Gain amp vs UTC time for UGC4881.MULTI.1 SN 2 Rpol & Lpol IF 1 - 8

Plot file version 1 created 18-DEC-2003 15:16:11

1 ON IF 1R 1.0 0.8 0.6 0.4 1 ON IF 1L 1.0 0.5 0.0 1 ON IF 2R

0.220 0.215 0.210 0.205

1 ON IF 2L 0.5 0.4 0.3 1 ON IF 3R 1.5 1.0 0.5 0.0 1 ON IF 3L

Gain

0.20 0.18 0.16 0.14 0.12

1 ON IF 4R

0.12

0.10

0.08

1 ON IF 4L 0.4 0.2 0.0 2 WB IF 1R 0.8 0.6 0.4 0.2 2 WB IF 1L

TIME (HOURS)

12 14 16 18 20 22

1.5 1.0 0.5 0.0

Gain amp vs UTC time for UGC4881.MULTI.1 SN 2 Rpol & Lpol IF 1 - 8

Plot file version 2 created 18-DEC-2003 15:16:11

2 WB IF 2R 1.5 1.0 0.5 0.0 2 WB IF 2L 0.8 0.6 0.4 0.2 2 WB IF 3R 1.5 1.0 0.5 2 WB IF 3L 0.5 0.4 0.3 0.2 2 WB IF 4R 2.0 1.5 1.0 0.5 2 WB IF 4L

Gain

0.8 0.6 0.4 0.2 3 MC IF 1R 1.5 1.0 0.5 3 MC IF 1L

0.30 0.25 0.20 0.15

3 MC IF 2R

0.135 0.130 0.125 0.120

3 MC IF 2L

TIME (HOURS)

12 14 16 18 20 22

0.26 0.24 0.22

Gain amp vs UTC time for UGC4881.MULTI.1 SN 2 Rpol & Lpol IF 1 - 8

Plot file version 3 created 18-DEC-2003 15:16:11

3 MC IF 3R

0.35 0.30 0.25 0.20 0.15 3 MC IF 3L 0.8 0.6 0.4 0.2 3 MC IF 4R 0.5 0.4 0.3 0.2 3 MC IF 4L

0.24 0.22 0.20 0.18

4 EF IF 1R 1.2 1.0 0.8 0.6 0.4 4 EF IF 1L

Gain

1.5 1.0 0.5 4 EF IF 2R 1.5 1.0 0.5 4 EF IF 2L 1.5 1.0 0.5 4 EF IF 3R 1.5 1.0 0.5 4 EF IF 3L

TIME (HOURS)

12 14 16 18 20 22

1.2 1.0 0.8 0.6 0.4

Gain amp vs UTC time for UGC4881.MULTI.1 SN 2 Rpol & Lpol IF 1 - 8

Plot file version 4 created 18-DEC-2003 15:16:11

4 EF IF 4R 1.0 0.8 0.6 0.4 0.2 4 EF IF 4L 1.0 0.5 0.0 4 EF IF 7L 1.6 1.4 1.2 1.0 5 NT IF 1R 0.8 0.6 0.4 0.2 5 NT IF 1L

0.500 0.495 0.490 0.485

5 NT IF 3L

Gain

0.6 0.5 0.4 0.3 5 NT IF 7L 0.4 0.3 0.2 0.1 6 JB IF 1R 1.2 1.0 0.8 0.6 0.4 6 JB IF 1L

3.675 3.670 3.665 3.660

6 JB IF 2R

TIME (HOURS)

12 14 16 18 20 22

1.2 1.0 0.8 0.6

Gain amp vs UTC time for UGC4881.MULTI.1 SN 2 Rpol & Lpol IF 1 - 8

Plot file version 5 created 18-DEC-2003 15:16:11

6 JB IF 2L 1.0 0.8 0.6 6 JB IF 3R 2.0 1.5 1.0 0.5 6 JB IF 3L 1.0 0.8 0.6 0.4 6 JB IF 4R 1.1 1.0 0.9 0.8 6 JB IF 4L

3.210 3.205 3.200 3.195

7 TR IF 1R

Gain

0.8 0.6 0.4 7 TR IF 1L

0.55

0.50

0.45

7 TR IF 2R 0.4 0.3 0.2 7 TR IF 2L 0.8 0.6 0.4 0.2 7 TR IF 3R

TIME (HOURS)

12 14 16 18 20 22

1.0 0.8 0.6 0.4 0.2

Gain amp vs UTC time for UGC4881.MULTI.1 SN 2 Rpol & Lpol IF 1 - 8

Plot file version 6 created 18-DEC-2003 15:16:11

7 TR IF 3L 0.8 0.6 0.4 0.2 0.0 7 TR IF 4L 0.8 0.6 0.4 0.2 7 TR IF 7L

Gain

TIME (HOURS)

12 14 16 18 20 22

1.150 1.145 1.140 1.135