Gain phs vs UTC time for 1519-273.MULTI.1 SN 1 Rpol IF 1 - 16

Plot file version 1 created 08-SEP-2022 00:02:06

2R HH IF 1

-4256.0 -4256.5 -4257.0 -4257.5 2R HH IF 4

-7072.0 -7072.5 -7073.0 -7073.5 2R HH IF 5

8416.5 8416.0 8415.5 8415.0 2R HH IF 6

10803.0 10802.5 10802.0 10801.5

2R HH IF 7

3134.5 3134.0 3133.5 3133.0 2R HH IF 9

MilliDegrees

2740.5 2740.0 2739.5 2739.0 2R HH IF 10

10525.5 10525.0 10524.5 10524.0 2R HH IF 11 977 976 975 2R HH IF 12

1749.0 1748.5 1748.0 1747.5 2R HH IF 13

Time (hours)

20 27 41.0 41.5 42.0 42.5 43.0

8043.0 8042.5 8042.0 8041.5

Gain phs vs UTC time for 1519-273.MULTI.1 SN 1 Rpol IF 1 - 16

Plot file version 2 created 08-SEP-2022 00:02:06

2R HH IF 14

-641.0 -641.5 -642.0 -642.5

2R HH IF 15

-4685.5 -4686.0 -4686.5 -4687.0

2R HH IF 16

-6045.0 -6045.5 -6046.0 -6046.5 3R MC IF 2

6576.5 6576.0 6575.5 6575.0

3R MC IF 3

-1885.5 -1886.0 -1886.5 -1887.0

3R MC IF 6

MilliDegrees

-18349.0 -18349.5 -18350.0 -18350.5 3R MC IF 10

1060.5 1060.0 1059.5 1059.0

3R MC IF 12

8741.0 8740.5 8740.0 8739.5

3R MC IF 13

-14133.5 -14134.0 -14134.5 -14135.0

4R NT IF 4

Time (hours)

20 27 41.0 41.5 42.0 42.5 43.0

-35629.5 -35630.0 -35630.5 -35631.0

Gain phs vs UTC time for 1519-273.MULTI.1 SN 1 Rpol IF 1 - 16

Plot file version 3 created 08-SEP-2022 00:02:06

4R NT IF 8

18239.0 18238.5 18238.0 18237.5

6R YS IF 1 1 0 -1 6R YS IF 2 1 0 -1 6R YS IF 4 1 0 -1 6R YS IF 5

6517.5 6517.0 6516.5 6516.0

6R YS IF 6

MilliDegrees

1 0 -1 6R YS IF 7 1 0 -1 6R YS IF 8 1 0 -1 6R YS IF 9 1 0 -1 6R YS IF 10

Time (hours)

20 27 41.0 41.5 42.0 42.5 43.0

1 0 -1

Gain phs vs UTC time for 1519-273.MULTI.1 SN 1 Rpol IF 1 - 16

Plot file version 4 created 08-SEP-2022 00:02:06

6R YS IF 11 1 0 -1 6R YS IF 12 1 0 -1 6R YS IF 13 1 0 -1 6R YS IF 14 1 0 -1 6R YS IF 15 1 0 -1 6R YS IF 16

MilliDegrees

1 0 -1 7R ZC IF 5

434.5 434.0 433.5 433.0

7R ZC IF 8

-22622.5 -22623.0 -22623.5 -22624.0

11R SR IF 2

-8403.5 -8404.0 -8404.5 -8405.0

11R SR IF 3

Time (hours)

20 27 41.0 41.5 42.0 42.5 43.0

1105.0 1104.5 1104.0 1103.5

Gain phs vs UTC time for 1519-273.MULTI.1 SN 1 Rpol IF 1 - 16

Plot file version 5 created 08-SEP-2022 00:02:06

11R SR IF 5 1 0 -1 11R SR IF 6

-2256.5 -2257.0 -2257.5 -2258.0

11R SR IF 7

-5013.5 -5014.0 -5014.5 -5015.0

11R SR IF 9

-3764.5 -3765.0 -3765.5 -3766.0

11R SR IF 10

-2117.5 -2118.0 -2118.5 -2119.0

11R SR IF 11

MilliDegrees

7173.5 7173.0 7172.5 7172.0

11R SR IF 12

-6969.5 -6970.0 -6970.5 -6971.0

11R SR IF 13

-4560

-4561

-4562

11R SR IF 14

-2471.0 -2471.5 -2472.0 -2472.5

11R SR IF 15

Time (hours)

20 27 41.0 41.5 42.0 42.5 43.0

3212.5 3212.0 3211.5 3211.0

Gain phs vs UTC time for 1519-273.MULTI.1 SN 1 Rpol IF 1 - 16

Plot file version 6 created 08-SEP-2022 00:02:06

11R SR IF 16

-5500.5 -5501.0 -5501.5 -5502.0

12R JB IF 3

-6911.0 -6911.5 -6912.0 -6912.5

12R JB IF 10

MilliDegrees

Time (hours)

20 27 41.0 41.5 42.0 42.5 43.0

-30205.0 -30205.5 -30206.0 -30206.5