Center at RA 15 18 06.11063 DEC 42 44 45.1335

CONT: MRK848 IPOL 1634.021 MHZ MRK848.ICL001.5

PLot file version 1 created 18-DEC-2003 15:44:27

Cont peak flux = 6.3538E-04 JY/BEAM Levs = 6.354E-04 * (-0.226, 0.226, 0.451, 0.902)

MilliARC SEC

MilliARC SEC

200 100 0 -100 -200

250

200

150

100

50

0

-50

-100

-150

-200

-250