Gain phs vs UTC time for 0237-027.MULTI.1 SN 1 Rpol IF 1 - 8

Plot file version 1 created 15-APR-2021 17:42:39

1R UR IF 6

-63289

-63290

-63291 1R UR IF 7

-125714.5 -125715.0 -125715.5 -125716.0 2R TR IF 2

6305.5 6305.0 6304.5 6304.0 2R TR IF 3

-2236.5 -2237.0 -2237.5 -2238.0

3R MH IF 1

1132.0 1131.5 1131.0 1130.5 3R MH IF 2

MilliDegrees

-8871.0 -8871.5 -8872.0 -8872.5 3R MH IF 3

20000 0 -20000

3R MH IF 4

322000 320000 318000 316000 314000 312000 3R MH IF 5

-9616.0 -9616.5 -9617.0 -9617.5

3R MH IF 6

Time (hours)

14 16 18 20 22 1/00 1/02

-11375.0 -11375.5 -11376.0 -11376.5

Gain phs vs UTC time for 0237-027.MULTI.1 SN 1 Rpol IF 1 - 8

Plot file version 2 created 15-APR-2021 17:42:39

3R MH IF 7 -5 -10 4R KU IF 1

65.3495 65.3490 65.3485 65.3480 4R KU IF 2 150 100 50 4R KU IF 3 30 20 10 0 -10 4R KU IF 4 340 330 320 4R KU IF 6

Degrees

-6.2090 -6.2095 -6.2100 -6.2105 4R KU IF 7

23.9195 23.9190 23.9185 23.9180 4R KU IF 8 60 40 20 5R KT IF 1

0.001

0.000

-0.001 5R KT IF 2

Time (hours)

14 16 18 20 22 1/00 1/02

0.001

0.000

-0.001

Gain phs vs UTC time for 0237-027.MULTI.1 SN 1 Rpol IF 1 - 8

Plot file version 3 created 15-APR-2021 17:42:39

5R KT IF 3 2 0 -2 -4 5R KT IF 4 40 20 0 5R KT IF 5

0.001

0.000

-0.001 5R KT IF 6 0 -50 -100

5R KT IF 7

0.001

0.000

-0.001 5R KT IF 8

Degrees

20 10 0 6R KY IF 1

9.5385 9.5380 9.5375 9.5370

6R KY IF 2

23.7765 23.7760 23.7755 23.7750

6R KY IF 3 340 335 330 325 6R KY IF 4

Time (hours)

14 16 18 20 22 1/00 1/02

20 0 -20 -40 -60

Gain phs vs UTC time for 0237-027.MULTI.1 SN 1 Rpol IF 1 - 8

Plot file version 4 created 15-APR-2021 17:42:39

6R KY IF 5

35984.5 35984.0 35983.5 35983.0

6R KY IF 6

32311.5 32311.0 32310.5 32310.0 6R KY IF 7

50000 0 -50000 -100000 -150000 6R KY IF 8

20408.5 20408.0 20407.5 20407.0 9R DA IF 2

-14331.0 -14331.5 -14332.0 -14332.5

9R DA IF 6

MilliDegrees

180000 160000 140000 120000 100000 80000

10R KN IF 6

-10215.5 -10216.0 -10216.5 -10217.0 10R KN IF 7

250000 200000 150000

11R PI IF 2

8448.0 8447.5 8447.0 8446.5

11R PI IF 6

Time (hours)

14 16 18 20 22 1/00 1/02

-10801.5 -10802.0 -10802.5 -10803.0

Gain phs vs UTC time for 0237-027.MULTI.1 SN 1 Rpol IF 1 - 8

Plot file version 5 created 15-APR-2021 17:42:39

12R YS IF 1

91252.0 91251.5 91251.0 91250.5

12R YS IF 2

-50000

-100000

-150000

12R YS IF 3

40000 20000 0 -20000

12R YS IF 4

40000 20000 0 -20000 -40000

12R YS IF 5

80000 60000 40000 20000 0 -20000

12R YS IF 6

MilliDegrees

-55930.0 -55930.5 -55931.0 -55931.5

12R YS IF 7 0 -50000 -100000 -150000

12R YS IF 8 1 0 -1 13R EF IF 1 1 0 -1 13R EF IF 2

Time (hours)

14 16 18 20 22 1/00 1/02

1 0 -1

Gain phs vs UTC time for 0237-027.MULTI.1 SN 1 Rpol IF 1 - 8

Plot file version 6 created 15-APR-2021 17:42:39

13R EF IF 3 1 0 -1 13R EF IF 4 1 0 -1 13R EF IF 5 1 0 -1 13R EF IF 6 1 0 -1 13R EF IF 7 1 0 -1 14R SR IF 2

MilliDegrees

9236.5 9236.0 9235.5 9235.0

14R SR IF 3

-427.0 -427.5 -428.0 -428.5

14R SR IF 4

20000 0 -20000 -40000

14R SR IF 5

-12236.0 -12236.5 -12237.0 -12237.5

14R SR IF 6

Time (hours)

14 16 18 20 22 1/00 1/02

-28029.0 -28029.5 -28030.0 -28030.5

Gain phs vs UTC time for 0237-027.MULTI.1 SN 1 Rpol IF 1 - 8

Plot file version 7 created 15-APR-2021 17:42:39

14R SR IF 7 350 300 250 14R SR IF 8

1.6105 1.6100 1.6095 1.6090

15R T6 IF 1

0.001

0.000

-0.001

15R T6 IF 2

0.001

0.000

-0.001

15R T6 IF 3

0.001

0.000

-0.001

15R T6 IF 4

Degrees

0.001

0.000

-0.001

15R T6 IF 5

0.001

0.000

-0.001

15R T6 IF 6

0.001

0.000

-0.001

15R T6 IF 7

0.001

0.000

-0.001

15R T6 IF 8

Time (hours)

14 16 18 20 22 1/00 1/02

0.001

0.000

-0.001

Gain phs vs UTC time for 0237-027.MULTI.1 SN 1 Rpol IF 1 - 8

Plot file version 8 created 15-APR-2021 17:42:39

16R SV IF 2

-169314.0 -169314.5 -169315.0 -169315.5 16R SV IF 8

-37934.0 -37934.5 -37935.0 -37935.5

17R ZC IF 1

26204.0 26203.5 26203.0 26202.5

17R ZC IF 2

-102753.0 -102753.5 -102754.0 -102754.5

17R ZC IF 3

62647.5 62647.0 62646.5 62646.0

17R ZC IF 4

MilliDegrees

-60243.5 -60244.0 -60244.5 -60245.0

17R ZC IF 5

85410.5 85410.0 85409.5 85409.0

17R ZC IF 6

31027.0 31026.5 31026.0 31025.5

17R ZC IF 7

-1329.0 -1329.5 -1330.0 -1330.5

17R ZC IF 8

Time (hours)

14 16 18 20 22 1/00 1/02

33688.0 33687.5 33687.0 33686.5

Gain phs vs UTC time for 0237-027.MULTI.1 SN 1 Rpol IF 1 - 8

Plot file version 9 created 15-APR-2021 17:42:39

18R BD IF 1

-118296

-118297

-118298

18R BD IF 3

107560.0 107559.5 107559.0 107558.5

19R O6 IF 2

-37310

-37311

-37312

19R O6 IF 3

345000 340000 335000 330000 325000

19R O6 IF 4

-15469.5 -15470.0 -15470.5 -15471.0

19R O6 IF 5

MilliDegrees

50000 0 -50000

19R O6 IF 7

48095.5 48095.0 48094.5 48094.0

20R HH IF 4

-44495.5 -44496.0 -44496.5 -44497.0

20R HH IF 7

200000 150000 100000

21R MC IF 1

Time (hours)

14 16 18 20 22 1/00 1/02

59296.0 59295.5 59295.0 59294.5

Gain phs vs UTC time for 0237-027.MULTI.1 SN 1 Rpol IF 1 - 8

Plot file version 10 created 15-APR-2021 17:42:39

21R MC IF 2 40 20 0 -20 21R MC IF 3

17.9525 17.9520 17.9515 17.9510

21R MC IF 4 -8 -9 -10 21R MC IF 5

-165.3380 -165.3385 -165.3390 -165.3395

21R MC IF 6

171.9355 171.9350 171.9345 171.9340

22R HO IF 2

Degrees

100 80 60 22R HO IF 4

-46.8660 -46.8665 -46.8670 -46.8675

22R HO IF 5

36.2265 36.2260 36.2255 36.2250

22R HO IF 6

135.0220 135.0215 135.0210 135.0205

22R HO IF 8

Time (hours)

14 16 18 20 22 1/00 1/02

-12.7215 -12.7220 -12.7225 -12.7230