 7L

Gain

1.74

1.73

1.72

8 CM IF 6L

57.770 57.765 57.760 57.755

8 CM IF 7L

TIME (HOURS)

1/02 10 15 20 25 30

0.515 0.510 0.505 0.500 0.495