Gain phs vs UTC time for J0721+7120.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 1 created 24-FEB-2020 13:36:01

1 EF IF 1R

0.001 0.000 -0.001 1 EF IF 1L

0.001 0.000 -0.001 1 EF IF 2R

0.001 0.000 -0.001 1 EF IF 2L

0.001 0.000 -0.001 1 EF IF 3R

0.001 0.000 -0.001 1 EF IF 3L

Degrees

0.001 0.000 -0.001 1 EF IF 4R

0.001 0.000 -0.001 1 EF IF 4L

0.001 0.000 -0.001 1 EF IF 5R

0.001 0.000 -0.001 1 EF IF 5L

Time (hours)

12 14 16 18 20 22 1/00 1/02 1/04 1/06 1/08 1/10 1/12

0.001 0.000 -0.001

Gain phs vs UTC time for J0721+7120.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 2 created 24-FEB-2020 13:36:01

1 EF IF 6R

0.001

0.000

-0.001 1 EF IF 6L

0.001

0.000

-0.001 1 EF IF 7R

0.001

0.000

-0.001 1 EF IF 7L

0.001

0.000

-0.001 1 EF IF 8R

0.001

0.000

-0.001 1 EF IF 8L

0.001

0.000

-0.001 2 MC IF 1R 30 20 10 0 2 MC IF 1L 20 10 0 2 MC IF 2R 60 40 20 0 2 MC IF 2L

Time (hours)

12 14 16 18 20 22 1/00 1/02 1/04 1/06 1/08 1/10 1/12

0 -20 -40 -60

Gain phs vs UTC time for J0721+7120.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 3 created 24-FEB-2020 13:36:05

2 MC IF 3R 10 0 -10 2 MC IF 3L 20 10 0 2 MC IF 4R 0 -20 -40 2 MC IF 4L 15 10 5 0 2 MC IF 5R 20 10 0 2 MC IF 5L 0 -50 -100

2 MC IF 6R 20 10 0 2 MC IF 6L 3 2 1 0 2 MC IF 7R 20 10 0 2 MC IF 7L

Time (hours)

12 14 16 18 20 22 1/00 1/02 1/04 1/06 1/08 1/10 1/12

0 -50 -100 -150

Gain phs vs UTC time for J0721+7120.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 4 created 24-FEB-2020 13:36:05

2 MC IF 8R 20 10 0 2 MC IF 8L 0 -10 -20 3 O6 IF 1R 20 10 0 3 O6 IF 1L 15 10 5 0 3 O6 IF 2R 60 40 20 0 3 O6 IF 2L 0 -20 -40 -60 -80 3 O6 IF 3R 15 10 5 3 O6 IF 3L 40 30 20 10 3 O6 IF 4R 15 10 5 3 O6 IF 4L

Time (hours)

12 14 16 18 20 22 1/00 1/02 1/04 1/06 1/08 1/10 1/12

8 7 6 5

Gain phs vs UTC time for J0721+7120.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 5 created 24-FEB-2020 13:36:05

3 O6 IF 5R 15 10 5 3 O6 IF 5L 5 0 -5 -10 3 O6 IF 6R 15 10 5 3 O6 IF 6L 10 5 0 3 O6 IF 7R 20 10 0 3 O6 IF 7L 0 -50 -100 -150 3 O6 IF 8R 20 15 10 5 3 O6 IF 8L 0 -20 -40 4 TR IF 1R 20 10 0 4 TR IF 1L

Time (hours)

12 14 16 18 20 22 1/00 1/02 1/04 1/06 1/08 1/10 1/12

15 10 5

Gain phs vs UTC time for J0721+7120.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 6 created 24-FEB-2020 13:36:05

4 TR IF 2R 80 60 40 20 0 4 TR IF 2L 10 8 6 4 TR IF 3R 20 10 0 4 TR IF 3L 30 20 10 0 -10 4 TR IF 4R 60 40 20 0 4 TR IF 4L 10 5 0 4 TR IF 5R 20 10 0 4 TR IF 5L 3 2 1 4 TR IF 6R 20 10 0 4 TR IF 6L

Time (hours)

12 14 16 18 20 22 1/00 1/02 1/04 1/06 1/08 1/10 1/12

40 30 20 10

Gain phs vs UTC time for J0721+7120.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 7 created 24-FEB-2020 13:36:05

4 TR IF 7R 10 5 0 -5 4 TR IF 7L 0 -50 -100 -150

4 TR IF 8R 20 10 0 4 TR IF 8L 100 50 0 5 JB IF 1R 15 10 5 5 JB IF 1L 5.5 5.0 4.5 5 JB IF 2R 60 40 20 0 5 JB IF 2L 358 357 356 5 JB IF 3R

3.9035 3.9030 3.9025 3.9020

5 JB IF 3L

Time (hours)

12 14 16 18 20 22 1/00 1/02 1/04 1/06 1/08 1/10 1/12

25 20 15 10 5

Gain phs vs UTC time for J0721+7120.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 8 created 24-FEB-2020 13:36:05

5 JB IF 4R 10 5 0 5 JB IF 4L 359 358 357 356 355 5 JB IF 5R

0.1740 0.1735 0.1730 0.1725

5 JB IF 5L

0.8185 0.8180 0.8175 0.8170

5 JB IF 6R 10 5 0 5 JB IF 6L 2 1 0 -1 5 JB IF 7R 15 10 5 0 5 JB IF 7L

2.0965 2.0960 2.0955 2.0950 2.0945

5 JB IF 8R 20 15 10 5 5 JB IF 8L

Time (hours)

12 14 16 18 20 22 1/00 1/02 1/04 1/06 1/08 1/10 1/12

-3.7005 -3.7010 -3.7015 -3.7020

Gain phs vs UTC time for J0721+7120.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 9 created 24-FEB-2020 13:36:05

6 UR IF 1R 20 10 0 6 UR IF 1L 15 10 5 0 6 UR IF 2R 60 40 20 0 6 UR IF 2L 0 -20 -40 -60 -80 6 UR IF 3R 20 10 0 6 UR IF 3L 40 20 0 6 UR IF 4R 15 10 5 0 6 UR IF 4L 10 5 0 6 UR IF 5R 15 10 5 0 6 UR IF 5L

Time (hours)

12 14 16 18 20 22 1/00 1/02 1/04 1/06 1/08 1/10 1/12

0 -50 -100

Gain phs vs UTC time for J0721+7120.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 10 created 24-FEB-2020 13:36:05

6 UR IF 6R 15 10 5 0 6 UR IF 6L 0.0 -0.5 -1.0 -1.5

6 UR IF 7R 20 10 0 6 UR IF 7L 0 -50 -100 -150

6 UR IF 8R 20 10 0 6 UR IF 8L 100 50 0 7 YS IF 1R 30 20 10 0 7 YS IF 1L 20 10 0 -10 7 YS IF 2R 150 100 50 0 7 YS IF 2L

Time (hours)

12 14 16 18 20 22 1/00 1/02 1/04 1/06 1/08 1/10 1/12

0 -50 -100

Gain phs vs UTC time for J0721+7120.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 11 created 24-FEB-2020 13:36:05

7 YS IF 3R 30 20 10 0 -10 7 YS IF 3L 40 20 0 7 YS IF 4R 20 10 0 7 YS IF 4L 20 10 0 -10 7 YS IF 5R 30 20 10 0 -10 7 YS IF 5L 10 0 -10 -20 -30 7 YS IF 6R 30 20 10 0 -10 7 YS IF 6L 20 15 10 5 7 YS IF 7R 30 20 10 0 -10 7 YS IF 7L

Time (hours)

12 14 16 18 20 22 1/00 1/02 1/04 1/06 1/08 1/10 1/12

300 200 100 0

Gain phs vs UTC time for J0721+7120.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 12 created 24-FEB-2020 13:36:05

7 YS IF 8R 30 20 10 0 -10 7 YS IF 8L 150 100 50 0 8 SV IF 1R 5 0 -5 8 SV IF 1L 10 5 0 -5 8 SV IF 2R 60 40 20 0 8 SV IF 2L 0 -20 -40 8 SV IF 3R 40 20 0 8 SV IF 3L 10 5 0 -5 8 SV IF 4R 150 100 50 0 8 SV IF 4L

Time (hours)

12 14 16 18 20 22 1/00 1/02 1/04 1/06 1/08 1/10 1/12

15 10 5 0

Gain phs vs UTC time for J0721+7120.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 15 created 24-FEB-2020 13:36:06

9 ZC IF 7R

-7.8535 -7.8540 -7.8545 -7.8550

9 ZC IF 7L

-7.3360 -7.3365 -7.3370 -7.3375

9 ZC IF 8R

-0.5870 -0.5875 -0.5880 -0.5885

9 ZC IF 8L

-2.1470 -2.1475 -2.1480 -2.1485 10 BD IF 1R 20 10 0 10 BD IF 1L

Degrees

15 10 5 0 -5 10 BD IF 2R 80 60 40 20 0 10 BD IF 2L 20 0 -20 -40 -60 10 BD IF 3R 15 10 5 0 -5 10 BD IF 3L

Time (hours)

12 14 16 18 20 22 1/00 1/02 1/04 1/06 1/08 1/10 1/12

20 10 0

Gain phs vs UTC time for J0721+7120.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 16 created 24-FEB-2020 13:36:06

10 BD IF 4R 20 10 0 10 BD IF 4L 15 10 5 0 10 BD IF 5R 15 10 5 0 -5 10 BD IF 5L 0 -5 -10 10 BD IF 6R 20 10 0 10 BD IF 6L 10 5 0 10 BD IF 7R 15 10 5 0 -5 10 BD IF 7L 350 300 250 200 10 BD IF 8R 30 20 10 0 10 BD IF 8L

Time (hours)

12 14 16 18 20 22 1/00 1/02 1/04 1/06 1/08 1/10 1/12

-2.3985 -2.3990 -2.3995 -2.4000

Gain phs vs UTC time for J0721+7120.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 17 created 24-FEB-2020 13:36:06

12 KT IF 1R 20 10 0 12 KT IF 1L 15 10 5 0 -5 12 KT IF 2R 150 100 50 0 12 KT IF 2L 0 -20 -40 12 KT IF 3R 40 20 0 12 KT IF 3L 30 20 10 0 12 KT IF 4R 20 10 0 12 KT IF 4L 10 5 0 -5 12 KT IF 5R 20 10 0 -10 12 KT IF 5L

Time (hours)

12 14 16 18 20 22 1/00 1/02 1/04 1/06 1/08 1/10 1/12

6 4 2 0

Gain phs vs UTC time for J0721+7120.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 18 created 24-FEB-2020 13:36:06

12 KT IF 6R 30 20 10 0 -10 12 KT IF 6L 10 5 0 12 KT IF 7R 20 10 0 -10 12 KT IF 7L 0 -50 -100

12 KT IF 8R 20 10 0 -10 12 KT IF 8L 150 100 50 0 13 KY IF 1R 20 10 0 13 KY IF 1L 10 5 0 13 KY IF 2R 100 50 0 13 KY IF 2L

Time (hours)

12 14 16 18 20 22 1/00 1/02 1/04 1/06 1/08 1/10 1/12

0 -20 -40 -60

Gain phs vs UTC time for J0721+7120.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 19 created 24-FEB-2020 13:36:06

13 KY IF 3R 15 10 5 0 -5 13 KY IF 3L 20 0 -20 13 KY IF 4R 10 5 0 -5 13 KY IF 4L 10 5 0 13 KY IF 5R 10 5 0 -5 13 KY IF 5L 0 -50 -100

13 KY IF 6R 15 10 5 0 13 KY IF 6L 0 -1 -2 13 KY IF 7R 15 10 5 0 -5 13 KY IF 7L

Time (hours)

12 14 16 18 20 22 1/00 1/02 1/04 1/06 1/08 1/10 1/12

0 -50 -100 -150

Gain phs vs UTC time for J0721+7120.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 20 created 24-FEB-2020 13:36:06

13 KY IF 8R 15 10 5 0 -5 13 KY IF 8L 0 -20 -40 -60 -80 14 KU IF 1L 11 10 9 8 14 KU IF 2R

18.5990 18.5985 18.5980 18.5975

14 KU IF 2L 0 -20 -40 -60 14 KU IF 3R

9.5910 9.5905 9.5900 9.5895

14 KU IF 3L

20.4985 20.4980 20.4975 20.4970

14 KU IF 4R 10 0 -10 -20 14 KU IF 4L 12 10 8 14 KU IF 5R

Time (hours)

12 14 16 18 20 22 1/00 1/02 1/04 1/06 1/08 1/10 1/12

9.6810 9.6805 9.6800 9.6795

Gain phs vs UTC time for J0721+7120.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 21 created 24-FEB-2020 13:36:06

14 KU IF 5L

42.9390 42.9385 42.9380 42.9375

14 KU IF 6R

12.5 12.0 11.5 11.0

14 KU IF 6L 0 -10 -20 14 KU IF 7R 10 8 6 14 KU IF 7L

-139 -140 -141 -142 -143

14 KU IF 8R

11.3775 11.3770 11.3765 11.3760

15 T6 IF 1R 20 10 0 15 T6 IF 1L 15 10 5 0 15 T6 IF 2R 150 100 50 0 15 T6 IF 2L

Time (hours)

12 14 16 18 20 22 1/00 1/02 1/04 1/06 1/08 1/10 1/12

0 -50 -100

Gain phs vs UTC time for J0721+7120.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 22 created 24-FEB-2020 13:36:06

15 T6 IF 3R 20 10 0 15 T6 IF 3L 20 10 0 15 T6 IF 4R 15 10 5 0 -5 15 T6 IF 4L 10 5 0 -5 15 T6 IF 5R 15 10 5 0 15 T6 IF 5L 350 300 250 15 T6 IF 6R 15 10 5 0 -5 15 T6 IF 6L 2 0 -2 15 T6 IF 7R 20 10 0 15 T6 IF 7L

Time (hours)

12 14 16 18 20 22 1/00 1/02 1/04 1/06 1/08 1/10 1/12

350 300 250 200

Gain phs vs UTC time for J0721+7120.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 23 created 24-FEB-2020 13:36:06

15 T6 IF 8R 20 10 0 15 T6 IF 8L 100 50 0 16 SR IF 1R 30 20 10 0 16 SR IF 1L 20 10 0 16 SR IF 2R 150 100 50 0 16 SR IF 2L 0 -20 -40 16 SR IF 3R 20 10 0 16 SR IF 3L 40 20 0 16 SR IF 4R 15 10 5 0 16 SR IF 4L

Time (hours)

12 14 16 18 20 22 1/00 1/02 1/04 1/06 1/08 1/10 1/12

15 10 5 0

Gain phs vs UTC time for J0721+7120.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 24 created 24-FEB-2020 13:36:06

16 SR IF 5R 15 10 5 0 -5 16 SR IF 5L 0 -50 -100

16 SR IF 6R 20 10 0 16 SR IF 6L -2 -4 -6 16 SR IF 7R 20 10 0 16 SR IF 7L 0 -50 -100

16 SR IF 8R 20 10 0 16 SR IF 8L

Time (hours)

12 14 16 18 20 22 1/00 1/02 1/04 1/06 1/08 1/10 1/12

-2 -4 -6 -8 -10 -12