Center at RA 11 04 27.31394 DEC 38 12 31.7992

CONT: J1104+38 IPOL 1634.021 MHZ J1104+3812.ICL001.5

PLot file version 1 created 18-DEC-2003 15:44:18

Cont peak flux = 4.3011E-01 JY/BEAM Levs = 4.301E-01 * (-0.032, 0.032, 0.065, 0.130, 0.260, 0.519)

MilliARC SEC

MilliARC SEC

200 100 0 -100 -200

250

200

150

100

50

0

-50

-100

-150

-200

-250