Center at RA 20 12 05.63744 DEC 46 28 55.7770

CONT: J2012+46 IPOL 6667.440 MHZ J2012+4628.IIM001.1

PLot file version 1 created 10-JUN-2005 18:52:38

Cont peak flux = 2.6473E-01 JY/BEAM Levs = 2.647E-01 * (-0.221, 0.221, 0.442, 0.884)

MilliARC SEC

MilliARC SEC

100 50 0 -50 -100

100

80

60

40

20

0

-20

-40

-60

-80

-100