Gain phs vs UTC time for J0319+4130.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 1 created 24-FEB-2020 13:35:40

3 O6 IF 1R

6.9375 6.9370 6.9365 6.9360 3 O6 IF 1L

11.0070 11.0065 11.0060 11.0055 3 O6 IF 2R

6.1815 6.1810 6.1805 6.1800 3 O6 IF 2L

6.9265 6.9260 6.9255 6.9250 3 O6 IF 3R

2.9855 2.9850 2.9845 2.9840

3 O6 IF 3L

Degrees

5.3870 5.3865 5.3860 5.3855 3 O6 IF 4R

1.3945 1.3940 1.3935 1.3930 3 O6 IF 4L

2.1510 2.1505 2.1500 2.1495

3 O6 IF 5R

0.3640 0.3635 0.3630 0.3625

3 O6 IF 5L

Time (hours)

1/10 58 56.0 56.5 57.0 57.5 58.0

-0.3385 -0.3390 -0.3395 -0.3400

Gain phs vs UTC time for J0319+4130.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 2 created 24-FEB-2020 13:35:40

3 O6 IF 6R

-0.4070 -0.4075 -0.4080 -0.4085

3 O6 IF 6L

1.6065 1.6060 1.6055 1.6050 3 O6 IF 7R

0.0045 0.0040 0.0035 0.0030

3 O6 IF 7L

-1.3230 -1.3235 -1.3240 -1.3245 3 O6 IF 8R

0.5655 0.5650 0.5645 0.5640 3 O6 IF 8L

Degrees

0.3405 0.3400 0.3395 0.3390 4 TR IF 1R

2.8195 2.8190 2.8185 2.8180 4 TR IF 1L

5.2890 5.2885 5.2880 5.2875 4 TR IF 2R

-3.3485 -3.3490 -3.3495 -3.3500 4 TR IF 2L

Time (hours)

1/10 58 56.0 56.5 57.0 57.5 58.0

2.4360 2.4355 2.4350 2.4345

Gain phs vs UTC time for J0319+4130.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 3 created 24-FEB-2020 13:35:40

4 TR IF 3R

-10.0435 -10.0440 -10.0445 -10.0450 -10.0455 4 TR IF 3L

0.3450 0.3445 0.3440 0.3435

4 TR IF 4R

-7.2635 -7.2640 -7.2645 -7.2650

4 TR IF 4L

-3.2120 -3.2125 -3.2130 -3.2135

4 TR IF 5R

-11.9665 -11.9670 -11.9675 -11.9680

4 TR IF 5L

-6.3295 -6.3300 -6.3305 -6.3310

4 TR IF 6L

-11.6485 -11.6490 -11.6495 -11.6500 4 TR IF 7R

-19.2800 -19.2805 -19.2810 -19.2815

4 TR IF 7L

-10.3185 -10.3190 -10.3195 -10.3200 4 TR IF 8R

Time (hours)

1/10 58 56.0 56.5 57.0 57.5 58.0

-24.0005 -24.0010 -24.0015 -24.0020

Gain phs vs UTC time for J0319+4130.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 4 created 24-FEB-2020 13:35:40

4 TR IF 8L

-3.9660 -3.9665 -3.9670 -3.9675

6 UR IF 1R

-4.1690 -4.1695 -4.1700 -4.1705

6 UR IF 1L

-6.9435 -6.9440 -6.9445 -6.9450

6 UR IF 2R

-5.8065 -5.8070 -5.8075 -5.8080

6 UR IF 2L

-6.8465 -6.8470 -6.8475 -6.8480

6 UR IF 3R

-6.3180 -6.3185 -6.3190 -6.3195

6 UR IF 3L

-5.2640 -5.2645 -5.2650 -5.2655

6 UR IF 4R

-6.4050 -6.4055 -6.4060 -6.4065

6 UR IF 4L

-5.7910 -5.7915 -5.7920 -5.7925

6 UR IF 5R

Time (hours)

1/10 58 56.0 56.5 57.0 57.5 58.0

-5.9350 -5.9355 -5.9360 -5.9365

Gain phs vs UTC time for J0319+4130.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 5 created 24-FEB-2020 13:35:40

6 UR IF 5L

-5.9270 -5.9275 -5.9280 -5.9285

6 UR IF 6R

-8.0305 -8.0310 -8.0315 -8.0320

6 UR IF 6L

-7.0715 -7.0720 -7.0725 -7.0730

6 UR IF 7R

-8.3355 -8.3360 -8.3365 -8.3370

6 UR IF 7L

-7.4120 -7.4125 -7.4130 -7.4135

6 UR IF 8R

Degrees

-7.9670 -7.9675 -7.9680 -7.9685

6 UR IF 8L

-8.6320 -8.6325 -8.6330 -8.6335

8 SV IF 1R

16.8665 16.8660 16.8655 16.8650

8 SV IF 1L

26.6625 26.6620 26.6615 26.6610

8 SV IF 2R

Time (hours)

1/10 58 56.0 56.5 57.0 57.5 58.0

22.7775 22.7770 22.7765 22.7760

Gain phs vs UTC time for J0319+4130.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 6 created 24-FEB-2020 13:35:40

8 SV IF 2L

26.8820 26.8815 26.8810 26.8805

8 SV IF 3R

13.0050 13.0045 13.0040 13.0035

8 SV IF 3L

14.8995 14.8990 14.8985 14.8980

8 SV IF 4L

12.4425 12.4420 12.4415 12.4410

8 SV IF 5R

5.5300 5.5295 5.5290 5.5285

8 SV IF 5L

1.1140 1.1135 1.1130 1.1125

8 SV IF 6L

8.1010 8.1005 8.1000 8.0995

8 SV IF 7L

-0.1540 -0.1545 -0.1550 -0.1555

10 BD IF 1R

-10.1705 -10.1710 -10.1715 -10.1720

10 BD IF 1L

Time (hours)

1/10 58 56.0 56.5 57.0 57.5 58.0

-2.4170 -2.4175 -2.4180 -2.4185

Gain phs vs UTC time for J0319+4130.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 7 created 24-FEB-2020 13:35:40

10 BD IF 2R

-7.1165 -7.1170 -7.1175 -7.1180

10 BD IF 2L

2.3300 2.3295 2.3290 2.3285

10 BD IF 3R

-18.2260 -18.2265 -18.2270 -18.2275

10 BD IF 3L

-5.9270 -5.9275 -5.9280 -5.9285

10 BD IF 4R

-12.0080 -12.0085 -12.0090 -12.0095

10 BD IF 4L

0.5540 0.5535 0.5530 0.5525

10 BD IF 5R

-21.4925 -21.4930 -21.4935 -21.4940

10 BD IF 5L

-8.5520 -8.5525 -8.5530 -8.5535

10 BD IF 6R

-20.0270 -20.0275 -20.0280 -20.0285

10 BD IF 6L

Time (hours)

1/10 58 56.0 56.5 57.0 57.5 58.0

-4.8145 -4.8150 -4.8155 -4.8160

Gain phs vs UTC time for J0319+4130.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 8 created 24-FEB-2020 13:35:40

10 BD IF 7R

-30.4880 -30.4885 -30.4890 -30.4895

10 BD IF 7L

-15.3050 -15.3055 -15.3060 -15.3065

12 KT IF 1R

1.0350 1.0345 1.0340 1.0335

12 KT IF 1L

-1.6210 -1.6215 -1.6220 -1.6225

12 KT IF 2R

0.5430 0.5425 0.5420 0.5415

12 KT IF 2L

-0.7855 -0.7860 -0.7865 -0.7870

12 KT IF 3R

-0.6810 -0.6815 -0.6820 -0.6825

12 KT IF 3L

-0.0025 -0.0030 -0.0035 -0.0040

12 KT IF 4R

-0.4165 -0.4170 -0.4175 -0.4180

12 KT IF 4L

Time (hours)

1/10 58 56.0 56.5 57.0 57.5 58.0

-0.0055 -0.0060 -0.0065 -0.0070

Gain phs vs UTC time for J0319+4130.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 9 created 24-FEB-2020 13:35:40

12 KT IF 5R

-0.1405 -0.1410 -0.1415 -0.1420

12 KT IF 5L

-0.3995 -0.4000 -0.4005 -0.4010 -0.4015

12 KT IF 6R

0.2740 0.2735 0.2730 0.2725

12 KT IF 6L

-0.4070 -0.4075 -0.4080 -0.4085

12 KT IF 7R

-0.0965 -0.0970 -0.0975 -0.0980

12 KT IF 7L

Degrees

0.3095 0.3090 0.3085 0.3080

12 KT IF 8R

-0.0610 -0.0615 -0.0620 -0.0625

12 KT IF 8L

-0.0165 -0.0170 -0.0175 -0.0180

13 KY IF 1R

1.2325 1.2320 1.2315 1.2310

13 KY IF 1L

Time (hours)

1/10 58 56.0 56.5 57.0 57.5 58.0

-1.6705 -1.6710 -1.6715 -1.6720

Gain phs vs UTC time for J0319+4130.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 10 created 24-FEB-2020 13:35:40

13 KY IF 2R

0.7180 0.7175 0.7170 0.7165

13 KY IF 2L

-0.7520 -0.7525 -0.7530 -0.7535

13 KY IF 3R

-0.4560 -0.4565 -0.4570 -0.4575

13 KY IF 3L

0.1420 0.1415 0.1410 0.1405

13 KY IF 4R

-0.2665 -0.2670 -0.2675 -0.2680

13 KY IF 4L

Degrees

-0.0480 -0.0485 -0.0490 -0.0495

13 KY IF 5R

-0.1860 -0.1865 -0.1870 -0.1875

13 KY IF 5L

-0.5515 -0.5520 -0.5525 -0.5530

13 KY IF 6R

0.2060 0.2055 0.2050 0.2045

13 KY IF 6L

Time (hours)

1/10 58 56.0 56.5 57.0 57.5 58.0

-0.7935 -0.7940 -0.7945 -0.7950

Gain phs vs UTC time for J0319+4130.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 11 created 24-FEB-2020 13:35:40

13 KY IF 7R

-0.3145 -0.3150 -0.3155 -0.3160

13 KY IF 7L

-0.2560 -0.2565 -0.2570 -0.2575

13 KY IF 8R

-0.3755 -0.3760 -0.3765 -0.3770

13 KY IF 8L

-0.6070 -0.6075 -0.6080 -0.6085

14 KU IF 1R

3.1875 3.1870 3.1865 3.1860

14 KU IF 1L

0.7270 0.7265 0.7260 0.7255

14 KU IF 2R

2.7415 2.7410 2.7405 2.7400

14 KU IF 2L

1.5040 1.5035 1.5030 1.5025

14 KU IF 3R

1.3610 1.3605 1.3600 1.3595

14 KU IF 3L

Time (hours)

1/10 58 56.0 56.5 57.0 57.5 58.0

2.2435 2.2430 2.2425 2.2420

Gain phs vs UTC time for J0319+4130.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 12 created 24-FEB-2020 13:35:40

14 KU IF 4R

1.8855 1.8850 1.8845 1.8840

14 KU IF 4L

2.1665 2.1660 2.1655 2.1650

14 KU IF 5R

2.0140 2.0135 2.0130 2.0125

14 KU IF 5L

1.8190 1.8185 1.8180 1.8175

14 KU IF 6R

2.2820 2.2815 2.2810 2.2805

14 KU IF 6L

1.8790 1.8785 1.8780 1.8775

14 KU IF 7R

1.7495 1.7490 1.7485 1.7480

14 KU IF 7L

2.3715 2.3710 2.3705 2.3700

14 KU IF 8R

2.0070 2.0065 2.0060 2.0055

14 KU IF 8L

Time (hours)

1/10 58 56.0 56.5 57.0 57.5 58.0

2.2005 2.2000 2.1995 2.1990