Gain phs vs UTC time for 0823+033.MULTI.1 SN 1 Rpol IF 1 - 16

Plot file version 1 created 08-SEP-2022 00:02:10

1R EF IF 1 1 0 -1 1R EF IF 2 1 0 -1 1R EF IF 3 1 0 -1 1R EF IF 4 1 0 -1 1R EF IF 5 1 0 -1 1R EF IF 6

MilliDegrees

1 0 -1 1R EF IF 7 1 0 -1 1R EF IF 8 1 0 -1 1R EF IF 9 1 0 -1 1R EF IF 10

Time (hours)

1/09 1/10 1/11 1/12 1/13 1/14 1/15 1/16 1/17 1/18

1 0 -1

Gain phs vs UTC time for 0823+033.MULTI.1 SN 1 Rpol IF 1 - 16

Plot file version 2 created 08-SEP-2022 00:02:10

1R EF IF 11 1 0 -1 1R EF IF 12 1 0 -1 1R EF IF 13 1 0 -1 1R EF IF 14 1 0 -1 1R EF IF 15 1 0 -1 1R EF IF 16

MilliDegrees

1 0 -1 2R HH IF 1

358000 356000 354000 352000 350000 348000 2R HH IF 2

353500 353000 352500 352000 351500

2R HH IF 3

80000 60000 40000 20000 0 2R HH IF 4

Time (hours)

1/09 1/10 1/11 1/12 1/13 1/14 1/15 1/16 1/17 1/18

0 -10000

-20000

-30000

Gain phs vs UTC time for 0823+033.MULTI.1 SN 1 Rpol IF 1 - 16

Plot file version 3 created 08-SEP-2022 00:02:10

2R HH IF 5 0 -50 -100 2R HH IF 6 350 300 250 200 2R HH IF 7 356 354 352 350 2R HH IF 8 0 -5 -10 2R HH IF 9 0 -5 -10 2R HH IF 10

Degrees

0 -2 -4 -6 2R HH IF 11 10 0 -10 2R HH IF 12 100 50 0 2R HH IF 13 354 352 350 348 2R HH IF 14

Time (hours)

1/09 1/10 1/11 1/12 1/13 1/14 1/15 1/16 1/17 1/18

10 5 0 -5

Gain phs vs UTC time for 0823+033.MULTI.1 SN 1 Rpol IF 1 - 16

Plot file version 4 created 08-SEP-2022 00:02:10

2R HH IF 15 10 0 -10 2R HH IF 16 -5 -10 -15 -20 3R MC IF 1 60 40 20 0 3R MC IF 2 -3 -4 -5 -6 3R MC IF 3 0 -50 -100 -150

3R MC IF 4

Degrees

0 -2 -4 3R MC IF 5 0 -50 -100

3R MC IF 6 30 20 10 0 -10 3R MC IF 7 350 340 330 320 3R MC IF 8

Time (hours)

1/09 1/10 1/11 1/12 1/13 1/14 1/15 1/16 1/17 1/18

0 -50 -100 -150

Gain phs vs UTC time for 0823+033.MULTI.1 SN 1 Rpol IF 1 - 16

Plot file version 5 created 08-SEP-2022 00:02:10

3R MC IF 9 0 -20 -40 -60 -80 3R MC IF 10 10 0 -10 3R MC IF 11 356 354 352 350 348 3R MC IF 12 40 20 0 3R MC IF 13 -10 -15 -20 -25 3R MC IF 14

Degrees

-7 -8 -9 -10 3R MC IF 15 -6 -8 -10 3R MC IF 16 356 354 352 350 4R NT IF 16

-25.5005 -25.5010 -25.5015 -25.5020

5R O6 IF 1

Time (hours)

1/09 1/10 1/11 1/12 1/13 1/14 1/15 1/16 1/17 1/18

360 355 350 345

Gain phs vs UTC time for 0823+033.MULTI.1 SN 1 Rpol IF 1 - 16

Plot file version 6 created 08-SEP-2022 00:02:10

5R O6 IF 2 20 10 0 -10 5R O6 IF 3 2 0 -2 -4 -6 -8 5R O6 IF 4 -2 -4 -6 -8 5R O6 IF 5 2 0 -2 -4 -6 -8 5R O6 IF 6 0 -2 -4 -6 5R O6 IF 7

Degrees

60 40 20 0 5R O6 IF 8 -1 -2 -3 -4 -5 5R O6 IF 9 5 0 -5 5R O6 IF 10 0 -2 -4 5R O6 IF 11

Time (hours)

1/09 1/10 1/11 1/12 1/13 1/14 1/15 1/16 1/17 1/18

-4 -6 -8

Gain phs vs UTC time for 0823+033.MULTI.1 SN 1 Rpol IF 1 - 16

Plot file version 7 created 08-SEP-2022 00:02:10

5R O6 IF 12 0 -5 -10 5R O6 IF 13 5 0 -5 5R O6 IF 14 5 0 -5 5R O6 IF 15 0 -2 -4 -6 -8 5R O6 IF 16 20 10 0 6R YS IF 1

Degrees

0 -10 -20 6R YS IF 2 20 0 -20 6R YS IF 3 0 -10 -20 6R YS IF 4 0 -10 -20 6R YS IF 5

Time (hours)

1/09 1/10 1/11 1/12 1/13 1/14 1/15 1/16 1/17 1/18

0 -20 -40 -60

Gain phs vs UTC time for 0823+033.MULTI.1 SN 1 Rpol IF 1 - 16

Plot file version 8 created 08-SEP-2022 00:02:10

6R YS IF 6 0 -10 -20 6R YS IF 7 0 -5 -10 -15 6R YS IF 8 0 -10 -20 6R YS IF 9 0 -10 -20 6R YS IF 10 0 -5 -10 -15 6R YS IF 11

Degrees

-5 -10 -15 -20 -25 6R YS IF 12 20 0 -20 6R YS IF 13 360 350 340 6R YS IF 14 0 -10 -20 6R YS IF 15

Time (hours)

1/09 1/10 1/11 1/12 1/13 1/14 1/15 1/16 1/17 1/18

355 350 345 340

Gain phs vs UTC time for 0823+033.MULTI.1 SN 1 Rpol IF 1 - 16

Plot file version 9 created 08-SEP-2022 00:02:10

6R YS IF 16 5 0 -5 -10 -15 7R ZC IF 1 360 355 350 7R ZC IF 2 10 0 -10 -20 7R ZC IF 3 20 0 -20 7R ZC IF 4 350 340 330 7R ZC IF 5

Degrees

-20 -40 -60 -80 -100 -120

7R ZC IF 6 0 -10 -20 -30 7R ZC IF 7 350 300 250 7R ZC IF 8 0 -50 -100

7R ZC IF 9

Time (hours)

1/09 1/10 1/11 1/12 1/13 1/14 1/15 1/16 1/17 1/18

-5 -10 -15 -20 -25

Gain phs vs UTC time for 0823+033.MULTI.1 SN 1 Rpol IF 1 - 16

Plot file version 10 created 08-SEP-2022 00:02:10

7R ZC IF 10 0 -20 -40 -60 -80 7R ZC IF 11 350 340 330 7R ZC IF 12 360 340 320 300 280 7R ZC IF 13 360 350 340 330 7R ZC IF 14 60 40 20 0 -20 7R ZC IF 15

Degrees

20 0 -20 7R ZC IF 16 358 356 354 352 8R BD IF 2 340 330 320 8R BD IF 3 60 40 20 0 -20 -40 8R BD IF 4

Time (hours)

1/09 1/10 1/11 1/12 1/13 1/14 1/15 1/16 1/17 1/18

65.2750 65.2745 65.2740 65.2735

Gain phs vs UTC time for 0823+033.MULTI.1 SN 1 Rpol IF 1 - 16

Plot file version 11 created 08-SEP-2022 00:02:10

8R BD IF 6

32887.5 32887.0 32886.5 32886.0

8R BD IF 7

200000

100000 0 8R BD IF 8

-4149.5 -4150.0 -4150.5 -4151.0

8R BD IF 10

150000 100000 50000 0 -50000

8R BD IF 12

20000 0 -20000 -40000

8R BD IF 13

MilliDegrees

-6630.0 -6630.5 -6631.0 -6631.5

8R BD IF 15

1305.5 1305.0 1304.5 1304.0

8R BD IF 16

-14180.5 -14181.0 -14181.5 -14182.0

9R MH IF 1 0 -10000 -20000 -30000

9R MH IF 2

Time (hours)

1/09 1/10 1/11 1/12 1/13 1/14 1/15 1/16 1/17 1/18

200 0 -200 -400 -600

Gain phs vs UTC time for 0823+033.MULTI.1 SN 1 Rpol IF 1 - 16

Plot file version 12 created 08-SEP-2022 00:02:10

9R MH IF 3 357 356 355 354 9R MH IF 4 0 -5 -10 -15 9R MH IF 5 0 -50 -100 -150

9R MH IF 6 -2 -4 -6 -8 -10 9R MH IF 7 0 -5 -10 9R MH IF 8

Degrees

0 -10 -20 -30 9R MH IF 9 80 60 40 20 0 -20 9R MH IF 10 100 50 0 9R MH IF 11 10 0 -10 9R MH IF 12

Time (hours)

1/09 1/10 1/11 1/12 1/13 1/14 1/15 1/16 1/17 1/18

150 100 50 0

Gain phs vs UTC time for 0823+033.MULTI.1 SN 1 Rpol IF 1 - 16

Plot file version 15 created 08-SEP-2022 00:02:10

11R SR IF 1 10 0 -10 -20 -30 11R SR IF 2 15 10 5 0 -5 11R SR IF 3 352 350 348 346 344 342 11R SR IF 4 10 0 -10 -20 11R SR IF 5 0 -50 -100

11R SR IF 6

Degrees

10 0 -10 -20 11R SR IF 7 10 0 -10 -20 11R SR IF 8 10 0 -10 -20 11R SR IF 9 10 0 -10 -20 11R SR IF 10

Time (hours)

1/09 1/10 1/11 1/12 1/13 1/14 1/15 1/16 1/17 1/18

10 0 -10 -20 -30

Gain phs vs UTC time for 0823+033.MULTI.1 SN 1 Rpol IF 1 - 16

Plot file version 16 created 08-SEP-2022 00:02:10

11R SR IF 11 5 0 -5 -10 11R SR IF 12 10 0 -10 -20 11R SR IF 13 10 0 -10 -20 11R SR IF 14 10 0 -10 -20 11R SR IF 15 10 0 -10 -20 11R SR IF 16

Degrees

10 0 -10 12R JB IF 1 355 350 345 340 12R JB IF 2 10 5 0 -5 12R JB IF 3

-7.2475 -7.2480 -7.2485 -7.2490 12R JB IF 4

Time (hours)

1/09 1/10 1/11 1/12 1/13 1/14 1/15 1/16 1/17 1/18

150 100 50 0

Gain phs vs UTC time for 0823+033.MULTI.1 SN 1 Rpol IF 1 - 16

Plot file version 17 created 08-SEP-2022 00:02:10

12R JB IF 5 2 0 -2 -4 -6 -8 12R JB IF 6 0 -10 -20 -30 12R JB IF 7 360 340 320 12R JB IF 8 20 10 0 -10 12R JB IF 9 360 340 320 12R JB IF 10

Degrees

0 -50 -100

12R JB IF 11 0 -20 -40 12R JB IF 12 -5 -10 -15 -20 -25 12R JB IF 13 0 -10 -20 12R JB IF 14

Time (hours)

1/09 1/10 1/11 1/12 1/13 1/14 1/15 1/16 1/17 1/18

358 357 356 355

Gain phs vs UTC time for 0823+033.MULTI.1 SN 1 Rpol IF 1 - 16

Plot file version 18 created 08-SEP-2022 00:02:10

12R JB IF 15 360 355 350 345 12R JB IF 16 355 350 345 340 19R TR IF 1 -6 -7 -8 -9 19R TR IF 2 20 10 0 -10 19R TR IF 3 354 352 350 348 19R TR IF 4

Degrees

-6 -8 -10 -12 19R TR IF 5 0 -50 -100 -150

19R TR IF 6 356 354 352 350 348 19R TR IF 7 360 355 350 19R TR IF 8

Time (hours)

1/09 1/10 1/11 1/12 1/13 1/14 1/15 1/16 1/17 1/18

20 0 -20

Gain phs vs UTC time for 0823+033.MULTI.1 SN 1 Rpol IF 1 - 16

Plot file version 19 created 08-SEP-2022 00:02:10

19R TR IF 9 -4 -6 -8 -10 -12 19R TR IF 10 -5 -10 -15 19R TR IF 11 352 350 348 346 19R TR IF 12 20 10 0 -10 19R TR IF 13 150 100 50 0 19R TR IF 14

Degrees

150 100 50 0 19R TR IF 15 356 354 352 350 348 346 19R TR IF 16

Time (hours)

1/09 1/10 1/11 1/12 1/13 1/14 1/15 1/16 1/17 1/18

-6 -8 -10