Gain amp vs UTC time for MRK848.MULTI.1 SN 2 Rpol & Lpol IF 1 - 8

Plot file version 1 created 18-DEC-2003 15:39:29

1 ON IF 1R

0.40 0.35 0.30 0.25

1 ON IF 1L

0.35 0.30 0.25 0.20

1 ON IF 2R 0.4 0.2 0.0 1 ON IF 2L 0.8 0.6 0.4 0.2 0.0 1 ON IF 3R 0.4 0.3 0.2 0.1 1 ON IF 3L

Gain

0.35 0.30 0.25 0.20

1 ON IF 4R

0.110 0.105 0.100 0.095

1 ON IF 4L

0.170 0.165 0.160 0.155

2 WB IF 1R 0.8 0.6 0.4 2 WB IF 1L

TIME (HOURS)

18 20 22 1/00 1/02

1.0 0.5

Gain amp vs UTC time for MRK848.MULTI.1 SN 2 Rpol & Lpol IF 1 - 8

Plot file version 2 created 18-DEC-2003 15:39:29

2 WB IF 2R 2.0 1.5 1.0 0.5 2 WB IF 2L 2.0 1.5 1.0 0.5 2 WB IF 3R 1.0 0.8 0.6 2 WB IF 3L 2.0 1.5 1.0 0.5 2 WB IF 4R 2.0 1.5 1.0 0.5 2 WB IF 4L

Gain

1.4 1.2 1.0 0.8 0.6 0.4 3 MC IF 1R

0.37 0.36 0.35 0.34

3 MC IF 2R

0.60 0.55 0.50 0.45

3 MC IF 2L 0.6 0.4 0.2 3 MC IF 3R

TIME (HOURS)

18 20 22 1/00 1/02

0.090 0.085 0.080 0.075

Gain amp vs UTC time for MRK848.MULTI.1 SN 2 Rpol & Lpol IF 1 - 8

Plot file version 3 created 18-DEC-2003 15:39:29

3 MC IF 3L

0.650 0.645 0.640 0.635 3 MC IF 4L 1.0 0.8 0.6 0.4 0.2 4 EF IF 1R 1.5 1.0 0.5 4 EF IF 1L 1.5 1.0 0.5 4 EF IF 2R 1.5 1.0 0.5 4 EF IF 2L

Gain

2.0 1.5 1.0 0.5 4 EF IF 3R 1.2 1.0 0.8 0.6 4 EF IF 3L 1.6 1.4 1.2 1.0 0.8 0.6 4 EF IF 4R 1.0 0.8 0.6 4 EF IF 4L

TIME (HOURS)

18 20 22 1/00 1/02

1.2 1.0 0.8 0.6

Gain amp vs UTC time for MRK848.MULTI.1 SN 2 Rpol & Lpol IF 1 - 8

Plot file version 4 created 18-DEC-2003 15:39:29

4 EF IF 7L 1.0 0.8 0.6 0.4 5 NT IF 1L 1.0 0.8 0.6 0.4 5 NT IF 2R

1.515 1.510 1.505 1.500

5 NT IF 3L

0.38 0.36 0.34 0.32 0.30 0.28

5 NT IF 7L 0.7 0.6 0.5 0.4 6 JB IF 1R

Gain

0.8 0.6 0.4 0.2 6 JB IF 1L 0.8 0.6 0.4 6 JB IF 2R 1.0 0.5 6 JB IF 2L 1.2 1.0 0.8 0.6 0.4 0.2 6 JB IF 3R

TIME (HOURS)

18 20 22 1/00 1/02

2.0 1.5 1.0 0.5

Gain amp vs UTC time for MRK848.MULTI.1 SN 2 Rpol & Lpol IF 1 - 8

Plot file version 5 created 18-DEC-2003 15:39:29

6 JB IF 3L 2.5 2.0 1.5 1.0 0.5 6 JB IF 4R 1.2 1.0 0.8 0.6 0.4 6 JB IF 4L 1.5 1.0 0.5 7 TR IF 1R 0.8 0.6 0.4 0.2 7 TR IF 1L

2.775 2.770 2.765 2.760

7 TR IF 2R

Gain

0.535 0.530 0.525 0.520

7 TR IF 2L 1.2 1.0 0.8 0.6 0.4 0.2 7 TR IF 3R

1.225 1.220 1.215 1.210

7 TR IF 3L 0.8 0.6 0.4 0.2 7 TR IF 4R

TIME (HOURS)

18 20 22 1/00 1/02

0.95 0.90 0.85 0.80

Gain amp vs UTC time for MRK848.MULTI.1 SN 2 Rpol & Lpol IF 1 - 8

Plot file version 6 created 18-DEC-2003 15:39:29

7 TR IF 4L 0.6 0.4 0.2 7 TR IF 7L 1.5 1.0 0.5 8 CM IF 7L

Gain

TIME (HOURS)

18 20 22 1/00 1/02

0.8 0.6 0.4 0.2