Center at RA 23 39 21.12520 DEC 60 10 11.8492

CONT: J2339+60 IPOL 6668.910 MHZ J2339+6010.IIM001.1

PLot file version 1 created 24-MAR-2005 14:04:02

Cont peak flux = 2.3529E-01 JY/BEAM Levs = 2.353E-01 * (-0.206, 0.206, 0.412, 0.824)

MilliARC SEC

MilliARC SEC

100 50 0 -50 -100

100

80

60

40

20

0

-20

-40

-60

-80

-100