Gain phs vs UTC time for J0448-2109.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 1 created 24-FEB-2020 13:36:07

6 UR IF 2L 15 10 5 0 6 UR IF 3R 10 0 -10 6 UR IF 3L 30 25 20 15 6 UR IF 4R 0 -5 -10 -15 6 UR IF 5R

7.9305 7.9300 7.9295 7.9290

6 UR IF 6R

Degrees

350 340 330 320 6 UR IF 6L

20.0285 20.0280 20.0275 20.0270 6 UR IF 7R

-15.5745 -15.5750 -15.5755 -15.5760

6 UR IF 8R

2.7745 2.7740 2.7735 2.7730

6 UR IF 8L

Time (hours)

15 30 16 00 30 17 00 30 18 00

-8 -10 -12 -14 -16

Gain phs vs UTC time for J0448-2109.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 2 created 24-FEB-2020 13:36:07

10 BD IF 1R 5 0 -5 10 BD IF 1L 4 2 0 -2 -4 -6 10 BD IF 2R 20 0 -20 10 BD IF 2L 10 5 0 10 BD IF 3R 5 0 -5 -10 10 BD IF 3L

Degrees

20 10 0 -10 10 BD IF 4R 20 10 0 10 BD IF 4L 10 5 0 10 BD IF 5R 10 0 -10 -20 10 BD IF 5L

Time (hours)

15 30 16 00 30 17 00 30 18 00

0 -10 -20

Gain phs vs UTC time for J0448-2109.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 3 created 24-FEB-2020 13:36:07

10 BD IF 6R 15 10 5 0 10 BD IF 6L 8 6 4 2 0 10 BD IF 7R 10 0 -10 10 BD IF 7L 5 0 -5 10 BD IF 8R 10 5 0 10 BD IF 8L

Degrees

20 10 0 12 KT IF 1R 20 0 -20 12 KT IF 1L 10 0 -10 -20 12 KT IF 2R 20 0 -20 12 KT IF 2L

Time (hours)

15 30 16 00 30 17 00 30 18 00

10 0 -10 -20

Gain phs vs UTC time for J0448-2109.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 4 created 24-FEB-2020 13:36:07

12 KT IF 3R 150 100 50 0 12 KT IF 3L 20 0 -20 12 KT IF 4R 20 0 -20 12 KT IF 4L 20 0 -20 12 KT IF 5R 20 0 -20 12 KT IF 5L

Degrees

20 0 -20 12 KT IF 6R 10 0 -10 -20 12 KT IF 6L 20 0 -20 12 KT IF 7R 10 0 -10 -20 12 KT IF 7L

Time (hours)

15 30 16 00 30 17 00 30 18 00

100 50 0

Gain phs vs UTC time for J0448-2109.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 5 created 24-FEB-2020 13:36:07

12 KT IF 8R 10 0 -10 -20 12 KT IF 8L 20 0 -20 13 KY IF 1R 20 0 -20 13 KY IF 1L 20 0 -20 13 KY IF 2R 30 20 10 0 -10 13 KY IF 2L

Degrees

20 0 -20 13 KY IF 3R 0 -50 -100 -150

13 KY IF 3L 60 40 20 0 13 KY IF 4R 0 -50 -100 -150

13 KY IF 4L

Time (hours)

15 30 16 00 30 17 00 30 18 00

10 0 -10

Gain phs vs UTC time for J0448-2109.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 6 created 24-FEB-2020 13:36:07

13 KY IF 5R 20 0 -20 13 KY IF 5L 20 0 -20 13 KY IF 6R 20 0 -20 13 KY IF 6L 10 0 -10 13 KY IF 7R 20 0 -20 13 KY IF 7L

Degrees

20 10 0 -10 13 KY IF 8R 20 0 -20 13 KY IF 8L 20 0 -20 15 T6 IF 1R

0.001

0.000

-0.001

15 T6 IF 1L

Time (hours)

15 30 16 00 30 17 00 30 18 00

0.001

0.000

-0.001

Gain phs vs UTC time for J0448-2109.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 7 created 24-FEB-2020 13:36:07

15 T6 IF 2R

0.001 0.000 -0.001

15 T6 IF 2L

0.001 0.000 -0.001

15 T6 IF 3R

0.001 0.000 -0.001

15 T6 IF 3L

0.001 0.000 -0.001

15 T6 IF 4R

0.001 0.000 -0.001

15 T6 IF 4L

Degrees

0.001 0.000 -0.001

15 T6 IF 5R

0.001 0.000 -0.001

15 T6 IF 5L

0.001 0.000 -0.001

15 T6 IF 6R

0.001 0.000 -0.001

15 T6 IF 6L

Time (hours)

15 30 16 00 30 17 00 30 18 00

0.001 0.000 -0.001

Gain phs vs UTC time for J0448-2109.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 8 created 24-FEB-2020 13:36:07

15 T6 IF 7R

0.001 0.000 -0.001

15 T6 IF 7L

0.001 0.000 -0.001

15 T6 IF 8R

0.001 0.000 -0.001

15 T6 IF 8L

Degrees

Time (hours)

15 30 16 00 30 17 00 30 18 00

0.001 0.000 -0.001