Gain phs vs UTC time for 0054+161.MULTI.1 SN 1 Rpol IF 1 - 8

Plot file version 1 created 15-APR-2021 17:39:31

1R UR IF 2 100 80 60 40 20 1R UR IF 3

-104.0550 -104.0555 -104.0560 -104.0565 1R UR IF 6 -20 -40 -60 1R UR IF 8

75.1115 75.1110 75.1105 75.1100

2R TR IF 3 100 50 0 -50 2R TR IF 4

Degrees

50 0 -50 -100

3R MH IF 1

60.3670 60.3665 60.3660 60.3655

3R MH IF 2

72.5525 72.5520 72.5515 72.5510

3R MH IF 3

65.7865 65.7860 65.7855 65.7850

3R MH IF 4

Time (hours)

10 12 14 16 18 20 22 1/00 1/02

89.5080 89.5075 89.5070 89.5065

Gain phs vs UTC time for 0054+161.MULTI.1 SN 1 Rpol IF 1 - 8

Plot file version 2 created 15-APR-2021 17:39:31

3R MH IF 5 50 0 -50 -100 3R MH IF 6 40 30 20 4R KU IF 1 150 100 50 0 4R KU IF 3

-103.5520 -103.5525 -103.5530 -103.5535

4R KU IF 4

55.4055 55.4050 55.4045 55.4040

4R KU IF 5

Degrees

0.001

0.000

-0.001

4R KU IF 6

0.001

0.000

-0.001

5R KT IF 1

169.1140 169.1135 169.1130 169.1125

5R KT IF 2

157.4145 157.4140 157.4135 157.4130

5R KT IF 3

Time (hours)

10 12 14 16 18 20 22 1/00 1/02

0.001

0.000

-0.001

Gain phs vs UTC time for 0054+161.MULTI.1 SN 1 Rpol IF 1 - 8

Plot file version 3 created 15-APR-2021 17:39:31

5R KT IF 4

174947.5 174947.0 174946.5 174946.0 5R KT IF 7

141688.5 141688.0 141687.5 141687.0 5R KT IF 8 0 -20000 -40000 -60000 6R KY IF 2 1 0 -1 6R KY IF 3 1 0 -1 6R KY IF 4

MilliDegrees

169923.0 169922.5 169922.0 169921.5

6R KY IF 5 1 0 -1 6R KY IF 6

80000 60000 40000 20000 0 6R KY IF 7

27099.0 27098.5 27098.0 27097.5 6R KY IF 8

Time (hours)

10 12 14 16 18 20 22 1/00 1/02

1 0 -1

Gain phs vs UTC time for 0054+161.MULTI.1 SN 1 Rpol IF 1 - 8

Plot file version 4 created 15-APR-2021 17:39:31

9R DA IF 1

-86512.5 -86513.0 -86513.5 -86514.0 9R DA IF 2

250000

200000

9R DA IF 6

200000 150000 100000

9R DA IF 7

-72062.0 -72062.5 -72063.0 -72063.5 10R KN IF 1

-80000 -100000 -120000 -140000 -160000 10R KN IF 2

MilliDegrees

-50000 -100000 -150000

10R KN IF 6

-91146.0 -91146.5 -91147.0 -91147.5 11R PI IF 2

-30000 -35000 -40000 -45000

11R PI IF 6

-80000 -100000 -120000 -140000 -160000

11R PI IF 7

Time (hours)

10 12 14 16 18 20 22 1/00 1/02

-118162.0 -118162.5 -118163.0 -118163.5

Gain phs vs UTC time for 0054+161.MULTI.1 SN 1 Rpol IF 1 - 8

Plot file version 5 created 15-APR-2021 17:39:31

12R YS IF 1 20 0 -20 12R YS IF 2 20 0 -20 12R YS IF 3 5 0 -5 -10 -15 12R YS IF 4 360 355 350 345 12R YS IF 5 354 352 350 348 346 12R YS IF 6

Degrees

-5.5 -5.6 -5.7 -5.8

12R YS IF 7 0 -50 -100

12R YS IF 8 30 20 10 0 13R EF IF 1

0.001

0.000

-0.001

13R EF IF 2

Time (hours)

10 12 14 16 18 20 22 1/00 1/02

0.001

0.000

-0.001

Gain phs vs UTC time for 0054+161.MULTI.1 SN 1 Rpol IF 1 - 8

Plot file version 6 created 15-APR-2021 17:39:31

13R EF IF 3 1 0 -1 13R EF IF 4 1 0 -1 13R EF IF 5 1 0 -1 13R EF IF 6 1 0 -1 13R EF IF 7 1 0 -1 14R SR IF 1

MilliDegrees

20000 0 -20000 -40000 -60000 -80000

14R SR IF 2

20000 0 -20000 -40000 -60000

14R SR IF 3 0 -20000 -40000 -60000

14R SR IF 4 0 -20000 -40000 -60000 -80000

14R SR IF 5

Time (hours)

10 12 14 16 18 20 22 1/00 1/02

60000 40000 20000 0

Gain phs vs UTC time for 0054+161.MULTI.1 SN 1 Rpol IF 1 - 8

Plot file version 7 created 15-APR-2021 17:39:31

14R SR IF 6

-11086.0 -11086.5 -11087.0 -11087.5

14R SR IF 7

5000 0 -5000

14R SR IF 8

20000 0 -20000

15R T6 IF 1 1 0 -1 15R T6 IF 2 1 0 -1 16R SV IF 2

MilliDegrees

1 0 -1 16R SV IF 3 0 -20000 -40000 -60000

16R SV IF 4

-103371.0 -103371.5 -103372.0 -103372.5 16R SV IF 6

56551.0 56550.5 56550.0 56549.5

17R ZC IF 1

Time (hours)

10 12 14 16 18 20 22 1/00 1/02

200000 150000 100000

Gain phs vs UTC time for 0054+161.MULTI.1 SN 1 Rpol IF 1 - 8

Plot file version 8 created 15-APR-2021 17:39:31

17R ZC IF 4

130982.5 130982.0 130981.5 130981.0

17R ZC IF 5 1 0 -1 17R ZC IF 6 1 0 -1 18R BD IF 1

-172162.5 -172163.0 -172163.5 -172164.0

18R BD IF 2

352000 350000 348000

18R BD IF 4

MilliDegrees

1 0 -1 18R BD IF 6

-82804.0 -82804.5 -82805.0 -82805.5

18R BD IF 7

160929.5 160929.0 160928.5 160928.0 160927.5

18R BD IF 8

-134405.5 -134406.0 -134406.5 -134407.0 19R O6 IF 4

Time (hours)

10 12 14 16 18 20 22 1/00 1/02

140933.0 140932.5 140932.0 140931.5

Gain phs vs UTC time for 0054+161.MULTI.1 SN 1 Rpol IF 1 - 8

Plot file version 9 created 15-APR-2021 17:39:31

19R O6 IF 6 1 0 -1 19R O6 IF 7 0 -50000 -100000 -150000

19R O6 IF 8

-64605.0 -64605.5 -64606.0 -64606.5

20R HH IF 2

-96940.5 -96941.0 -96941.5 -96942.0

20R HH IF 6

50000 0 -50000

21R MC IF 4

MilliDegrees

-71950.5 -71951.0 -71951.5 -71952.0

21R MC IF 5

97530.0 97529.5 97529.0 97528.5

22R HO IF 2

Time (hours)

10 12 14 16 18 20 22 1/00 1/02

-109320.0 -109320.5 -109321.0 -109321.5