Center at RA 09 20 58.45848 DEC 44 41 53.9850

CONT: J0920+44 IPOL 1634.021 MHZ J0920+4441.IIM001.2

PLot file version 1 created 18-DEC-2003 14:40:51

Cont peak flux = 1.0511E+00 JY/BEAM Levs = 1.051E+00 * (-0.239, 0.239, 0.478, 0.956)

MilliARC SEC

MilliARC SEC

200 100 0 -100 -200

250

200

150

100

50

0

-50

-100

-150

-200

-250