Center at RA 06 03 09.13027 DEC 17 42 16.8107

CONT: J0603+17 IPOL 6667.470 MHZ J0603+1742.ICL001.5

PLot file version 1 created 10-JUN-2005 17:45:10

Cont peak flux = 2.6337E-01 JY/BEAM Levs = 2.634E-01 * (-0.005, 0.005, 0.011, 0.021, 0.043, 0.085, 0.171, 0.342, 0.683)

MilliARC SEC

MilliARC SEC

100 50 0 -50 -100

100

80

60

40

20

0

-20

-40

-60

-80

-100