Gain phs vs UTC time for J0242+1101.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 1 created 24-FEB-2020 13:36:12

6 UR IF 1R 20 0 -20 6 UR IF 1L 20 0 -20 6 UR IF 2R 10 0 -10 6 UR IF 2L 10 0 -10 -20 6 UR IF 3R 10 0 -10 -20 6 UR IF 3L

Degrees

10 0 -10 6 UR IF 4R 10 0 -10 6 UR IF 4L 20 10 0 -10 6 UR IF 5R 10 0 -10 6 UR IF 5L

Time (hours)

13 00 30 14 00 30 15 00 30

20 0 -20

Gain phs vs UTC time for J0242+1101.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 2 created 24-FEB-2020 13:36:12

6 UR IF 6R 20 0 -20 6 UR IF 6L 10 0 -10 -20 6 UR IF 7R 20 0 -20 6 UR IF 7L 10 0 -10 -20 6 UR IF 8R 10 0 -10 -20 6 UR IF 8L

Degrees

10 0 -10 -20 10 BD IF 1R 20 0 -20 10 BD IF 1L 10 0 -10 -20 -30 10 BD IF 2R 20 10 0 -10 10 BD IF 2L

Time (hours)

13 00 30 14 00 30 15 00 30

20 0 -20

Gain phs vs UTC time for J0242+1101.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 3 created 24-FEB-2020 13:36:12

10 BD IF 3R 10 0 -10 -20 10 BD IF 3L 20 0 -20 10 BD IF 4R 20 10 0 -10 10 BD IF 4L 20 0 -20 10 BD IF 5R 20 0 -20 10 BD IF 5L

Degrees

10 0 -10 -20 -30 10 BD IF 6R 20 0 -20 10 BD IF 6L 20 0 -20 10 BD IF 7R 20 0 -20 10 BD IF 7L

Time (hours)

13 00 30 14 00 30 15 00 30

20 0 -20

Gain phs vs UTC time for J0242+1101.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 4 created 24-FEB-2020 13:36:12

10 BD IF 8R 20 0 -20 10 BD IF 8L 20 0 -20 12 KT IF 1R 20 0 -20 12 KT IF 1L 20 0 -20 12 KT IF 2R 20 0 -20 12 KT IF 2L

Degrees

20 0 -20 12 KT IF 3R 20 0 -20 12 KT IF 3L 30 20 10 0 -10 12 KT IF 4R 20 0 -20 12 KT IF 4L

Time (hours)

13 00 30 14 00 30 15 00 30

20 0 -20

Gain phs vs UTC time for J0242+1101.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 5 created 24-FEB-2020 13:36:12

12 KT IF 5R 20 0 -20 12 KT IF 5L 20 0 -20 12 KT IF 6R 10 0 -10 -20 -30 12 KT IF 6L 20 0 -20 12 KT IF 7R 10 0 -10 -20 12 KT IF 7L

Degrees

20 10 0 -10 12 KT IF 8R 20 0 -20 12 KT IF 8L 20 0 -20 13 KY IF 1R 20 0 -20 13 KY IF 1L

Time (hours)

13 00 30 14 00 30 15 00 30

20 0 -20

Gain phs vs UTC time for J0242+1101.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 6 created 24-FEB-2020 13:36:12

13 KY IF 2R 10 0 -10 13 KY IF 2L 20 0 -20 13 KY IF 3R 10 0 -10 13 KY IF 3L 10 0 -10 13 KY IF 4R 10 0 -10 13 KY IF 4L

Degrees

10 0 -10 13 KY IF 5R 10 0 -10 -20 13 KY IF 5L 10 0 -10 -20 13 KY IF 6R 20 0 -20 13 KY IF 6L

Time (hours)

13 00 30 14 00 30 15 00 30

10 0 -10

Gain phs vs UTC time for J0242+1101.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 7 created 24-FEB-2020 13:36:12

13 KY IF 7R 20 0 -20 13 KY IF 7L 10 0 -10 13 KY IF 8R 10 0 -10 -20 13 KY IF 8L 10 0 -10 15 T6 IF 1R

0.001

0.000

-0.001

15 T6 IF 1L

Degrees

0.001

0.000

-0.001

15 T6 IF 2R

0.001

0.000

-0.001

15 T6 IF 2L

0.001

0.000

-0.001

15 T6 IF 3R

0.001

0.000

-0.001

15 T6 IF 3L

Time (hours)

13 00 30 14 00 30 15 00 30

0.001

0.000

-0.001

Gain phs vs UTC time for J0242+1101.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 8 created 24-FEB-2020 13:36:12

15 T6 IF 4R

0.001 0.000 -0.001

15 T6 IF 4L

0.001 0.000 -0.001

15 T6 IF 5R

0.001 0.000 -0.001

15 T6 IF 5L

0.001 0.000 -0.001

15 T6 IF 6R

0.001 0.000 -0.001

15 T6 IF 6L

Degrees

0.001 0.000 -0.001

15 T6 IF 7R

0.001 0.000 -0.001

15 T6 IF 7L

0.001 0.000 -0.001

15 T6 IF 8R

0.001 0.000 -0.001

15 T6 IF 8L

Time (hours)

13 00 30 14 00 30 15 00 30

0.001 0.000 -0.001