Gain phs vs UTC time for 1511-100.MULTI.1 SN 1 Rpol IF 1 - 16

Plot file version 1 created 07-SEP-2022 23:54:30

1R EF IF 1 1 0 -1 1R EF IF 2 1 0 -1 1R EF IF 3 1 0 -1 1R EF IF 4 1 0 -1 1R EF IF 5 1 0 -1 1R EF IF 6

MilliDegrees

1 0 -1 1R EF IF 7 1 0 -1 1R EF IF 8 1 0 -1 1R EF IF 9 1 0 -1 1R EF IF 10

Time (hours)

18 20 22 1/00 1/02 1/04 1/06 1/08 1/10 1/12 1/14 1/16 1/18

1 0 -1

Gain phs vs UTC time for 1511-100.MULTI.1 SN 1 Rpol IF 1 - 16

Plot file version 2 created 07-SEP-2022 23:54:30

1R EF IF 11 1 0 -1 1R EF IF 12 1 0 -1 1R EF IF 13 1 0 -1 1R EF IF 14 1 0 -1 1R EF IF 15 1 0 -1 1R EF IF 16

MilliDegrees

1 0 -1 2R HH IF 1

40000 20000 0 -20000

2R HH IF 2

80000 60000 40000 20000 0 2R HH IF 3

5000 0 -5000 -10000 -15000 2R HH IF 4

Time (hours)

18 20 22 1/00 1/02 1/04 1/06 1/08 1/10 1/12 1/14 1/16 1/18

100000

50000 0

Gain phs vs UTC time for 1511-100.MULTI.1 SN 1 Rpol IF 1 - 16

Plot file version 3 created 07-SEP-2022 23:54:30

2R HH IF 5 0 -5 -10 2R HH IF 6 0 -5 -10 -15 2R HH IF 7 40 20 0 -20 2R HH IF 8 -5 -10 -15 2R HH IF 9 60 40 20 0 -20 2R HH IF 10

Degrees

40 20 0 2R HH IF 11 6 4 2 0 -2 2R HH IF 12 355 350 345 2R HH IF 13 10 0 -10 2R HH IF 14

Time (hours)

18 20 22 1/00 1/02 1/04 1/06 1/08 1/10 1/12 1/14 1/16 1/18

60 40 20 0

Gain phs vs UTC time for 1511-100.MULTI.1 SN 1 Rpol IF 1 - 16

Plot file version 4 created 07-SEP-2022 23:54:30

2R HH IF 15 100 50 0 2R HH IF 16 350 340 330 3R MC IF 1 15 10 5 0 -5 3R MC IF 2 20 10 0 -10 3R MC IF 3 10 5 0 -5 3R MC IF 4

Degrees

100 50 0 3R MC IF 5 0 -50 -100 -150

3R MC IF 6 0 -20 -40 3R MC IF 7 40 20 0 3R MC IF 8

Time (hours)

18 20 22 1/00 1/02 1/04 1/06 1/08 1/10 1/12 1/14 1/16 1/18

40 20 0

Gain phs vs UTC time for 1511-100.MULTI.1 SN 1 Rpol IF 1 - 16

Plot file version 5 created 07-SEP-2022 23:54:30

3R MC IF 9 0 -20 -40 3R MC IF 10 100 50 0 3R MC IF 11 10 0 -10 -20 3R MC IF 12 80 60 40 20 0 3R MC IF 13 0 -20 -40 -60 3R MC IF 14

Degrees

80 60 40 20 0 -20 3R MC IF 15 100 50 0 3R MC IF 16 40 20 0 4R NT IF 6

-162.7875 -162.7880 -162.7885 -162.7890 4R NT IF 9

Time (hours)

18 20 22 1/00 1/02 1/04 1/06 1/08 1/10 1/12 1/14 1/16 1/18

-41.5865 -41.5870 -41.5875 -41.5880

Gain phs vs UTC time for 1511-100.MULTI.1 SN 1 Rpol IF 1 - 16

Plot file version 6 created 07-SEP-2022 23:54:30

4R NT IF 11 30 20 10 4R NT IF 14

-132.6970 -132.6975 -132.6980 -132.6985

4R NT IF 15

-65.6130 -65.6135 -65.6140 -65.6145

4R NT IF 16

59.8855 59.8850 59.8845 59.8840

5R O6 IF 1 10 0 -10 5R O6 IF 2

Degrees

5 0 -5 -10 5R O6 IF 3 10 0 -10 5R O6 IF 4 10 0 -10 -20 5R O6 IF 5 5 0 -5 -10 5R O6 IF 6

Time (hours)

18 20 22 1/00 1/02 1/04 1/06 1/08 1/10 1/12 1/14 1/16 1/18

20 10 0 -10

Gain phs vs UTC time for 1511-100.MULTI.1 SN 1 Rpol IF 1 - 16

Plot file version 7 created 07-SEP-2022 23:54:30

5R O6 IF 7 20 10 0 -10 5R O6 IF 8 0 -5 -10 -15 5R O6 IF 9 10 0 -10 -20 5R O6 IF 10 30 20 10 0 -10 5R O6 IF 11 15 10 5 0 -5 5R O6 IF 12

Degrees

0 -10 -20 5R O6 IF 13 10 0 -10 -20 5R O6 IF 14 20 0 -20 5R O6 IF 15 10 0 -10 5R O6 IF 16

Time (hours)

18 20 22 1/00 1/02 1/04 1/06 1/08 1/10 1/12 1/14 1/16 1/18

10 0 -10

Gain phs vs UTC time for 1511-100.MULTI.1 SN 1 Rpol IF 1 - 16

Plot file version 8 created 07-SEP-2022 23:54:30

6R YS IF 1 5 0 -5 6R YS IF 2 5 0 -5 6R YS IF 3 2 0 -2 6R YS IF 4 4 2 0 -2 -4 6R YS IF 5 10 8 6 4 2 6R YS IF 6

Degrees

4 2 0 -2 6R YS IF 7 5 0 -5 6R YS IF 8 5 0 -5 6R YS IF 9 4 2 0 -2 6R YS IF 10

Time (hours)

18 20 22 1/00 1/02 1/04 1/06 1/08 1/10 1/12 1/14 1/16 1/18

4 2 0 -2

Gain phs vs UTC time for 1511-100.MULTI.1 SN 1 Rpol IF 1 - 16

Plot file version 9 created 07-SEP-2022 23:54:30

6R YS IF 11 5 0 -5 6R YS IF 12 5 0 -5 6R YS IF 13 5 0 -5 6R YS IF 14 4 2 0 6R YS IF 15 5 0 -5 6R YS IF 16

Degrees

5 0 -5 -10 7R ZC IF 1 4 3 2 1 7R ZC IF 2 25 20 15 10 5 7R ZC IF 3 30 20 10 0 -10 7R ZC IF 4

Time (hours)

18 20 22 1/00 1/02 1/04 1/06 1/08 1/10 1/12 1/14 1/16 1/18

0 -10 -20

Gain phs vs UTC time for 1511-100.MULTI.1 SN 1 Rpol IF 1 - 16

Plot file version 10 created 07-SEP-2022 23:54:30

7R ZC IF 5 5 0 -5 -10 -15 7R ZC IF 6 20 15 10 5 7R ZC IF 7 0 -20 -40 7R ZC IF 8

-1.0410 -1.0415 -1.0420 -1.0425

7R ZC IF 9 359 358 357 356 7R ZC IF 10

Degrees

360 350 340 7R ZC IF 11 0 -10 -20 7R ZC IF 12 354 352 350 348 346 344 7R ZC IF 13 360 340 320 7R ZC IF 14

Time (hours)

18 20 22 1/00 1/02 1/04 1/06 1/08 1/10 1/12 1/14 1/16 1/18

-3 -4 -5 -6 -7

Gain phs vs UTC time for 1511-100.MULTI.1 SN 1 Rpol IF 1 - 16

Plot file version 11 created 07-SEP-2022 23:54:30

7R ZC IF 15 100 50 0 7R ZC IF 16 0 -20 -40 9R MH IF 1 10 0 -10 -20 -30 9R MH IF 2 20 10 0 9R MH IF 3 20 15 10 5 9R MH IF 4

Degrees

0 -5 -10 -15 9R MH IF 5 10 0 -10 9R MH IF 6 30 20 10 0 9R MH IF 7 20 10 0 9R MH IF 8

Time (hours)

18 20 22 1/00 1/02 1/04 1/06 1/08 1/10 1/12 1/14 1/16 1/18

30 20 10 0 -10

Gain phs vs UTC time for 1511-100.MULTI.1 SN 1 Rpol IF 1 - 16

Plot file version 12 created 07-SEP-2022 23:54:30

9R MH IF 9 0 -20 -40 9R MH IF 10 0 -20 -40 9R MH IF 11 -2 -4 -6 -8 9R MH IF 12 80 60 40 20 0 -20 9R MH IF 13 20 0 -20 9R MH IF 14

Degrees

10 5 0 9R MH IF 15 4 2 0 -2 9R MH IF 16 10 0 -10 10R SV IF 1 0 -10 -20 10R SV IF 2

Time (hours)

18 20 22 1/00 1/02 1/04 1/06 1/08 1/10 1/12 1/14 1/16 1/18

0 -10 -20

Gain phs vs UTC time for 1511-100.MULTI.1 SN 1 Rpol IF 1 - 16

Plot file version 15 created 07-SEP-2022 23:54:30

11R SR IF 7 2 0 -2 -4 -6 11R SR IF 8 30 20 10 0 -10 11R SR IF 9 20 10 0 11R SR IF 10 40 20 0 11R SR IF 11 30 20 10 0 11R SR IF 12

Degrees

30 20 10 0 11R SR IF 13 15 10 5 0 11R SR IF 14 10 5 0 -5 11R SR IF 15 40 20 0 11R SR IF 16

Time (hours)

18 20 22 1/00 1/02 1/04 1/06 1/08 1/10 1/12 1/14 1/16 1/18

5 0 -5 -10

Gain phs vs UTC time for 1511-100.MULTI.1 SN 1 Rpol IF 1 - 16

Plot file version 16 created 07-SEP-2022 23:54:30

12R JB IF 1 40 30 20 12R JB IF 2 10 9 8 7 12R JB IF 3

0.2275 0.2270 0.2265 0.2260 12R JB IF 4 -6 -8 -10 -12 -14 -16 12R JB IF 5 20 10 0 12R JB IF 6

Degrees

6 4 2 0 12R JB IF 7

-10.7830 -10.7835 -10.7840 -10.7845 12R JB IF 9

-2.3255 -2.3260 -2.3265 -2.3270

12R JB IF 10 355 350 345 340 335 12R JB IF 11

Time (hours)

18 20 22 1/00 1/02 1/04 1/06 1/08 1/10 1/12 1/14 1/16 1/18

7.2820 7.2815 7.2810 7.2805

Gain phs vs UTC time for 1511-100.MULTI.1 SN 1 Rpol IF 1 - 16

Plot file version 17 created 07-SEP-2022 23:54:30

12R JB IF 12 40 20 0 12R JB IF 13

3.3190 3.3185 3.3180 3.3175

12R JB IF 14 10 5 0 12R JB IF 15

7.3080 7.3075 7.3070 7.3065 12R JB IF 16

9.5060 9.5055 9.5050 9.5045 19R TR IF 1

Degrees

6 4 2 0 -2 19R TR IF 2 6 4 2 0 -2 19R TR IF 3 3 2 1 0 19R TR IF 4 10 0 -10 19R TR IF 5

Time (hours)

18 20 22 1/00 1/02 1/04 1/06 1/08 1/10 1/12 1/14 1/16 1/18

0 -10 -20 -30

Gain phs vs UTC time for 1511-100.MULTI.1 SN 1 Rpol IF 1 - 16

Plot file version 18 created 07-SEP-2022 23:54:30

19R TR IF 6 5 0 -5 -10 19R TR IF 7 0 -50 -100 -150

19R TR IF 8 20 0 -20 19R TR IF 9 360 358 356 354 352 19R TR IF 10 0 -20 -40 19R TR IF 11

Degrees

60 40 20 0 19R TR IF 12 10 0 -10 19R TR IF 13 0 -10 -20 19R TR IF 14 100 50 0 19R TR IF 15

Time (hours)

18 20 22 1/00 1/02 1/04 1/06 1/08 1/10 1/12 1/14 1/16 1/18

80 60 40 20 0 -20

Gain phs vs UTC time for 1511-100.MULTI.1 SN 1 Rpol IF 1 - 16

Plot file version 19 created 07-SEP-2022 23:54:30

19R TR IF 16

Degrees

Time (hours)

18 20 22 1/00 1/02 1/04 1/06 1/08 1/10 1/12 1/14 1/16 1/18

100 50 0