Center at RA 01 21 41.59504 DEC 11 49 50.4131

CONT: J0121+11 IPOL 1634.021 MHZ J0121+1149.IIM001.2

PLot file version 1 created 18-DEC-2003 14:41:33

Cont peak flux = 1.2196E+00 JY/BEAM Levs = 1.220E+00 * (-0.212, 0.212, 0.424, 0.847)

MilliARC SEC

MilliARC SEC

200 100 0 -100 -200

250

200

150

100

50

0

-50

-100

-150

-200

-250