IF 1 CHAN 1 - 16 STK LL

Ampltude andPhase vs Time for ec020b.UVAVG.1 Vect aver.

PLot file version 1 created 16-DEC-2003 14:23:34

200 100 0

ON - EF ( 1 - 4 )

100 0 -100

MilliJanskys

200 100 0

WB - EF ( 2 - 4 )

100 0 -100

200 100 0

MC - EF ( 3 - 4 )

Degrees

100 0 -100

200 100 0

EF - NT ( 4 - 5 )

TIME (HOURS)

06 08 10 12 14 16 18 20 22 1/00 1/02 1/04 1/06

100 0 -100

IF 1 CHAN 1 - 16 STK LL

Ampltude andPhase vs Time for ec020b.UVAVG.1 Vect aver.

PLot file version 2 created 16-DEC-2003 14:23:35

200 100 0

EF - JB ( 4 - 6 )

100 0 -100

MilliJanskys

200 100 0

EF - TR ( 4 - 7 )

100 0 -100

200 100 0

EF - CM ( 4 - 8 )

Degrees

TIME (HOURS)

06 08 10 12 14 16 18 20 22 1/00 1/02 1/04 1/06

100 0 -100

IF 2 CHAN 1 - 16 STK LL

Ampltude andPhase vs Time for ec020b.UVAVG.1 Vect aver.

PLot file version 3 created 16-DEC-2003 14:24:13

200 100 0

ON - EF ( 1 - 4 )

100 0 -100

MilliJanskys

200 100 0

WB - EF ( 2 - 4 )

100 0 -100

200 100 0

MC - EF ( 3 - 4 )

Degrees

100 0 -100

200 100 0

EF - NT ( 4 - 5 )

TIME (HOURS)

06 08 10 12 14 16 18 20 22 1/00 1/02 1/04 1/06

100 0 -100

IF 2 CHAN 1 - 16 STK LL

Ampltude andPhase vs Time for ec020b.UVAVG.1 Vect aver.

PLot file version 4 created 16-DEC-2003 14:24:13

200 100 0

EF - JB ( 4 - 6 )

100 0 -100

MilliJanskys

200 100 0

EF - TR ( 4 - 7 )

100 0 -100

200 100 0

EF - CM ( 4 - 8 )

Degrees

TIME (HOURS)

06 08 10 12 14 16 18 20 22 1/00 1/02 1/04 1/06

100 0 -100

IF 3 CHAN 1 - 16 STK LL

Ampltude andPhase vs Time for ec020b.UVAVG.1 Vect aver.

PLot file version 5 created 16-DEC-2003 14:24:50

200 100 0

ON - EF ( 1 - 4 )

100 0 -100

MilliJanskys

200 100 0

WB - EF ( 2 - 4 )

100 0 -100

200 100 0

MC - EF ( 3 - 4 )

Degrees

100 0 -100

200 100 0

EF - NT ( 4 - 5 )

TIME (HOURS)

06 08 10 12 14 16 18 20 22 1/00 1/02 1/04 1/06

100 0 -100

IF 3 CHAN 1 - 16 STK LL

Ampltude andPhase vs Time for ec020b.UVAVG.1 Vect aver.

PLot file version 6 created 16-DEC-2003 14:24:50

200 100 0

EF - JB ( 4 - 6 )

100 0 -100

MilliJanskys

200 100 0

EF - TR ( 4 - 7 )

100 0 -100

200 100 0

EF - CM ( 4 - 8 )

Degrees

TIME (HOURS)

06 08 10 12 14 16 18 20 22 1/00 1/02 1/04 1/06

100 0 -100

IF 4 CHAN 1 - 16 STK LL

Ampltude andPhase vs Time for ec020b.UVAVG.1 Vect aver.

PLot file version 7 created 16-DEC-2003 14:25:27

200 100 0

ON - EF ( 1 - 4 )

100 0 -100

MilliJanskys

200 100 0

WB - EF ( 2 - 4 )

100 0 -100 200 100 0

MC - EF ( 3 - 4 )

Degrees

100 0 -100 200 100 0

EF - NT ( 4 - 5 )

TIME (HOURS)

06 08 10 12 14 16 18 20 22 1/00 1/02 1/04 1/06

100 0 -100

IF 4 CHAN 1 - 16 STK LL

Ampltude andPhase vs Time for ec020b.UVAVG.1 Vect aver.

PLot file version 8 created 16-DEC-2003 14:25:27

200 100 0

EF - JB ( 4 - 6 )

100 0 -100

MilliJanskys

200 100 0

EF - TR ( 4 - 7 )

100 0 -100 200 100 0

EF - CM ( 4 - 8 )

Degrees

TIME (HOURS)

06 08 10 12 14 16 18 20 22 1/00 1/02 1/04 1/06

100 0 -100

IF 5 CHAN 1 - 16 STK LL

Ampltude andPhase vs Time for ec020b.UVAVG.1 Vect aver.

PLot file version 9 created 16-DEC-2003 14:26:04

1.5 1.0 0.5 0.0

EF - NT ( 4 - 5 )

100 0 -100

MilliJanskys

1.5 1.0 0.5 0.0

EF - TR ( 4 - 7 )

100 0 -100 1.5 1.0 0.5 0.0

EF - CM ( 4 - 8 )

Degrees

TIME (HOURS)

16 18 20 22 1/00 1/02 1/04 1/06

100 0 -100

IF 6 CHAN 1 - 16 STK LL

Ampltude andPhase vs Time for ec020b.UVAVG.1 Vect aver.

PLot file version 10 created 16-DEC-2003 14:26:40

40 20 0

EF - NT ( 4 - 5 )

100 0 -100

MilliJanskys

40 20 0

EF - TR ( 4 - 7 )

100 0 -100 40 20 0

EF - CM ( 4 - 8 )

Degrees

TIME (HOURS)

06 08 10 12 14 16 18 20 22 1/00 1/02 1/04 1/06

100 0 -100

IF 7 CHAN 1 - 16 STK LL

Ampltude andPhase vs Time for ec020b.UVAVG.1 Vect aver.

PLot file version 11 created 16-DEC-2003 14:27:14

100 50 0

EF - NT ( 4 - 5 )

100 0 -100

MilliJanskys

100 50 0

EF - TR ( 4 - 7 )

100 0 -100 100 50 0

EF - CM ( 4 - 8 )

Degrees

TIME (HOURS)

06 08 10 12 14 16 18 20 22 1/00 1/02 1/04 1/06

100 0 -100

IF 8 CHAN 1 - 16 STK LL

Ampltude andPhase vs Time for ec020b.UVAVG.1 Vect aver.

PLot file version 12 created 16-DEC-2003 14:27:49 15 10 5 0

EF - NT ( 4 - 5 )

100 0 -100

MilliJanskys

15 10 5 0

EF - TR ( 4 - 7 )

100 0 -100 15 10 5 0

EF - CM ( 4 - 8 )

Degrees

TIME (HOURS)

08 10 12 14 16 18 20 22 1/00 1/02 1/04 1/06

100 0 -100

IF 2 CHAN 1 - 16 STK RR

Ampltude andPhase vs Time for ec020b.UVAVG.1 Vect aver.

PLot file version 15 created 16-DEC-2003 14:28:55

200 100 0

ON - EF ( 1 - 4 )

100 0 -100

MilliJanskys

200 100 0

WB - EF ( 2 - 4 )

100 0 -100

200 100 0

MC - EF ( 3 - 4 )

Degrees

100 0 -100

200 100 0

EF - NT ( 4 - 5 )

TIME (HOURS)

06 08 10 12 14 16 18 20 22 1/00 1/02 1/04 1/06

100 0 -100

IF 2 CHAN 1 - 16 STK RR

Ampltude andPhase vs Time for ec020b.UVAVG.1 Vect aver.

PLot file version 16 created 16-DEC-2003 14:28:56

200 100 0

EF - JB ( 4 - 6 )

100 0 -100

MilliJanskys

200 100 0

EF - TR ( 4 - 7 )

100 0 -100

200 100 0

EF - CM ( 4 - 8 )

Degrees

TIME (HOURS)

06 08 10 12 14 16 18 20 22 1/00 1/02 1/04 1/06

100 0 -100

IF 3 CHAN 1 - 16 STK RR

Ampltude andPhase vs Time for ec020b.UVAVG.1 Vect aver.

PLot file version 17 created 16-DEC-2003 14:29:29

200 100 0

ON - EF ( 1 - 4 )

100 0 -100

MilliJanskys

200 100 0

WB - EF ( 2 - 4 )

100 0 -100

200 100 0

MC - EF ( 3 - 4 )

Degrees

100 0 -100

200 100 0

EF - NT ( 4 - 5 )

TIME (HOURS)

06 08 10 12 14 16 18 20 22 1/00 1/02 1/04 1/06

100 0 -100

IF 3 CHAN 1 - 16 STK RR

Ampltude andPhase vs Time for ec020b.UVAVG.1 Vect aver.

PLot file version 18 created 16-DEC-2003 14:29:29

200 100 0

EF - JB ( 4 - 6 )

100 0 -100

MilliJanskys

200 100 0

EF - TR ( 4 - 7 )

100 0 -100

200 100 0

EF - CM ( 4 - 8 )

Degrees

TIME (HOURS)

06 08 10 12 14 16 18 20 22 1/00 1/02 1/04 1/06

100 0 -100

IF 4 CHAN 1 - 16 STK RR

Ampltude andPhase vs Time for ec020b.UVAVG.1 Vect aver.

PLot file version 19 created 16-DEC-2003 14:30:02

200 100 0

ON - EF ( 1 - 4 )

100 0 -100

MilliJanskys

200 100 0

WB - EF ( 2 - 4 )

100 0 -100 200 100 0

MC - EF ( 3 - 4 )

Degrees

100 0 -100 200 100 0

EF - NT ( 4 - 5 )

TIME (HOURS)

06 08 10 12 14 16 18 20 22 1/00 1/02 1/04 1/06

100 0 -100

IF 4 CHAN 1 - 16 STK RR

Ampltude andPhase vs Time for ec020b.UVAVG.1 Vect aver.

PLot file version 20 created 16-DEC-2003 14:30:02

200 100 0

EF - JB ( 4 - 6 )

100 0 -100

MilliJanskys

200 100 0

EF - TR ( 4 - 7 )

100 0 -100 200 100 0

EF - CM ( 4 - 8 )

Degrees

TIME (HOURS)

06 08 10 12 14 16 18 20 22 1/00 1/02 1/04 1/06

100 0 -100

IF 5 CHAN 1 - 16 STK RR

Ampltude andPhase vs Time for ec020b.UVAVG.1 Vect aver.

PLot file version 21 created 16-DEC-2003 14:30:38 2 1 0

EF - CM ( 4 - 8 )

TIME (HOURS)

10 12 14 16 18 20 22 1/00 1/02 1/04

100 0 -100

IF 7 CHAN 1 - 16 STK RR

Ampltude andPhase vs Time for ec020b.UVAVG.1 Vect aver.

PLot file version 22 created 16-DEC-2003 14:31:11 40 20 0

EF - NT ( 4 - 5 )

TIME (HOURS)

06 08 10 12 14 16 18 20 22 1/00 1/02 1/04 1/06

100 0 -100

IF 8 CHAN 1 - 16 STK RR

Ampltude andPhase vs Time for ec020b.UVAVG.1 Vect aver.

PLot file version 23 created 16-DEC-2003 14:31:44

100 50 0

EF - NT ( 4 - 5 )

100 0 -100

MilliJanskys

100 50 0

EF - TR ( 4 - 7 )

100 0 -100 100 50 0

EF - CM ( 4 - 8 )

Degrees

TIME (HOURS)

06 08 10 12 14 16 18 20 22 1/00 1/02 1/04 1/06

100 0 -100