Gain phs vs UTC time for J0344+1559.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 1 created 18-DEC-2003 12:15:07

1 ON IF 1R 0 -50 -100 -150

1 ON IF 1L 100 50 0 1 ON IF 2R 150 100 50 0 1 ON IF 2L 150 100 50 0 1 ON IF 3R 100 0 -100 1 ON IF 3L

Degrees

10 0 -10 -20 -30 1 ON IF 4R 100 0 -100 1 ON IF 4L 150 100 50 0 -50 2 WB IF 1R 50 0 -50 -100 -150 2 WB IF 1L

TIME (HOURS)

06 08 10 12 14 16 18 20 22 1/00 1/02 1/04 1/06 1/08

20 0 -20 -40 -60

Gain phs vs UTC time for J0344+1559.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 2 created 18-DEC-2003 12:15:07

2 WB IF 2R 20 0 -20 -40 -60 2 WB IF 2L 150 100 50 0 2 WB IF 3R 50 0 -50 -100

2 WB IF 3L 150 100 50 0 2 WB IF 4R 100 50 0 2 WB IF 4L

Degrees

100 50 0 3 MC IF 1R 150 100 50 0 3 MC IF 1L 100 0 -100

3 MC IF 2R 100 0 -100

3 MC IF 2L

TIME (HOURS)

06 08 10 12 14 16 18 20 22 1/00 1/02 1/04 1/06 1/08

100 0 -100

Gain phs vs UTC time for J0344+1559.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 3 created 18-DEC-2003 12:15:07

3 MC IF 3R 100 0 -100

3 MC IF 3L 100 0 -100

3 MC IF 4R 100 0 -100

3 MC IF 4L 100 0 -100

4 EF IF 1R

0.010 0.005 0.000 -0.005

4 EF IF 1L

Degrees

0.010 0.005 0.000 -0.005

4 EF IF 2R

0.010 0.005 0.000 -0.005

4 EF IF 2L

0.010 0.005 0.000 -0.005

4 EF IF 3R

0.010 0.005 0.000 -0.005

4 EF IF 3L

TIME (HOURS)

06 08 10 12 14 16 18 20 22 1/00 1/02 1/04 1/06 1/08

0.010 0.005 0.000 -0.005

Gain phs vs UTC time for J0344+1559.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 4 created 18-DEC-2003 12:15:07

4 EF IF 4R

0.010 0.005 0.000 -0.005

4 EF IF 4L

0.010 0.005 0.000 -0.005

4 EF IF 6L

0.010 0.005 0.000 -0.005

4 EF IF 7L

0.010 0.005 0.000 -0.005

5 NT IF 1R 100 50 0 -50 5 NT IF 1L

Degrees

50 0 -50 5 NT IF 2R 100 50 0 5 NT IF 2L 20 0 -20 5 NT IF 3L 100 0 -100

5 NT IF 6L

TIME (HOURS)

06 08 10 12 14 16 18 20 22 1/00 1/02 1/04 1/06 1/08

150 100 50 0 -50

Gain phs vs UTC time for J0344+1559.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 5 created 18-DEC-2003 12:15:07

5 NT IF 7L 150 100 50 0 -50 5 NT IF 8R 310 300 290 6 JB IF 1R 30 20 10 0 -10 6 JB IF 1L 30 20 10 0 -10 6 JB IF 2R 30 20 10 0 -10 6 JB IF 2L

Degrees

30 20 10 0 -10 6 JB IF 3R 30 20 10 0 -10 6 JB IF 3L 40 20 0 6 JB IF 4R 30 20 10 0 -10 6 JB IF 4L

TIME (HOURS)

06 08 10 12 14 16 18 20 22 1/00 1/02 1/04 1/06 1/08

30 20 10 0 -10

Gain phs vs UTC time for J0344+1559.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 6 created 18-DEC-2003 12:15:07

7 TR IF 1R 40 20 0 -20 7 TR IF 1L 20 0 -20 -40 7 TR IF 2R 40 20 0 -20 -40 7 TR IF 2L 20 0 -20 7 TR IF 3R 20 0 -20 -40 -60 7 TR IF 3L

Degrees

50 0 -50 -100

7 TR IF 4R 10 0 -10 -20 7 TR IF 4L 40 20 0 -20 -40 -60 7 TR IF 6L 20 0 -20 7 TR IF 7L

TIME (HOURS)

06 08 10 12 14 16 18 20 22 1/00 1/02 1/04 1/06 1/08

60 40 20 0

Gain phs vs UTC time for J0344+1559.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 7 created 18-DEC-2003 12:15:07

7 TR IF 8R -30 -40 -50 -60 8 CM IF 7L 50 0 -50 8 CM IF 8R

Degrees

TIME (HOURS)

06 08 10 12 14 16 18 20 22 1/00 1/02 1/04 1/06 1/08

-44.995 -45.000 -45.005 -45.010

Gain phs vs UTC time for UGC4881.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 1 created 18-DEC-2003 12:15:43

1 ON IF 1R 100 0 -100

1 ON IF 1L 100 0 -100

1 ON IF 2R 350 300 250 200 150 1 ON IF 2L 350 300 250 200 150 1 ON IF 3R 300 200 100 1 ON IF 3L

Degrees

300 200 100 1 ON IF 4R 100 0 -100

1 ON IF 4L 100 0 -100

2 WB IF 1R 100 0 -100

2 WB IF 1L

TIME (HOURS)

12 14 16 18 20 22

100 0 -100 -200

Gain phs vs UTC time for UGC4881.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 2 created 18-DEC-2003 12:15:43

2 WB IF 2R 100 0 -100

2 WB IF 2L 50 0 -50 -100 -150

2 WB IF 3R 0 -50 -100 -150

2 WB IF 3L 300 200 100 0 2 WB IF 4R 200 100 0 -100

2 WB IF 4L

Degrees

100 0 -100

3 MC IF 1R 50 0 -50 3 MC IF 1L 300 200 100 3 MC IF 2R 60 40 20 0 -20 -40 3 MC IF 2L

TIME (HOURS)

12 14 16 18 20 22

50 0 -50 -100 -150

Gain phs vs UTC time for UGC4881.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 3 created 18-DEC-2003 12:15:43

3 MC IF 3R 150 100 50 0 -50 3 MC IF 3L 100 0 -100

3 MC IF 4R 300 200 100 3 MC IF 4L 150 100 50 0 4 EF IF 1R

0.010 0.005 0.000 -0.005

4 EF IF 1L

Degrees

0.010 0.005 0.000 -0.005

4 EF IF 2R

0.010 0.005 0.000 -0.005

4 EF IF 2L

0.010 0.005 0.000 -0.005

4 EF IF 3R

0.010 0.005 0.000 -0.005

4 EF IF 3L

TIME (HOURS)

12 14 16 18 20 22

0.010 0.005 0.000 -0.005

Gain phs vs UTC time for UGC4881.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 4 created 18-DEC-2003 12:15:43

4 EF IF 4R

0.010 0.005 0.000 -0.005

4 EF IF 4L

0.010 0.005 0.000 -0.005

4 EF IF 6L

0.010 0.005 0.000 -0.005

4 EF IF 7L

0.010 0.005 0.000 -0.005

5 NT IF 1R 200 100 0 -100

5 NT IF 1L

Degrees

100 0 -100

5 NT IF 2R 300 200 100 0 5 NT IF 2L 300 200 100 5 NT IF 3L 200 100 0 -100

5 NT IF 6L

TIME (HOURS)

12 14 16 18 20 22

300 200 100 0

Gain phs vs UTC time for UGC4881.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 5 created 18-DEC-2003 12:15:43

5 NT IF 7L 250 200 150 100 6 JB IF 1R 150 100 50 0 -50 6 JB IF 1L 100 0 -100 -200

6 JB IF 2R 100 0 -100

6 JB IF 2L 100 0 -100

6 JB IF 3R

Degrees

100 0 -100

6 JB IF 3L 200 0 -200

6 JB IF 4R 100 0 -100

6 JB IF 4L 100 0 -100

7 TR IF 1R

TIME (HOURS)

12 14 16 18 20 22

100 0 -100 -200

Gain phs vs UTC time for J0920+4441.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 2 created 18-DEC-2003 12:16:41

2 WB IF 2R 1 0 -1 -2 -3 2 WB IF 2L 2 0 -2 2 WB IF 3R 2 0 -2 2 WB IF 3L 0 -2 -4 2 WB IF 4R 8 6 4 2 0 -2 2 WB IF 4L

Degrees

3 2 1 0 -1 3 MC IF 1R 4 2 0 -2 3 MC IF 1L 4 2 0 -2 3 MC IF 2R 4 2 0 -2 3 MC IF 2L

TIME (HOURS)

12 14 16 18 20 22

2 0 -2 -4

Gain phs vs UTC time for J0920+4441.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 3 created 18-DEC-2003 12:16:41

3 MC IF 3R 0 -10 -20 3 MC IF 3L 4 2 0 -2 3 MC IF 4R 5 0 -5 -10 -15 3 MC IF 4L 5 0 -5 4 EF IF 1R

0.010 0.005 0.000 -0.005

4 EF IF 1L

Degrees

0.010 0.005 0.000 -0.005

4 EF IF 2R

0.010 0.005 0.000 -0.005

4 EF IF 2L

0.010 0.005 0.000 -0.005

4 EF IF 3R

0.010 0.005 0.000 -0.005

4 EF IF 3L

TIME (HOURS)

12 14 16 18 20 22

0.010 0.005 0.000 -0.005

Gain phs vs UTC time for J0920+4441.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 4 created 18-DEC-2003 12:16:41

4 EF IF 4R

0.010 0.005 0.000 -0.005

4 EF IF 4L

0.010 0.005 0.000 -0.005

4 EF IF 6L

0.010 0.005 0.000 -0.005

4 EF IF 7L

0.010 0.005 0.000 -0.005

5 NT IF 1R 2 0 -2 -4 -6 -8 5 NT IF 1L

Degrees

0 -5 -10 5 NT IF 2R 2 0 -2 -4 -6 -8 5 NT IF 2L 2 0 -2 5 NT IF 3L 0 -5 -10 -15 5 NT IF 6L

TIME (HOURS)

12 14 16 18 20 22

150 100 50 0

Gain phs vs UTC time for J0920+4441.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 5 created 18-DEC-2003 12:16:41

5 NT IF 7L 150 100 50 0 6 JB IF 1R 1 0 -1 -2 6 JB IF 1L 0 -2 -4 6 JB IF 2R 2 0 -2 -4 -6 6 JB IF 2L 5 0 -5 6 JB IF 3R

Degrees

1 0 -1 6 JB IF 3L 1 0 -1 -2 -3 6 JB IF 4R 10 5 0 6 JB IF 4L 3 2 1 0 -1 7 TR IF 1R

TIME (HOURS)

12 14 16 18 20 22

5 0 -5

Gain phs vs UTC time for J0920+4441.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 6 created 18-DEC-2003 12:16:41

7 TR IF 1L 5 0 -5 7 TR IF 2R 5 0 -5 7 TR IF 2L 5 0 -5 7 TR IF 3R 5 0 -5 -10 -15 7 TR IF 3L 5 0 -5 -10 7 TR IF 4R

Degrees

10 0 -10 -20 -30 7 TR IF 4L 5 0 -5 7 TR IF 6L 150 100 50 0 7 TR IF 7L 150 100 50 0 -50 8 CM IF 7L

TIME (HOURS)

12 14 16 18 20 22

0 -20 -40 -60

Gain phs vs UTC time for 10173+0828.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 1 created 18-DEC-2003 12:17:09

1 ON IF 1R 100 0 -100

1 ON IF 1L 300 200 100 0 1 ON IF 2R 300 200 100 0 1 ON IF 2L 300 200 100 1 ON IF 3R 100 0 -100

1 ON IF 3L

Degrees

100 0 -100

1 ON IF 4R 100 0 -100

1 ON IF 4L 200 100 0 -100

2 WB IF 1R 50 0 -50 -100

2 WB IF 1L

TIME (HOURS)

12 14 16 18 20 22

50 0 -50 -100 -150

Gain phs vs UTC time for 10173+0828.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 2 created 18-DEC-2003 12:17:09

2 WB IF 2R 100 0 -100

2 WB IF 2L 100 0 -100

2 WB IF 3R 100 0 -100 -200

2 WB IF 3L 200 0 -200

2 WB IF 4R 100 0 -100

2 WB IF 4L

Degrees

100 0 -100 -200

3 MC IF 1R 100 0 -100

3 MC IF 1L 300 200 100 0 3 MC IF 2R 200 100 0 -100

3 MC IF 2L

TIME (HOURS)

12 14 16 18 20 22

300 200 100 0

Gain phs vs UTC time for 10173+0828.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 3 created 18-DEC-2003 12:17:09

3 MC IF 3R 300 200 100 0 3 MC IF 3L 200 0 -200

3 MC IF 4R 100 0 -100 -200

3 MC IF 4L 100 0 -100

4 EF IF 1R

0.010 0.005 0.000 -0.005

4 EF IF 1L

Degrees

0.010 0.005 0.000 -0.005

4 EF IF 2R

0.010 0.005 0.000 -0.005

4 EF IF 2L

0.010 0.005 0.000 -0.005

4 EF IF 3R

0.010 0.005 0.000 -0.005

4 EF IF 3L

TIME (HOURS)

12 14 16 18 20 22

0.010 0.005 0.000 -0.005

Gain phs vs UTC time for 10173+0828.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 4 created 18-DEC-2003 12:17:09

4 EF IF 4R

0.010 0.005 0.000 -0.005

4 EF IF 4L

0.010 0.005 0.000 -0.005

4 EF IF 6L

0.010 0.005 0.000 -0.005

4 EF IF 7L

0.010 0.005 0.000 -0.005

5 NT IF 1R 100 0 -100 -200

5 NT IF 1L

Degrees

100 0 -100

5 NT IF 2R 100 0 -100

5 NT IF 3L 0 -100

-200

5 NT IF 6L 300 200 100 0 5 NT IF 7L

TIME (HOURS)

12 14 16 18 20 22

200 100 0 -100

Gain phs vs UTC time for 10173+0828.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 5 created 18-DEC-2003 12:17:09

7 TR IF 1R 100 0 -100

7 TR IF 1L 150 100 50 0 -50 7 TR IF 2R 100 0 -100

7 TR IF 2L 200 100 0 -100

7 TR IF 3R 300 200 100 7 TR IF 3L

Degrees

100 0 -100

7 TR IF 4R 200 100 0 -100

7 TR IF 4L 300 200 100 7 TR IF 6L 200 0 -200

7 TR IF 7L

TIME (HOURS)

12 14 16 18 20 22

200 100 0 -100

Gain phs vs UTC time for J1008+0621.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 1 created 18-DEC-2003 12:18:04

1 ON IF 1R 150 100 50 0 -50 1 ON IF 1L 200 100 0 1 ON IF 2R 100 50 0 -50 1 ON IF 2L 100 0 -100

1 ON IF 3R 50 0 -50 1 ON IF 3L

Degrees

50 0 -50 -100

1 ON IF 4R 100 50 0 -50 1 ON IF 4L 50 0 -50 2 WB IF 1R 1 0 -1 -2 2 WB IF 1L

TIME (HOURS)

12 14 16 18 20 22

1 0 -1 -2

Gain phs vs UTC time for J1008+0621.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 2 created 18-DEC-2003 12:18:04

2 WB IF 2R 2 1 0 -1 2 WB IF 2L 4 2 0 -2 2 WB IF 3R 1 0 -1 -2 2 WB IF 3L 1 0 -1 2 WB IF 4R 2 1 0 2 WB IF 4L

Degrees

2 1 0 3 MC IF 1R 100 0 -100

3 MC IF 1L 150 100 50 0 3 MC IF 2R 50 0 -50 -100 -150

3 MC IF 2L

TIME (HOURS)

12 14 16 18 20 22

50 0 -50 -100

Gain phs vs UTC time for J1008+0621.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 3 created 18-DEC-2003 12:18:04

3 MC IF 3R 150 100 50 0 -50 3 MC IF 3L 200 100 0 3 MC IF 4R 50 0 -50 -100 -150

3 MC IF 4L 0 -50 -100 -150

4 EF IF 1R

0.010 0.005 0.000 -0.005

4 EF IF 1L

Degrees

0.010 0.005 0.000 -0.005

4 EF IF 2R

0.010 0.005 0.000 -0.005

4 EF IF 2L

0.010 0.005 0.000 -0.005

4 EF IF 3R

0.010 0.005 0.000 -0.005

4 EF IF 3L

TIME (HOURS)

12 14 16 18 20 22

0.010 0.005 0.000 -0.005

Gain phs vs UTC time for J1008+0621.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 6 created 18-DEC-2003 12:18:05

7 TR IF 2R 40 20 0 7 TR IF 2L 40 20 0 7 TR IF 3R 60 40 20 0 7 TR IF 3L 60 40 20 0 7 TR IF 4R 80 60 40 20 0 7 TR IF 4L

Degrees

80 60 40 20 0 7 TR IF 6L 6 4 2 0 -2 -4 7 TR IF 7L 5 0 -5 8 CM IF 7L

TIME (HOURS)

12 14 16 18 20 22

40 20 0

Gain phs vs UTC time for 01173+1405.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 1 created 18-DEC-2003 12:18:39

1 ON IF 1R 100 0 -100 -200 1 ON IF 1L 150 100 50 0 -50 1 ON IF 2R 200 100 0 -100 1 ON IF 2L 300 200 100 0 1 ON IF 3R 100 0 -100

1 ON IF 3L

Degrees

100 0 -100 1 ON IF 4R 150 100 50 0 -50 1 ON IF 4L 100 0 -100 2 WB IF 1R 100 0 -100 -200 2 WB IF 1L

TIME (HOURS)

06 08 10 12 14 16 18 20 22 1/00 1/02 1/04 1/06 1/08

100 0 -100

Gain phs vs UTC time for 01173+1405.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 2 created 18-DEC-2003 12:18:39

2 WB IF 2R 100 0 -100 -200 2 WB IF 2L 100 0 -100

2 WB IF 3R 200 100 0 -100 2 WB IF 3L 100 0 -100

2 WB IF 4R 100 0 -100 2 WB IF 4L

Degrees

100 0 -100

3 MC IF 1R 100 0 -100 -200 3 MC IF 1L 100 50 0 -50 3 MC IF 2R 100 0 -100 3 MC IF 2L

TIME (HOURS)

06 08 10 12 14 16 18 20 22 1/00 1/02 1/04 1/06 1/08

100 0 -100

Gain phs vs UTC time for 01173+1405.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 3 created 18-DEC-2003 12:18:39

3 MC IF 3R 300 200 100 0 3 MC IF 3L 100 0 -100 -200

3 MC IF 4R 300 200 100 0 3 MC IF 4L 100 0 -100

4 EF IF 1R

0.010 0.005 0.000 -0.005

4 EF IF 1L

Degrees

0.010 0.005 0.000 -0.005

4 EF IF 2R

0.010 0.005 0.000 -0.005

4 EF IF 2L

0.010 0.005 0.000 -0.005

4 EF IF 3R

0.010 0.005 0.000 -0.005

4 EF IF 3L

TIME (HOURS)

06 08 10 12 14 16 18 20 22 1/00 1/02 1/04 1/06 1/08

0.010 0.005 0.000 -0.005

Gain phs vs UTC time for 01173+1405.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 4 created 18-DEC-2003 12:18:39

4 EF IF 4R

0.010 0.005 0.000 -0.005

4 EF IF 4L

0.010 0.005 0.000 -0.005

4 EF IF 6L

0.010 0.005 0.000 -0.005

4 EF IF 7L

0.010 0.005 0.000 -0.005

5 NT IF 1R 100 0 -100

5 NT IF 1L

Degrees

100 0 -100

5 NT IF 2R 200 100 0 -100

5 NT IF 2L 300 200 100 5 NT IF 3L 100 0 -100 -200

5 NT IF 6L

TIME (HOURS)

06 08 10 12 14 16 18 20 22 1/00 1/02 1/04 1/06 1/08

140 120 100 80

Gain phs vs UTC time for 01173+1405.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 5 created 18-DEC-2003 12:18:39

5 NT IF 7L 200 100 0 -100

6 JB IF 1R 200 0 -200

6 JB IF 1L 0 -100

-200

6 JB IF 2R 50 0 -50 6 JB IF 2L 50 0 -50 -100

6 JB IF 3R

Degrees

50 0 -50 -100 -150

6 JB IF 3L 150 100 50 0 -50 6 JB IF 4R 50 0 -50 -100 -150

6 JB IF 4L 50 0 -50 7 TR IF 1R

TIME (HOURS)

06 08 10 12 14 16 18 20 22 1/00 1/02 1/04 1/06 1/08

200 100 0 -100

Gain phs vs UTC time for 01173+1405.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 6 created 18-DEC-2003 12:18:39

7 TR IF 1L 300 200 100 0 7 TR IF 2R 300 200 100 0 7 TR IF 2L 100 0 -100

7 TR IF 3R 200 100 0 -100

7 TR IF 3L 100 0 -100

7 TR IF 4R

Degrees

300 200 100 0 7 TR IF 4L 100 0 -100

7 TR IF 6L -50 -100 -150

7 TR IF 7L 300 200 100 8 CM IF 7L

TIME (HOURS)

06 08 10 12 14 16 18 20 22 1/00 1/02 1/04 1/06 1/08

100 0 -100

Gain phs vs UTC time for J0121+1149.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 1 created 18-DEC-2003 12:19:42

1 ON IF 1R 150 100 50 0 1 ON IF 1L 80 60 40 20 0 1 ON IF 2R 60 40 20 0 1 ON IF 2L 50 0 -50 -100

1 ON IF 3R 30 20 10 0 -10 1 ON IF 3L

Degrees

60 40 20 0 1 ON IF 4R 50 0 -50 1 ON IF 4L 150 100 50 0 2 WB IF 1R 40 20 0 2 WB IF 1L

TIME (HOURS)

06 08 10 12 14 16 18 20 22 1/00 1/02 1/04 1/06

0 -10 -20

Gain phs vs UTC time for J0121+1149.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 2 created 18-DEC-2003 12:19:42

2 WB IF 2R 0 -50 -100

2 WB IF 2L 4 2 0 -2 2 WB IF 3R 100 0 -100

2 WB IF 3L 100 50 0 -50 2 WB IF 4R 0 -50 -100

2 WB IF 4L

Degrees

0 -50 -100

3 MC IF 1R 50 0 -50 -100 -150

3 MC IF 1L 50 0 -50 -100 -150

3 MC IF 2R 100 50 0 -50 3 MC IF 2L

TIME (HOURS)

06 08 10 12 14 16 18 20 22 1/00 1/02 1/04 1/06

50 0 -50

Gain phs vs UTC time for J0121+1149.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 3 created 18-DEC-2003 12:19:42

3 MC IF 3R 150 100 50 0 3 MC IF 3L 100 0 -100

3 MC IF 4R 40 20 0 -20 -40 3 MC IF 4L 100 50 0 4 EF IF 1R

0.010 0.005 0.000 -0.005

4 EF IF 1L

Degrees

0.010 0.005 0.000 -0.005

4 EF IF 2R

0.010 0.005 0.000 -0.005

4 EF IF 2L

0.010 0.005 0.000 -0.005

4 EF IF 3R

0.010 0.005 0.000 -0.005

4 EF IF 3L

TIME (HOURS)

06 08 10 12 14 16 18 20 22 1/00 1/02 1/04 1/06

0.010 0.005 0.000 -0.005

Gain phs vs UTC time for J0121+1149.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 4 created 18-DEC-2003 12:19:42

4 EF IF 4R

0.010 0.005 0.000 -0.005

4 EF IF 4L

0.010 0.005 0.000 -0.005

4 EF IF 6L

0.010 0.005 0.000 -0.005

4 EF IF 7L

0.010 0.005 0.000 -0.005

5 NT IF 1R 100 0 -100 -200

5 NT IF 1L

Degrees

150 100 50 0 5 NT IF 2R 80 60 40 20 0 5 NT IF 2L 60 40 20 0 -20 5 NT IF 3L 100 0 -100

5 NT IF 6L

TIME (HOURS)

06 08 10 12 14 16 18 20 22 1/00 1/02 1/04 1/06

0 -20 -40 -60

Gain phs vs UTC time for J0121+1149.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 5 created 18-DEC-2003 12:19:42

5 NT IF 7L 100 0 -100

5 NT IF 8R

-44.995 -45.000 -45.005 -45.010

6 JB IF 1R 1 0 -1 6 JB IF 1L 0 -50 -100 -150

6 JB IF 2R 1 0 -1 -2 -3 6 JB IF 2L

Degrees

0 -2 -4 6 JB IF 3R 150 100 50 0 6 JB IF 3L 0 -50 -100 -150

6 JB IF 4R 1 0 -1 -2 -3 6 JB IF 4L

TIME (HOURS)

06 08 10 12 14 16 18 20 22 1/00 1/02 1/04 1/06

0 -2 -4

Gain phs vs UTC time for J0121+1149.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 6 created 18-DEC-2003 12:19:42

7 TR IF 1R 100 0 -100

7 TR IF 1L 100 0 -100

7 TR IF 2R 100 0 -100

7 TR IF 2L 20 10 0 -10 7 TR IF 3R 50 0 -50 -100

7 TR IF 3L

Degrees

100 0 -100

7 TR IF 4R 50 0 -50 -100

7 TR IF 4L 100 0 -100

7 TR IF 6L 0 -10 -20 7 TR IF 7L

TIME (HOURS)

06 08 10 12 14 16 18 20 22 1/00 1/02 1/04 1/06

100 50 0 -50

Gain phs vs UTC time for UGC2369.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 2 created 18-DEC-2003 12:20:27

2 WB IF 2R 100 0 -100

2 WB IF 2L 200 100 0 -100

2 WB IF 3R 100 0 -100 -200 2 WB IF 3L 200 0 -200 2 WB IF 4R 100 0 -100

2 WB IF 4L

Degrees

100 0 -100

3 MC IF 1R 100 0 -100

3 MC IF 1L 50 0 -50 -100 -150 3 MC IF 2R 100 0 -100

3 MC IF 2L

TIME (HOURS)

06 08 10 12 14 16 18 20 22 1/00 1/02 1/04 1/06 1/08

100 50 0 -50

Gain phs vs UTC time for UGC2369.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 3 created 18-DEC-2003 12:20:27

3 MC IF 3R 40 20 0 -20 -40 3 MC IF 3L 100 50 0 -50 3 MC IF 4R 100 50 0 -50 3 MC IF 4L 50 0 -50 -100

4 EF IF 1R

0.010 0.005 0.000 -0.005

4 EF IF 1L

Degrees

0.010 0.005 0.000 -0.005

4 EF IF 2R

0.010 0.005 0.000 -0.005

4 EF IF 2L

0.010 0.005 0.000 -0.005

4 EF IF 3R

0.010 0.005 0.000 -0.005

4 EF IF 3L

TIME (HOURS)

06 08 10 12 14 16 18 20 22 1/00 1/02 1/04 1/06 1/08

0.010 0.005 0.000 -0.005

Gain phs vs UTC time for UGC2369.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 4 created 18-DEC-2003 12:20:27

4 EF IF 4R

0.010 0.005 0.000 -0.005

4 EF IF 4L

0.010 0.005 0.000 -0.005

4 EF IF 6L

0.010 0.005 0.000 -0.005

4 EF IF 7L

0.010 0.005 0.000 -0.005

5 NT IF 1R 300 200 100 0 5 NT IF 1L

Degrees

100 0 -100 -200 5 NT IF 2R 100 0 -100 -200 5 NT IF 2L 270 260 250 240 5 NT IF 3L 300 200 100 0 5 NT IF 6L

TIME (HOURS)

06 08 10 12 14 16 18 20 22 1/00 1/02 1/04 1/06 1/08

300 200 100 0

Gain phs vs UTC time for UGC2369.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 5 created 18-DEC-2003 12:20:27

5 NT IF 7L 300 200 100 0 5 NT IF 8R 200 100 0 -100

6 JB IF 1R 50 0 -50 6 JB IF 1L 60 40 20 0 -20 -40 6 JB IF 2R 100 50 0 6 JB IF 2L

Degrees

40 20 0 -20 6 JB IF 3R 100 50 0 -50 6 JB IF 3L 100 50 0 -50 6 JB IF 4R 150 100 50 0 -50 6 JB IF 4L

TIME (HOURS)

06 08 10 12 14 16 18 20 22 1/00 1/02 1/04 1/06 1/08

50 0 -50

Gain phs vs UTC time for UGC2369.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 6 created 18-DEC-2003 12:20:27

7 TR IF 1R 100 0 -100 -200 7 TR IF 1L 300 200 100 0 7 TR IF 2R 300 200 100 0 7 TR IF 2L 100 0 -100

7 TR IF 3R 100 0 -100 7 TR IF 3L

Degrees

200 0 -200 7 TR IF 4R 100 0 -100 7 TR IF 4L 100 0 -100

7 TR IF 6L 100 0 -100

7 TR IF 7L

TIME (HOURS)

06 08 10 12 14 16 18 20 22 1/00 1/02 1/04 1/06 1/08

100 0 -100

Gain phs vs UTC time for UGC2369.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 7 created 18-DEC-2003 12:20:27

7 TR IF 8R 100 0 -100

8 CM IF 7L 300 200 100 0 8 CM IF 8R

Degrees

TIME (HOURS)

06 08 10 12 14 16 18 20 22 1/00 1/02 1/04 1/06 1/08

320 310 300 290

Gain phs vs UTC time for J0256+1334.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 1 created 18-DEC-2003 12:21:13

1 ON IF 1R 40 20 0 -20 1 ON IF 1L 60 40 20 0 1 ON IF 2R 10 0 -10 1 ON IF 2L 10 5 0 1 ON IF 3R 0 -50 -100 -150

1 ON IF 3L

Degrees

0 -50 -100 -150

1 ON IF 4R 150 100 50 0 1 ON IF 4L 40 20 0 2 WB IF 1R 0 -50 -100

2 WB IF 1L

TIME (HOURS)

06 08 10 12 14 16 18 20 22 1/00 1/02 1/04 1/06 1/08

0 -50 -100

Gain phs vs UTC time for J0256+1334.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 2 created 18-DEC-2003 12:21:13

2 WB IF 2R 0 -10 -20 2 WB IF 2L 0 -50 -100 -150

2 WB IF 3R 50 0 -50 -100 -150

2 WB IF 3L 0 -50 -100

2 WB IF 4R 0 -50 -100 -150

2 WB IF 4L

Degrees

0 -50 -100 -150

3 MC IF 1R 100 50 0 3 MC IF 1L 80 60 40 20 0 3 MC IF 2R 150 100 50 0 3 MC IF 2L

TIME (HOURS)

06 08 10 12 14 16 18 20 22 1/00 1/02 1/04 1/06 1/08

2 0 -2 -4 -6 -8

Gain phs vs UTC time for J0256+1334.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 3 created 18-DEC-2003 12:21:13

3 MC IF 3R 100 50 0 3 MC IF 3L 150 100 50 0 3 MC IF 4R 80 60 40 20 0 3 MC IF 4L 0 -10 -20 -30 4 EF IF 1R

0.010 0.005 0.000 -0.005

4 EF IF 1L

Degrees

0.010 0.005 0.000 -0.005

4 EF IF 2R

0.010 0.005 0.000 -0.005

4 EF IF 2L

0.010 0.005 0.000 -0.005

4 EF IF 3R

0.010 0.005 0.000 -0.005

4 EF IF 3L

TIME (HOURS)

06 08 10 12 14 16 18 20 22 1/00 1/02 1/04 1/06 1/08

0.010 0.005 0.000 -0.005

Gain phs vs UTC time for J0256+1334.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 4 created 18-DEC-2003 12:21:13

4 EF IF 4R

0.010 0.005 0.000 -0.005

4 EF IF 4L

0.010 0.005 0.000 -0.005

4 EF IF 6L

0.010 0.005 0.000 -0.005

4 EF IF 7L

0.010 0.005 0.000 -0.005

5 NT IF 1R 20 0 -20 -40 5 NT IF 1L

Degrees

20 0 -20 -40 -60 5 NT IF 2R 40 20 0 -20 -40 -60 5 NT IF 2L

-0.115 -0.120 -0.125 -0.130

5 NT IF 3L 100 0 -100

5 NT IF 6L

TIME (HOURS)

06 08 10 12 14 16 18 20 22 1/00 1/02 1/04 1/06 1/08

20 0 -20 -40 -60

Gain phs vs UTC time for J0256+1334.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 5 created 18-DEC-2003 12:21:13

5 NT IF 7L 30 20 10 0 -10 5 NT IF 8R 100 0 -100

6 JB IF 1R 10 0 -10 6 JB IF 1L 10 5 0 -5 6 JB IF 2R 10 0 -10 -20 6 JB IF 2L

Degrees

10 5 0 -5 6 JB IF 3R 10 0 -10 -20 6 JB IF 3L 0 -10 -20 6 JB IF 4R 10 0 -10 -20 6 JB IF 4L

TIME (HOURS)

06 08 10 12 14 16 18 20 22 1/00 1/02 1/04 1/06 1/08

10 5 0 -5

Gain phs vs UTC time for J0256+1334.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 6 created 18-DEC-2003 12:21:13

7 TR IF 1R 60 40 20 0 7 TR IF 1L 10 0 -10 7 TR IF 2R 150 100 50 0 7 TR IF 2L 5 0 -5 7 TR IF 3R 20 0 -20 7 TR IF 3L

Degrees

10 0 -10 -20 7 TR IF 4R 0 -50 -100 -150

7 TR IF 4L 10 5 0 -5 7 TR IF 6L 20 10 0 -10 7 TR IF 7L

TIME (HOURS)

06 08 10 12 14 16 18 20 22 1/00 1/02 1/04 1/06 1/08

4 2 0 -2 -4 -6

Gain phs vs UTC time for J0256+1334.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 7 created 18-DEC-2003 12:21:13

7 TR IF 8R 340 330 320 310 8 CM IF 7L 10 0 -10 8 CM IF 8R

Degrees

TIME (HOURS)

06 08 10 12 14 16 18 20 22 1/00 1/02 1/04 1/06 1/08

350 300 250 200 150

Gain phs vs UTC time for 03359+1523.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 3 created 18-DEC-2003 12:21:48

3 MC IF 3L 300 200 100 0 3 MC IF 4R 300 200 100 0 3 MC IF 4L 100 0 -100 -200 4 EF IF 1R

0.010 0.005 0.000 -0.005

4 EF IF 1L

0.010 0.005 0.000 -0.005

4 EF IF 2R

Degrees

0.010 0.005 0.000 -0.005

4 EF IF 2L

0.010 0.005 0.000 -0.005

4 EF IF 3R

0.010 0.005 0.000 -0.005

4 EF IF 3L

0.010 0.005 0.000 -0.005

4 EF IF 4R

TIME (HOURS)

06 08 10 12 14 16 18 20 22 1/00 1/02 1/04 1/06 1/08

0.010 0.005 0.000 -0.005

Gain phs vs UTC time for 03359+1523.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 4 created 18-DEC-2003 12:21:48

4 EF IF 4L

0.010 0.005 0.000 -0.005

4 EF IF 6L

0.010 0.005 0.000 -0.005

4 EF IF 7L

0.010 0.005 0.000 -0.005

5 NT IF 1R 300 200 100 0 5 NT IF 1L 200 100 0 -100 5 NT IF 2R

Degrees

100 0 -100 5 NT IF 2L 100 50 0 5 NT IF 3L 100 0 -100

5 NT IF 6L 100 0 -100

5 NT IF 7L

TIME (HOURS)

06 08 10 12 14 16 18 20 22 1/00 1/02 1/04 1/06 1/08

100 0 -100 -200

Gain phs vs UTC time for 03359+1523.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 5 created 18-DEC-2003 12:21:48

5 NT IF 8R 50 0 -50 6 JB IF 1R 100 0 -100

6 JB IF 1L 150 100 50 0 -50 6 JB IF 2R 100 0 -100 6 JB IF 2L 100 0 -100 6 JB IF 3R

Degrees

100 0 -100

6 JB IF 3L 50 0 -50 -100 -150

6 JB IF 4R 50 0 -50 -100 -150 6 JB IF 4L 300 200 100 0 7 TR IF 1R

TIME (HOURS)

06 08 10 12 14 16 18 20 22 1/00 1/02 1/04 1/06 1/08

300 200 100 0

Gain phs vs UTC time for 03359+1523.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 6 created 18-DEC-2003 12:21:48

7 TR IF 1L 300 200 100 0 7 TR IF 2R 300 200 100 0 7 TR IF 2L 200 100 0 -100

7 TR IF 3R 300 200 100 0 7 TR IF 3L 200 100 0 -100

7 TR IF 4R

Degrees

100 0 -100 -200 7 TR IF 4L 300 200 100 0 7 TR IF 6L 100 0 -100 -200 7 TR IF 7L 300 200 100 7 TR IF 8R

TIME (HOURS)

06 08 10 12 14 16 18 20 22 1/00 1/02 1/04 1/06 1/08

320 300 280 260 240 220

Gain phs vs UTC time for 03359+1523.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 7 created 18-DEC-2003 12:21:48

8 CM IF 7L 100 0 -100 -200 8 CM IF 8R

Degrees

TIME (HOURS)

06 08 10 12 14 16 18 20 22 1/00 1/02 1/04 1/06 1/08

150 100 50 0 -50