Gain amp vs UTC time for J0344+1559.MULTI.1 SN 2 Rpol & Lpol IF 1 - 8

Plot file version 1 created 18-DEC-2003 12:15:25

1 ON IF 1R 2.0 1.5 1.0 1 ON IF 1L 3 2 1 1 ON IF 2R 1.6 1.4 1.2 1.0 0.8 1 ON IF 2L 2.0 1.5 1.0 1 ON IF 3R 1.4 1.2 1.0 0.8 0.6 1 ON IF 3L

Gain

1.2 1.1 1.0 1 ON IF 4R 1.4 1.2 1.0 1 ON IF 4L 1.4 1.2 1.0 2 WB IF 1R 2.5 2.0 1.5 1.0 2 WB IF 1L

TIME (HOURS)

06 08 10 12 14 16 18 20 22 1/00 1/02 1/04 1/06 1/08

1.4 1.2 1.0

Gain amp vs UTC time for J0344+1559.MULTI.1 SN 2 Rpol & Lpol IF 1 - 8

Plot file version 2 created 18-DEC-2003 12:15:25

2 WB IF 2R 2.5 2.0 1.5 1.0 2 WB IF 2L 1.6 1.4 1.2 1.0 2 WB IF 3R 3 2 1 2 WB IF 3L 1.8 1.6 1.4 1.2 1.0 2 WB IF 4R 2.5 2.0 1.5 1.0 2 WB IF 4L

Gain

1.6 1.4 1.2 1.0 3 MC IF 1R 2.0 1.5 1.0 3 MC IF 1L 1.8 1.6 1.4 1.2 1.0 0.8 3 MC IF 2R 1.4 1.2 1.0 0.8 3 MC IF 2L

TIME (HOURS)

06 08 10 12 14 16 18 20 22 1/00 1/02 1/04 1/06 1/08

2.5 2.0 1.5 1.0

Gain amp vs UTC time for J0344+1559.MULTI.1 SN 2 Rpol & Lpol IF 1 - 8

Plot file version 3 created 18-DEC-2003 12:15:25

3 MC IF 3R 2.0 1.5 1.0 3 MC IF 3L 2.0 1.5 1.0 3 MC IF 4R 1.8 1.6 1.4 1.2 1.0 0.8 3 MC IF 4L 2.0 1.5 1.0 4 EF IF 1R 1.2 1.1 1.0 0.9 4 EF IF 1L

Gain

1.1 1.0 0.9 4 EF IF 2R 1.1 1.0 0.9 0.8 0.7 4 EF IF 2L 1.0 0.9 0.8 4 EF IF 3R 1.0 0.9 0.8 4 EF IF 3L

TIME (HOURS)

06 08 10 12 14 16 18 20 22 1/00 1/02 1/04 1/06 1/08

1.1 1.0 0.9 0.8

Gain amp vs UTC time for J0344+1559.MULTI.1 SN 2 Rpol & Lpol IF 1 - 8

Plot file version 4 created 18-DEC-2003 12:15:25

4 EF IF 4R 1.0 0.9 0.8 4 EF IF 4L 1.0 0.9 0.8 4 EF IF 7L

1.15 1.10 1.05 1.00

5 NT IF 1R 2.5 2.0 1.5 1.0 5 NT IF 1L 2.0 1.5 1.0 0.5 5 NT IF 2R

Gain

2.5 2.0 1.5 1.0 5 NT IF 2L 0.9 0.8 0.7 5 NT IF 3L 3 2 1 5 NT IF 7L 1.5 1.0 0.5 6 JB IF 1R

TIME (HOURS)

06 08 10 12 14 16 18 20 22 1/00 1/02 1/04 1/06 1/08

1.00 0.95 0.90 0.85

Gain amp vs UTC time for J0344+1559.MULTI.1 SN 2 Rpol & Lpol IF 1 - 8

Plot file version 5 created 18-DEC-2003 12:15:25

6 JB IF 1L

1.05 1.00 0.95 0.90

6 JB IF 2R

0.95 0.90 0.85 0.80

6 JB IF 2L

0.95 0.90 0.85

6 JB IF 3R

1.05 1.00 0.95 0.90 0.85

6 JB IF 3L 1.4 1.3 1.2 6 JB IF 4R

Gain

1.00 0.95 0.90 0.85

6 JB IF 4L 1.6 1.4 1.2 7 TR IF 1R 2.0 1.5 1.0 7 TR IF 1L 2.5 2.0 1.5 1.0 7 TR IF 2R

TIME (HOURS)

06 08 10 12 14 16 18 20 22 1/00 1/02 1/04 1/06 1/08

2.0 1.5 1.0 0.5

Gain amp vs UTC time for J0344+1559.MULTI.1 SN 2 Rpol & Lpol IF 1 - 8

Plot file version 6 created 18-DEC-2003 12:15:25

7 TR IF 2L 2.5 2.0 1.5 1.0 7 TR IF 3R 2.0 1.5 1.0 7 TR IF 3L 1.5 1.0 0.5 7 TR IF 4R 1.6 1.4 1.2 1.0 0.8 0.6 7 TR IF 4L 1.5 1.0 0.5 7 TR IF 7L

Gain

2.0 1.8 1.6 1.4 8 CM IF 7L

TIME (HOURS)

06 08 10 12 14 16 18 20 22 1/00 1/02 1/04 1/06 1/08

1.0 0.9 0.8

Gain amp vs UTC time for UGC4881.MULTI.1 SN 2 Rpol & Lpol IF 1 - 8

Plot file version 1 created 18-DEC-2003 12:16:04

1 ON IF 1R 0.6 0.4 0.2 1 ON IF 1L

0.35 0.30 0.25 0.20 0.15

1 ON IF 2R

0.110 0.105 0.100 0.095

1 ON IF 2L 0.4 0.3 0.2 0.1 1 ON IF 3R 1.2 1.0 0.8 0.6 0.4 0.2 1 ON IF 3L

Gain

1.5 1.0 0.5 1 ON IF 4R

0.255 0.250 0.245 0.240

1 ON IF 4L 0.5 0.4 0.3 0.2 0.1 2 WB IF 1R 1.0 0.8 0.6 0.4 2 WB IF 1L

TIME (HOURS)

12 14 16 18 20 22

1.5 1.0 0.5

Gain amp vs UTC time for UGC4881.MULTI.1 SN 2 Rpol & Lpol IF 1 - 8

Plot file version 2 created 18-DEC-2003 12:16:04

2 WB IF 2R 1.2 1.0 0.8 0.6 0.4 0.2 2 WB IF 2L 1.2 1.0 0.8 0.6 0.4 0.2 2 WB IF 3R 0.6 0.5 0.4 0.3 2 WB IF 3L 0.4 0.3 0.2 2 WB IF 4R 1.5 1.0 0.5 2 WB IF 4L

Gain

1.2 1.0 0.8 0.6 0.4 0.2 3 MC IF 1R

0.20 0.15 0.10 0.05

3 MC IF 3R

0.30 0.25 0.20 0.15

3 MC IF 3L 0.6 0.4 0.2 3 MC IF 4R

TIME (HOURS)

12 14 16 18 20 22

0.160 0.155 0.150 0.145

Gain amp vs UTC time for UGC4881.MULTI.1 SN 2 Rpol & Lpol IF 1 - 8

Plot file version 3 created 18-DEC-2003 12:16:04

3 MC IF 4L

0.215 0.210 0.205 0.200

4 EF IF 1R 1.2 1.0 0.8 0.6 4 EF IF 1L 1.5 1.0 0.5 4 EF IF 2R 1.2 1.0 0.8 0.6 0.4 4 EF IF 2L 1.0 0.5 0.0 4 EF IF 3R

Gain

1.2 1.0 0.8 0.6 0.4 0.2 4 EF IF 3L 1.2 1.0 0.8 0.6 0.4 4 EF IF 4R 1.0 0.5 4 EF IF 4L 1.0 0.5 0.0 4 EF IF 7L

TIME (HOURS)

12 14 16 18 20 22

1.0 0.8 0.6

Gain amp vs UTC time for UGC4881.MULTI.1 SN 2 Rpol & Lpol IF 1 - 8

Plot file version 4 created 18-DEC-2003 12:16:04

5 NT IF 1L

0.335 0.330 0.325 0.320

5 NT IF 3L

0.430 0.425 0.420 0.415

6 JB IF 1R 1.0 0.8 0.6 6 JB IF 1L 2 1 0 6 JB IF 2R 2.0 1.5 1.0 0.5 6 JB IF 2L

Gain

3 2 1 6 JB IF 3R 1.5 1.0 0.5 6 JB IF 3L 1.0 0.8 0.6 0.4 6 JB IF 4R 1.0 0.8 0.6 0.4 6 JB IF 4L

TIME (HOURS)

12 14 16 18 20 22

3.930 3.925 3.920 3.915

Gain amp vs UTC time for UGC4881.MULTI.1 SN 2 Rpol & Lpol IF 1 - 8

Plot file version 5 created 18-DEC-2003 12:16:04

7 TR IF 1R 1.0 0.8 0.6 0.4 0.2 7 TR IF 1L 1.5 1.0 0.5 7 TR IF 2R 1.5 1.0 0.5 7 TR IF 2L 0.5 0.4 0.3 0.2 0.1 7 TR IF 3R 1.2 1.0 0.8 0.6 0.4 0.2 7 TR IF 3L

Gain

1.0 0.8 0.6 0.4 0.2 7 TR IF 4R 2.0 1.5 1.0 0.5 7 TR IF 4L 0.8 0.6 0.4 0.2 7 TR IF 7L 1.6 1.4 1.2 1.0 0.8 8 CM IF 7L

TIME (HOURS)

12 14 16 18 20 22

0.370 0.365 0.360 0.355

Gain amp vs UTC time for J0920+4441.MULTI.1 SN 2 Rpol & Lpol IF 1 - 8

Plot file version 1 created 18-DEC-2003 12:16:55

1 ON IF 1R 1.2 1.0 0.8 1 ON IF 1L 1.2 1.0 0.8 1 ON IF 2R 1.1 1.0 0.9 0.8 1 ON IF 2L 1.6 1.4 1.2 1.0 0.8 1 ON IF 3R 1.1 1.0 0.9 0.8 1 ON IF 3L

Gain

1.1 1.0 0.9 0.8 1 ON IF 4R 1.2 1.0 0.8 1 ON IF 4L 1.2 1.0 0.8 2 WB IF 1R 1.1 1.0 0.9 2 WB IF 1L

TIME (HOURS)

12 14 16 18 20 22

1.1 1.0 0.9

Gain amp vs UTC time for J0920+4441.MULTI.1 SN 2 Rpol & Lpol IF 1 - 8

Plot file version 4 created 18-DEC-2003 12:16:55

4 EF IF 4R 1.0 0.9 0.8 0.7 4 EF IF 4L 1.0 0.8 0.6 4 EF IF 7L 1.1 1.0 0.9 5 NT IF 1R 1.4 1.2 1.0 0.8 5 NT IF 1L 1.4 1.2 1.0 0.8 5 NT IF 2R

Gain

1.4 1.2 1.0 0.8 0.6 5 NT IF 3L 1.4 1.2 1.0 0.8 5 NT IF 7L 0.9 0.8 0.7 0.6 6 JB IF 1R 1.4 1.2 1.0 0.8 6 JB IF 1L

TIME (HOURS)

12 14 16 18 20 22

1.6 1.4 1.2 1.0

Gain amp vs UTC time for J0920+4441.MULTI.1 SN 2 Rpol & Lpol IF 1 - 8

Plot file version 5 created 18-DEC-2003 12:16:55

6 JB IF 2R 1.4 1.2 1.0 0.8 6 JB IF 2L 1.4 1.2 1.0 0.8 6 JB IF 3R 1.4 1.2 1.0 6 JB IF 3L 2.0 1.5 1.0 6 JB IF 4R 1.4 1.2 1.0 0.8 6 JB IF 4L

Gain

2.2 2.0 1.8 1.6 1.4 1.2 7 TR IF 1R 1.5 1.0 0.5 0.0 7 TR IF 1L 1.5 1.0 0.5 0.0 7 TR IF 2R 1.5 1.0 0.5 0.0 7 TR IF 2L

TIME (HOURS)

12 14 16 18 20 22

1.5 1.0 0.5 0.0

Gain amp vs UTC time for J0920+4441.MULTI.1 SN 2 Rpol & Lpol IF 1 - 8

Plot file version 6 created 18-DEC-2003 12:16:55

7 TR IF 3R 1.5 1.0 0.5 0.0 7 TR IF 3L 1.0 0.5 0.0 7 TR IF 4R 1.5 1.0 0.5 0.0 7 TR IF 4L 1.0 0.5 0.0 7 TR IF 7L 2.4 2.2 2.0 8 CM IF 7L

Gain

TIME (HOURS)

12 14 16 18 20 22

1.1 1.0 0.9 0.8

Gain amp vs UTC time for 10173+0828.MULTI.1 SN 2 Rpol & Lpol IF 1 - 8

Plot file version 1 created 18-DEC-2003 12:17:27

1 ON IF 1R 0.4 0.2 0.0 1 ON IF 1L 1.2 1.0 0.8 0.6 0.4 0.2 1 ON IF 2R 1.0 0.8 0.6 0.4 0.2 1 ON IF 2L

0.08 0.06

0.04 0.02

1 ON IF 3R 1.0 0.8 0.6 0.4 0.2 1 ON IF 4R

Gain

1.0 0.5 0.0 1 ON IF 4L 0.4 0.2 0.0 2 WB IF 1R 2.0 1.5 1.0 0.5 2 WB IF 1L 1.5 1.0 0.5 2 WB IF 2R

TIME (HOURS)

12 14 16 18 20 22

1.5 1.0 0.5

Gain amp vs UTC time for 10173+0828.MULTI.1 SN 2 Rpol & Lpol IF 1 - 8

Plot file version 2 created 18-DEC-2003 12:17:27

2 WB IF 2L 1.5 1.0 0.5 2 WB IF 3R 2 1 0 2 WB IF 3L 2.0 1.5 1.0 0.5 2 WB IF 4R 2.0 1.5 1.0 0.5 2 WB IF 4L 1.2 1.0 0.8 0.6 3 MC IF 1R

Gain

2 1 0 3 MC IF 1L 0.8 0.6 0.4 0.2 3 MC IF 2R 0.8 0.7 0.6 3 MC IF 2L 1.0 0.5 0.0 3 MC IF 3R

TIME (HOURS)

12 14 16 18 20 22

1.0 0.5 0.0

Gain amp vs UTC time for 10173+0828.MULTI.1 SN 2 Rpol & Lpol IF 1 - 8

Plot file version 3 created 18-DEC-2003 12:17:27

3 MC IF 3L 0.4 0.3 0.2 3 MC IF 4R 0.3 0.2 0.1 3 MC IF 4L 1.0 0.5 0.0 4 EF IF 1R 1.2 1.0 0.8 0.6 0.4 4 EF IF 1L 2.5 2.0 1.5 1.0 0.5 4 EF IF 2R

Gain

1.5 1.0 0.5 0.0 4 EF IF 2L 1.5 1.0 0.5 4 EF IF 3R 1.5 1.0 0.5 4 EF IF 3L 1.4 1.2 1.0 0.8 0.6 4 EF IF 4R

TIME (HOURS)

12 14 16 18 20 22

1.5 1.0 0.5

Gain amp vs UTC time for 10173+0828.MULTI.1 SN 2 Rpol & Lpol IF 1 - 8

Plot file version 4 created 18-DEC-2003 12:17:27

4 EF IF 4L 2.0 1.5 1.0 0.5 5 NT IF 1R 0.5 0.4 0.3 0.2 0.1 5 NT IF 1L 0.6 0.4 0.2 0.0 5 NT IF 2R 1.2 1.0 0.8 0.6 0.4 0.2 5 NT IF 3L 1.0 0.5 7 TR IF 1R

Gain

1.5 1.0 0.5 0.0 7 TR IF 1L 1.0 0.5 0.0 7 TR IF 2R 0.6 0.4 0.2 0.0 7 TR IF 2L 0.8 0.7 0.6 0.5 7 TR IF 3R

TIME (HOURS)

12 14 16 18 20 22

1.5 1.0 0.5 0.0

Gain amp vs UTC time for 10173+0828.MULTI.1 SN 2 Rpol & Lpol IF 1 - 8

Plot file version 5 created 18-DEC-2003 12:17:27

7 TR IF 3L 0.8 0.6 0.4 0.2 7 TR IF 4R 1.2 1.0 0.8 0.6 0.4 0.2 7 TR IF 4L

Gain

TIME (HOURS)

12 14 16 18 20 22

1.2 1.0 0.8 0.6

Gain amp vs UTC time for J1008+0621.MULTI.1 SN 2 Rpol & Lpol IF 1 - 8

Plot file version 1 created 18-DEC-2003 12:18:19

1 ON IF 1R 1.2 1.0 0.8 1 ON IF 1L 1.4 1.2 1.0 0.8 0.6 1 ON IF 2R 1.0 0.8 0.6 1 ON IF 2L 1.1 1.0 0.9 0.8 1 ON IF 3R 1.1 1.0 0.9 0.8 0.7 1 ON IF 3L

Gain

1.1 1.0 0.9 0.8 0.7 1 ON IF 4R 1.2 1.0 0.8 1 ON IF 4L 1.1 1.0 0.9 0.8 2 WB IF 1R 1.3 1.2 1.1 1.0 0.9 2 WB IF 1L

TIME (HOURS)

12 14 16 18 20 22

1.3 1.2 1.1 1.0 0.9

Gain amp vs UTC time for J1008+0621.MULTI.1 SN 2 Rpol & Lpol IF 1 - 8

Plot file version 2 created 18-DEC-2003 12:18:19

2 WB IF 2R 1.3 1.2 1.1 1.0 0.9 2 WB IF 2L 1.3 1.2 1.1 1.0 0.9 2 WB IF 3R 1.2 1.1 1.0 2 WB IF 3L 1.4 1.2 1.0 2 WB IF 4R 1.3 1.2 1.1 1.0 2 WB IF 4L

Gain

1.3 1.2 1.1 1.0 3 MC IF 1R 1.8 1.6 1.4 1.2 1.0 0.8 3 MC IF 1L 1.2 1.0 0.8 3 MC IF 2R 1.0 0.8 0.6 0.4 3 MC IF 2L

TIME (HOURS)

12 14 16 18 20 22

1.0 0.9 0.8 0.7

Gain amp vs UTC time for J1008+0621.MULTI.1 SN 2 Rpol & Lpol IF 1 - 8

Plot file version 3 created 18-DEC-2003 12:18:19

3 MC IF 3R 1.4 1.2 1.0 0.8 3 MC IF 3L 1.2 1.0 0.8 3 MC IF 4R 1.1 1.0 0.9 3 MC IF 4L 1.2 1.0 0.8 4 EF IF 1R 1.1 1.0 0.9 4 EF IF 1L

Gain

1.05 1.00 0.95 0.90

4 EF IF 2R

1.00 0.95 0.90 0.85

4 EF IF 2L 1.0 0.9 0.8 4 EF IF 3R

1.05 1.00 0.95 0.90

4 EF IF 3L

TIME (HOURS)

12 14 16 18 20 22

1.05 1.00 0.95 0.90

Gain amp vs UTC time for J1008+0621.MULTI.1 SN 2 Rpol & Lpol IF 1 - 8

Plot file version 4 created 18-DEC-2003 12:18:19

4 EF IF 4R

1.05 1.00 0.95 0.90

4 EF IF 4L

1.05 1.00 0.95 0.90

4 EF IF 7L

1.08 1.06 1.04 1.02 1.00

5 NT IF 1R 1.4 1.2 1.0 0.8 5 NT IF 1L 1.2 1.0 0.8 5 NT IF 2R

Gain

1.4 1.2 1.0 0.8 5 NT IF 3L 1.6 1.4 1.2 1.0 5 NT IF 7L

0.92 0.90 0.88 0.86 0.84 0.82

6 JB IF 1R 1.1 1.0 0.9 6 JB IF 1L

TIME (HOURS)

12 14 16 18 20 22

1.1 1.0 0.9

Gain amp vs UTC time for J1008+0621.MULTI.1 SN 2 Rpol & Lpol IF 1 - 8

Plot file version 5 created 18-DEC-2003 12:18:19

6 JB IF 2R 1.0 0.9 0.8 6 JB IF 2L 1.1 1.0 0.9 0.8 6 JB IF 3R 1.2 1.1 1.0 0.9 6 JB IF 3L 1.4 1.3 1.2 1.1 6 JB IF 4R 1.1 1.0 0.9 0.8 6 JB IF 4L

Gain

1.4 1.3 1.2 7 TR IF 1R 2 1 0 7 TR IF 1L 1.5 1.0 0.5 7 TR IF 2R 3 2 1 0 7 TR IF 2L

TIME (HOURS)

12 14 16 18 20 22

3 2 1 0

Gain amp vs UTC time for 01173+1405.MULTI.1 SN 2 Rpol & Lpol IF 1 - 8

Plot file version 2 created 18-DEC-2003 12:19:14

2 WB IF 2L 3 2 1 2 WB IF 3R 1.5 1.0 0.5 2 WB IF 3L 2.0 1.5 1.0 0.5 2 WB IF 4R 1.5 1.0 0.5 2 WB IF 4L 2.5 2.0 1.5 1.0 0.5 3 MC IF 1R

Gain

1.0 0.5 0.0 3 MC IF 1L 0.6 0.4 0.2 3 MC IF 2R 1.0 0.8 0.6 0.4 0.2 3 MC IF 2L

0.20 0.15 0.10

3 MC IF 3R

TIME (HOURS)

06 08 10 12 14 16 18 20 22 1/00 1/02 1/04 1/06 1/08

0.190 0.185 0.180 0.175

Gain amp vs UTC time for 01173+1405.MULTI.1 SN 2 Rpol & Lpol IF 1 - 8

Plot file version 3 created 18-DEC-2003 12:19:14

3 MC IF 3L

0.910 0.905 0.900 0.895 3 MC IF 4R 1.5 1.0 0.5 0.0 3 MC IF 4L 0.3 0.2 0.1 4 EF IF 1R 3 2 1 4 EF IF 1L 1.4 1.2 1.0 0.8 4 EF IF 2R

Gain

1.4 1.2 1.0 0.8 0.6 4 EF IF 2L 1.6 1.4 1.2 1.0 0.8 0.6 4 EF IF 3R 2.5 2.0 1.5 1.0 0.5 4 EF IF 3L 1.5 1.0 0.5 4 EF IF 4R

TIME (HOURS)

06 08 10 12 14 16 18 20 22 1/00 1/02 1/04 1/06 1/08

1.2 1.0 0.8 0.6 0.4 0.2

Gain amp vs UTC time for 01173+1405.MULTI.1 SN 2 Rpol & Lpol IF 1 - 8

Plot file version 4 created 18-DEC-2003 12:19:14

4 EF IF 4L 2.5 2.0 1.5 1.0 4 EF IF 7L 0.8 0.6 0.4 5 NT IF 1R 0.8 0.6 0.4 0.2 5 NT IF 1L 1.5 1.0 0.5 5 NT IF 2R 1.0 0.8 0.6 0.4 0.2 5 NT IF 2L

Gain

0.6 0.4 0.2 5 NT IF 3L

0.605 0.600 0.595 0.590 5 NT IF 7L 0.4 0.3 0.2 0.1 6 JB IF 1R 2.0 1.5 1.0 0.5 6 JB IF 1L

TIME (HOURS)

06 08 10 12 14 16 18 20 22 1/00 1/02 1/04 1/06 1/08

0.9 0.8 0.7 0.6

Gain amp vs UTC time for 01173+1405.MULTI.1 SN 2 Rpol & Lpol IF 1 - 8

Plot file version 5 created 18-DEC-2003 12:19:14

6 JB IF 2R 1.5 1.0 0.5 6 JB IF 2L 0.9 0.8 0.7 0.6 6 JB IF 3R 1.2 1.0 0.8 0.6 6 JB IF 3L 1.8 1.6 1.4 1.2 1.0 0.8 6 JB IF 4R 1.0 0.8 0.6 6 JB IF 4L

Gain

1.2 1.0 0.8 0.6 0.4 7 TR IF 1R 2 1 0 7 TR IF 1L 0.6 0.4 0.2 7 TR IF 2R 0.8 0.6 0.4 7 TR IF 2L

TIME (HOURS)

06 08 10 12 14 16 18 20 22 1/00 1/02 1/04 1/06 1/08

1.2 1.0 0.8 0.6 0.4

Gain amp vs UTC time for 01173+1405.MULTI.1 SN 2 Rpol & Lpol IF 1 - 8

Plot file version 6 created 18-DEC-2003 12:19:14

7 TR IF 3R 0.5 0.4 0.3 0.2 7 TR IF 3L 2 1 0 7 TR IF 4R 0.3 0.2 0.1 7 TR IF 4L 0.4 0.3 0.2 0.1 7 TR IF 7L 0.6 0.4 0.2 8 CM IF 7L

Gain

TIME (HOURS)

06 08 10 12 14 16 18 20 22 1/00 1/02 1/04 1/06 1/08

0.95

0.90

0.85

Gain amp vs UTC time for J0121+1149.MULTI.1 SN 2 Rpol & Lpol IF 1 - 8

Plot file version 1 created 18-DEC-2003 12:20:03

1 ON IF 1R 1.6 1.4 1.2 1.0 1 ON IF 1L 1.2 1.1 1.0 1 ON IF 2R

1.05 1.00 0.95 0.90 0.85

1 ON IF 2L 1.2 1.1 1.0 0.9 1 ON IF 3R 1.2 1.0 0.8 1 ON IF 3L

Gain

1.2 1.1 1.0 0.9 1 ON IF 4R 1.3 1.2 1.1 1.0 0.9 1 ON IF 4L 1.3 1.2 1.1 1.0 0.9 2 WB IF 1R 1.3 1.2 1.1 1.0 0.9 2 WB IF 1L

TIME (HOURS)

06 08 10 12 14 16 18 20 22 1/00 1/02 1/04 1/06

1.3 1.2 1.1 1.0 0.9

Gain amp vs UTC time for J0121+1149.MULTI.1 SN 2 Rpol & Lpol IF 1 - 8

Plot file version 2 created 18-DEC-2003 12:20:03

2 WB IF 2R 2.5 2.0 1.5 1.0 2 WB IF 2L 2.5 2.0 1.5 1.0 2 WB IF 3R 2.0 1.5 1.0 2 WB IF 3L 2.0 1.5 1.0 2 WB IF 4R 2.5 2.0 1.5 1.0 2 WB IF 4L

Gain

2.5 2.0 1.5 1.0 3 MC IF 1R 2.0 1.5 1.0 3 MC IF 1L 2.0 1.5 1.0 3 MC IF 2R 1.4 1.2 1.0 3 MC IF 2L

TIME (HOURS)

06 08 10 12 14 16 18 20 22 1/00 1/02 1/04 1/06

1.2 1.1 1.0 0.9

Gain amp vs UTC time for J0121+1149.MULTI.1 SN 2 Rpol & Lpol IF 1 - 8

Plot file version 3 created 18-DEC-2003 12:20:03

3 MC IF 3R 1.6 1.4 1.2 1.0 3 MC IF 3L 1.3 1.2 1.1 1.0 0.9 3 MC IF 4R 1.4 1.2 1.0 3 MC IF 4L 1.2 1.0 0.8 4 EF IF 1R 1.1 1.0 0.9 4 EF IF 1L

Gain

1.1 1.0 0.9 4 EF IF 2R 1.1 1.0 0.9 4 EF IF 2L

1.05 1.00 0.95 0.90 0.85

4 EF IF 3R 1.1 1.0 0.9 4 EF IF 3L

TIME (HOURS)

06 08 10 12 14 16 18 20 22 1/00 1/02 1/04 1/06

1.1 1.0 0.9

Gain amp vs UTC time for J0121+1149.MULTI.1 SN 2 Rpol & Lpol IF 1 - 8

Plot file version 4 created 18-DEC-2003 12:20:03

4 EF IF 4R 1.2 1.1 1.0 0.9 4 EF IF 4L 1.1 1.0 0.9 4 EF IF 7L

1.15 1.10 1.05 1.00

5 NT IF 1R 2.0 1.5 1.0 5 NT IF 1L 2.0 1.5 1.0 5 NT IF 2R

Gain

2.0 1.5 1.0 5 NT IF 2L 1.8 1.6 1.4 1.2 5 NT IF 3L 2.0 1.5 1.0 5 NT IF 7L 1.1 1.0 0.9 0.8 6 JB IF 1R

TIME (HOURS)

06 08 10 12 14 16 18 20 22 1/00 1/02 1/04 1/06

1.0 0.9 0.8

Gain amp vs UTC time for J0121+1149.MULTI.1 SN 2 Rpol & Lpol IF 1 - 8

Plot file version 5 created 18-DEC-2003 12:20:03

6 JB IF 1L

0.92 0.90 0.88

6 JB IF 2R

0.85 0.80 0.75 0.70

6 JB IF 2L

0.88 0.86 0.84 0.82 0.80

6 JB IF 3R

0.90 0.85 0.80

6 JB IF 3L

1.25 1.20 1.15 1.10

6 JB IF 4R

Gain

0.90 0.85 0.80 0.75

6 JB IF 4L

1.25 1.20 1.15

7 TR IF 1R 3 2 1 7 TR IF 1L 2.0 1.5 1.0 0.5 7 TR IF 2R

TIME (HOURS)

06 08 10 12 14 16 18 20 22 1/00 1/02 1/04 1/06

2.0 1.5 1.0 0.5

Gain amp vs UTC time for J0121+1149.MULTI.1 SN 2 Rpol & Lpol IF 1 - 8

Plot file version 6 created 18-DEC-2003 12:20:03

7 TR IF 2L 2.0 1.5 1.0 0.5 7 TR IF 3R 2.5 2.0 1.5 1.0 0.5 7 TR IF 3L 3 2 1 0 7 TR IF 4R 2.0 1.5 1.0 0.5 7 TR IF 4L 2.5 2.0 1.5 1.0 0.5 7 TR IF 7L

Gain

2.0 1.5 1.0 8 CM IF 7L

TIME (HOURS)

06 08 10 12 14 16 18 20 22 1/00 1/02 1/04 1/06

1.0 0.9 0.8

Gain amp vs UTC time for UGC2369.MULTI.1 SN 2 Rpol & Lpol IF 1 - 8

Plot file version 1 created 18-DEC-2003 12:20:54

1 ON IF 1R 1.2 1.0 0.8 0.6 1 ON IF 1L 1.2 1.0 0.8 0.6 0.4 1 ON IF 2R 1.5 1.0 0.5 1 ON IF 2L 1.0 0.8 0.6 0.4 0.2 1 ON IF 3R 1.5 1.0 0.5 0.0 1 ON IF 3L

Gain

1.5 1.0 0.5 1 ON IF 4R 0.8 0.6 0.4 0.2 1 ON IF 4L 1.0 0.5 0.0 2 WB IF 1R 1.0 0.8 0.6 2 WB IF 1L

TIME (HOURS)

06 08 10 12 14 16 18 20 22 1/00 1/02 1/04 1/06 1/08

3 2 1

Gain amp vs UTC time for UGC2369.MULTI.1 SN 2 Rpol & Lpol IF 1 - 8

Plot file version 2 created 18-DEC-2003 12:20:54

2 WB IF 2R 1.5 1.0 0.5 2 WB IF 2L 1.2 1.0 0.8 2 WB IF 3R 3 2 1 2 WB IF 3L 2.5 2.0 1.5 1.0 0.5 2 WB IF 4R 1.5 1.0 0.5 2 WB IF 4L

Gain

1.5 1.0 0.5 3 MC IF 1R 1.0 0.8 0.6 0.4 0.2 3 MC IF 1L 1.0 0.8 0.6 0.4 0.2 3 MC IF 2R 1.4 1.2 1.0 0.8 0.6 0.4 3 MC IF 2L

TIME (HOURS)

06 08 10 12 14 16 18 20 22 1/00 1/02 1/04 1/06 1/08

1.4 1.2 1.0 0.8

Gain amp vs UTC time for UGC2369.MULTI.1 SN 2 Rpol & Lpol IF 1 - 8

Plot file version 5 created 18-DEC-2003 12:20:54

6 JB IF 2R 1.0 0.8 0.6 6 JB IF 2L 1.5 1.0 0.5 6 JB IF 3R 1.4 1.2 1.0 0.8 0.6 0.4 6 JB IF 3L 1.5 1.0 0.5 6 JB IF 4R 1.5 1.0 0.5 6 JB IF 4L

Gain

1.5 1.0 7 TR IF 1R 1.2 1.0 0.8 0.6 0.4 0.2 7 TR IF 1L 1.5 1.0 0.5 7 TR IF 2R 1.0 0.5 7 TR IF 2L

TIME (HOURS)

06 08 10 12 14 16 18 20 22 1/00 1/02 1/04 1/06 1/08

1.6 1.4 1.2 1.0 0.8 0.6

Gain amp vs UTC time for UGC2369.MULTI.1 SN 2 Rpol & Lpol IF 1 - 8

Plot file version 6 created 18-DEC-2003 12:20:54

7 TR IF 3R

0.815 0.810 0.805 0.800

7 TR IF 3L

0.52 0.50 0.48 0.46 0.44

7 TR IF 4R 0.8 0.6 0.4 0.2 7 TR IF 4L 1.0 0.8 0.6 0.4 7 TR IF 7L 0.8 0.6 0.4 0.2 8 CM IF 7L

Gain

TIME (HOURS)

06 08 10 12 14 16 18 20 22 1/00 1/02 1/04 1/06 1/08

3 2 1

Gain amp vs UTC time for J0256+1334.MULTI.1 SN 2 Rpol & Lpol IF 1 - 8

Plot file version 1 created 18-DEC-2003 12:21:30

1 ON IF 1R 1.2 1.0 0.8 1 ON IF 1L 1.4 1.2 1.0 1 ON IF 2R 1.0 0.9 0.8 0.7 1 ON IF 2L 1.1 1.0 0.9 1 ON IF 3R 1.2 1.0 0.8 0.6 1 ON IF 3L

Gain

1.8 1.6 1.4 1.2 1.0 0.8 1 ON IF 4R 1.4 1.2 1.0 0.8 0.6 1 ON IF 4L 1.2 1.0 0.8 2 WB IF 1R 1.4 1.2 1.0 2 WB IF 1L

TIME (HOURS)

06 08 10 12 14 16 18 20 22 1/00 1/02 1/04 1/06 1/08

1.6 1.4 1.2 1.0

Gain amp vs UTC time for J0256+1334.MULTI.1 SN 2 Rpol & Lpol IF 1 - 8

Plot file version 2 created 18-DEC-2003 12:21:30

2 WB IF 2R 1.8 1.6 1.4 1.2 1.0 0.8 2 WB IF 2L 2.5 2.0 1.5 1.0 2 WB IF 3R 1.6 1.4 1.2 1.0 2 WB IF 3L 1.3 1.2 1.1 1.0 2 WB IF 4R 1.3 1.2 1.1 1.0 0.9 2 WB IF 4L

Gain

1.2 1.1 1.0 3 MC IF 1R 1.4 1.2 1.0 3 MC IF 1L 1.3 1.2 1.1 1.0 0.9 3 MC IF 2R 1.8 1.6 1.4 1.2 1.0 3 MC IF 2L

TIME (HOURS)

06 08 10 12 14 16 18 20 22 1/00 1/02 1/04 1/06 1/08

1.8 1.6 1.4 1.2 1.0 0.8

Gain amp vs UTC time for J0256+1334.MULTI.1 SN 2 Rpol & Lpol IF 1 - 8

Plot file version 3 created 18-DEC-2003 12:21:30

3 MC IF 3R 1.4 1.2 1.0 3 MC IF 3L 1.6 1.4 1.2 1.0 3 MC IF 4R 1.3 1.2 1.1 1.0 3 MC IF 4L 1.6 1.4 1.2 1.0 4 EF IF 1R 1.2 1.1 1.0 4 EF IF 1L

Gain

1.2 1.1 1.0 0.9 4 EF IF 2R 1.0 0.9 0.8 4 EF IF 2L 1.0 0.9 0.8 4 EF IF 3R 1.1 1.0 0.9 4 EF IF 3L

TIME (HOURS)

06 08 10 12 14 16 18 20 22 1/00 1/02 1/04 1/06 1/08

1.1 1.0 0.9

Gain amp vs UTC time for J0256+1334.MULTI.1 SN 2 Rpol & Lpol IF 1 - 8

Plot file version 4 created 18-DEC-2003 12:21:30

4 EF IF 4R

1.05 1.00 0.95 0.90

4 EF IF 4L

1.05 1.00 0.95 0.90

4 EF IF 7L 1.1 1.0 0.9 5 NT IF 1R 1.6 1.4 1.2 5 NT IF 1L 3.5 3.0 2.5 2.0 1.5 5 NT IF 2R

Gain

1.6 1.4 1.2 5 NT IF 3L 1.8 1.6 1.4 5 NT IF 7L 1.6 1.4 1.2 1.0 0.8 6 JB IF 1R 1.4 1.2 1.0 6 JB IF 1L

TIME (HOURS)

06 08 10 12 14 16 18 20 22 1/00 1/02 1/04 1/06 1/08

1.4 1.2 1.0 0.8

Gain amp vs UTC time for J0256+1334.MULTI.1 SN 2 Rpol & Lpol IF 1 - 8

Plot file version 5 created 18-DEC-2003 12:21:30

6 JB IF 2R 1.0 0.8 0.6 6 JB IF 2L 1.0 0.8 0.6 0.4 6 JB IF 3R

1.05 1.00 0.95

6 JB IF 3L 1.4 1.3 1.2 6 JB IF 4R

1.04 1.02 1.00 0.98 0.96 0.94

6 JB IF 4L

Gain

1.4 1.3 1.2 7 TR IF 1R 2.0 1.5 1.0 7 TR IF 1L 1.8 1.6 1.4 1.2 1.0 0.8 7 TR IF 2R 3 2 1 7 TR IF 2L

TIME (HOURS)

06 08 10 12 14 16 18 20 22 1/00 1/02 1/04 1/06 1/08

2.0 1.5 1.0

Gain amp vs UTC time for J0256+1334.MULTI.1 SN 2 Rpol & Lpol IF 1 - 8

Plot file version 6 created 18-DEC-2003 12:21:30

7 TR IF 3R 1.5 1.0 0.5 7 TR IF 3L 2.0 1.5 1.0 0.5 7 TR IF 4R 2.5 2.0 1.5 1.0 0.5 7 TR IF 4L 1.5 1.0 0.5 7 TR IF 7L 1.7 1.6 1.5 8 CM IF 7L

Gain

TIME (HOURS)

06 08 10 12 14 16 18 20 22 1/00 1/02 1/04 1/06 1/08

1.15 1.10 1.05 1.00 0.95

Gain amp vs UTC time for 03359+1523.MULTI.1 SN 2 Rpol & Lpol IF 1 - 8

Plot file version 1 created 18-DEC-2003 12:22:15

1 ON IF 1L

0.595 0.590 0.585 0.580

1 ON IF 3L

0.25 0.20 0.15 0.10 0.05

1 ON IF 4R 0.4 0.2 0.0 2 WB IF 1R 1.5 1.0 0.5 0.0 2 WB IF 1L 1.2 1.0 0.8 0.6 0.4 2 WB IF 2R

Gain

2.5 2.0 1.5 1.0 0.5 2 WB IF 2L 2.0 1.5 1.0 0.5 2 WB IF 3R 2 1 0 2 WB IF 3L 2.0 1.5 1.0 0.5 2 WB IF 4R

TIME (HOURS)

06 08 10 12 14 16 18 20 22 1/00 1/02 1/04 1/06 1/08

2.0 1.5 1.0 0.5

Gain amp vs UTC time for 03359+1523.MULTI.1 SN 2 Rpol & Lpol IF 1 - 8

Plot file version 2 created 18-DEC-2003 12:22:15

2 WB IF 4L 1.2 1.0 0.8 0.6 0.4 3 MC IF 1R 1.5 1.0 0.5 3 MC IF 1L 0.4 0.3 0.2 0.1 3 MC IF 2R 1.0 0.5 0.0 3 MC IF 2L

0.160 0.155 0.150 0.145

3 MC IF 3R

Gain

0.155 0.150 0.145 0.140

3 MC IF 3L 0.4 0.3 0.2 3 MC IF 4R 0.4 0.2 0.0 3 MC IF 4L

0.585 0.580 0.575 0.570

4 EF IF 1R

TIME (HOURS)

06 08 10 12 14 16 18 20 22 1/00 1/02 1/04 1/06 1/08

1.5 1.0 0.5

Gain amp vs UTC time for 03359+1523.MULTI.1 SN 2 Rpol & Lpol IF 1 - 8

Plot file version 3 created 18-DEC-2003 12:22:15

4 EF IF 1L 1.2 1.0 0.8 0.6 0.4 0.2 4 EF IF 2R 1.5 1.0 0.5 4 EF IF 2L 2.0 1.5 1.0 0.5 4 EF IF 3R 1.2 1.0 0.8 0.6 4 EF IF 3L 1.5 1.0 0.5 0.0 4 EF IF 4R

Gain

2.5 2.0 1.5 1.0 0.5 4 EF IF 4L 1.2 1.0 0.8 0.6 4 EF IF 7L 2.0 1.5 1.0 0.5 5 NT IF 1R 0.5 0.4 0.3 0.2 0.1 5 NT IF 1L

TIME (HOURS)

06 08 10 12 14 16 18 20 22 1/00 1/02 1/04 1/06 1/08

1.0 0.5 0.0

Gain amp vs UTC time for 03359+1523.MULTI.1 SN 2 Rpol & Lpol IF 1 - 8

Plot file version 4 created 18-DEC-2003 12:22:15

5 NT IF 2R 0.4 0.3 0.2 0.1 5 NT IF 2L

0.380 0.375 0.370 0.365

5 NT IF 3L 1.0 0.8 0.6 0.4 0.2 5 NT IF 7L

0.22

0.20

0.18

6 JB IF 1R 1.2 1.0 0.8 0.6 6 JB IF 1L

Gain

1.0 0.8 0.6 6 JB IF 2R 1.5 1.0 0.5 6 JB IF 2L 2.0 1.5 1.0 0.5 6 JB IF 3R 1.1 1.0 0.9 6 JB IF 4R

TIME (HOURS)

06 08 10 12 14 16 18 20 22 1/00 1/02 1/04 1/06 1/08

0.8 0.6 0.4 0.2

Gain amp vs UTC time for 03359+1523.MULTI.1 SN 2 Rpol & Lpol IF 1 - 8

Plot file version 5 created 18-DEC-2003 12:22:15

6 JB IF 4L

0.545 0.540 0.535 0.530

7 TR IF 1R 1.2 1.0 0.8 0.6 0.4 0.2 7 TR IF 1L 1.0 0.8 0.6 0.4 7 TR IF 2R 0.8 0.6 0.4 0.2 7 TR IF 2L

0.18 0.16 0.14 0.12 0.10

7 TR IF 3R

Gain

0.6 0.4 0.2 7 TR IF 3L 4 2 0 7 TR IF 4R

0.40 0.35 0.30

7 TR IF 4L

0.380 0.375 0.370 0.365

7 TR IF 7L

TIME (HOURS)

06 08 10 12 14 16 18 20 22 1/00 1/02 1/04 1/06 1/08

1.0 0.8 0.6 0.4 0.2