Center at RA 19 07 11.99737 DEC 01 27 08.9893

CONT: J1907+01 IPOL 6665.200 MHZ J1907+0127.ICL001.5

PLot file version 1 created 11-JUN-2005 01:22:20

Cont peak flux = 2.1374E-01 JY/BEAM Levs = 2.137E-01 * (-0.013, 0.013, 0.026, 0.053, 0.106, 0.211, 0.422, 0.845)

MilliARC SEC

MilliARC SEC

100 50 0 -50 -100

100

80

60

40

20

0

-20

-40

-60

-80

-100