Gain amp vs UTC time for DA193.MULTI.1 SN 2 Rpol & Lpol IF 1

Plot file version 1 created 10-JUN-2005 17:44:46

2R NT

1040 1030 1020 1010 2L NT 970 960 950 4R EF 1065

1060

1055 4L EF 970 960 950 5R ON 935 930 925 5L ON

MilliGain

956 954 952 950 948 6R MC

1000 980 960 6L MC

1000 980 960 7R TR

1080 1070 1060

7L TR

TIME (HOURS)

23 41 42 43 44 45 46 47 48 49

940 935 930 925

Gain amp vs UTC time for DA193.MULTI.1 SN 2 Rpol & Lpol IF 1

Plot file version 2 created 10-JUN-2005 17:44:46

8R WB

1005 1000 995 990 985 8L WB

MilliGain

TIME (HOURS)

23 41 42 43 44 45 46 47 48 49

990 985