Gain phs vs UTC time for 0524+034.MULTI.1 SN 1 Rpol IF 1 - 8

Plot file version 1 created 15-APR-2021 17:39:53

1R UR IF 3 0 -20 -40 -60 -80 1R UR IF 4 350 340 330 1R UR IF 5 -10 -15 -20 1R UR IF 6 60 40 20 0 1R UR IF 7 20 10 0 1R UR IF 8

Degrees

1.1770 1.1765 1.1760 1.1755

2R TR IF 1

-5.1995 -5.2000 -5.2005 -5.2010

2R TR IF 2 -5 -10 -15 2R TR IF 3 0 -20 -40 2R TR IF 4

Time (hours)

16 18 20 22 1/00 1/02 1/04

355 350

Gain phs vs UTC time for 0524+034.MULTI.1 SN 1 Rpol IF 1 - 8

Plot file version 2 created 15-APR-2021 17:39:53

2R TR IF 5 -6 -8 -10 2R TR IF 6 -4 -6 -8 -10 -12 -14 2R TR IF 7 358 356 354 352 2R TR IF 8

-13.7490 -13.7495 -13.7500 -13.7505

3R MH IF 1 0 -50 -100

3R MH IF 2

Degrees

100 50 0 3R MH IF 3 0 -20 -40 -60 -80 3R MH IF 4 30 20 10 0 -10 3R MH IF 5 40 20 0 3R MH IF 6

Time (hours)

16 18 20 22 1/00 1/02 1/04

7 6 5 4

Gain phs vs UTC time for 0524+034.MULTI.1 SN 1 Rpol IF 1 - 8

Plot file version 3 created 15-APR-2021 17:39:53

3R MH IF 7 7 6 5 4 4R KU IF 1 40 20 0 4R KU IF 3 -20 -40 -60 4R KU IF 7

0.001

0.000

-0.001 4R KU IF 8 40 20 0 5R KT IF 1

Degrees

100 80 60 5R KT IF 2

4.5225 4.5220 4.5215 4.5210

5R KT IF 3 120 100 80 60 40 5R KT IF 4 100 50 0 -50 5R KT IF 6

Time (hours)

16 18 20 22 1/00 1/02 1/04

98.6345 98.6340 98.6335 98.6330

Gain phs vs UTC time for 0524+034.MULTI.1 SN 1 Rpol IF 1 - 8

Plot file version 4 created 15-APR-2021 17:39:53

6R KY IF 1 100 50 0 -50 6R KY IF 2

0.001

0.000

-0.001

6R KY IF 3 0 -50 -100 -150

6R KY IF 5

-175.8260 -175.8265 -175.8270 -175.8275

6R KY IF 6

16.1675 16.1670 16.1665 16.1660

9R DA IF 1

Degrees

3.6600 3.6595 3.6590 3.6585

9R DA IF 2 60 40 20 0 9R DA IF 7

134.5520 134.5515 134.5510 134.5505

10R KN IF 2

30.1240 30.1235 30.1230 30.1225

10R KN IF 6

Time (hours)

16 18 20 22 1/00 1/02 1/04

70.3480 70.3475 70.3470 70.3465

Gain phs vs UTC time for 0524+034.MULTI.1 SN 1 Rpol IF 1 - 8

Plot file version 5 created 15-APR-2021 17:39:53

11R PI IF 1

-5962.5 -5963.0 -5963.5 -5964.0

11R PI IF 2

2500 2000 1500 1000 500 11R PI IF 6

-31997.5 -31998.0 -31998.5 -31999.0

11R PI IF 7

-3488.5 -3489.0 -3489.5 -3490.0

12R YS IF 1

-94.5 -95.0 -95.5 -96.0

12R YS IF 2

MilliDegrees

359000 358000 357000 356000 355000

12R YS IF 3 500 0 -500 -1000

12R YS IF 4

1000 0 -1000 -2000

12R YS IF 5

360000

359500

359000

12R YS IF 6

Time (hours)

16 18 20 22 1/00 1/02 1/04

0 -2000 -4000 -6000

Gain phs vs UTC time for 0524+034.MULTI.1 SN 1 Rpol IF 1 - 8

Plot file version 6 created 15-APR-2021 17:39:53

12R YS IF 7 0 -1 -2 -3 12R YS IF 8 10 0 -10 13R EF IF 1

0.001

0.000

-0.001

13R EF IF 2

0.001

0.000

-0.001

13R EF IF 3

0.001

0.000

-0.001

13R EF IF 4

Degrees

0.001

0.000

-0.001

13R EF IF 5

0.001

0.000

-0.001

13R EF IF 6

0.001

0.000

-0.001

13R EF IF 7

0.001

0.000

-0.001

14R SR IF 1

Time (hours)

16 18 20 22 1/00 1/02 1/04

0 -50 -100 -150

Gain phs vs UTC time for 0524+034.MULTI.1 SN 1 Rpol IF 1 - 8

Plot file version 7 created 15-APR-2021 17:39:53

14R SR IF 2 0 -5 -10 -15 14R SR IF 3 0 -5 -10 -15 14R SR IF 4 0 -5 -10 -15 14R SR IF 5 2 0 -2 -4 -6 -8 14R SR IF 6 0 -5 -10 14R SR IF 7

Degrees

0 -5 -10 14R SR IF 8

-6.7175 -6.7180 -6.7185 -6.7190

15R T6 IF 1

0.001

0.000

-0.001

15R T6 IF 2

4.4320 4.4315 4.4310 4.4305

15R T6 IF 3

Time (hours)

16 18 20 22 1/00 1/02 1/04

6.0210 6.0205 6.0200 6.0195

Gain phs vs UTC time for 0524+034.MULTI.1 SN 1 Rpol IF 1 - 8

Plot file version 8 created 15-APR-2021 17:39:53

15R T6 IF 4

2416.0 2415.5 2415.0 2414.5

15R T6 IF 6

-24264.0 -24264.5 -24265.0 -24265.5

15R T6 IF 7 1 0 -1 16R SV IF 2

100000 50000 0 16R SV IF 3

-4560.5 -4561.0 -4561.5 -4562.0

16R SV IF 5

MilliDegrees

0 -20000 -40000 -60000

16R SV IF 6 0 -20000

-40000

16R SV IF 8

8596

8595

8594

17R ZC IF 2

5058.0 5057.5 5057.0 5056.5

17R ZC IF 3

Time (hours)

16 18 20 22 1/00 1/02 1/04

150000 100000 50000 0

Gain phs vs UTC time for 0524+034.MULTI.1 SN 1 Rpol IF 1 - 8

Plot file version 9 created 15-APR-2021 17:39:53

17R ZC IF 5

-13129.0 -13129.5 -13130.0 -13130.5

17R ZC IF 6

-9073.5 -9074.0 -9074.5 -9075.0

17R ZC IF 7

-2469.0 -2469.5 -2470.0 -2470.5

17R ZC IF 8

51124.5 51124.0 51123.5 51123.0

18R BD IF 3 0 -20000 -40000 -60000

19R O6 IF 1

MilliDegrees

20000 15000 10000 5000

19R O6 IF 2

60000 40000 20000 0 19R O6 IF 3 0 -20000 -40000 -60000 -80000

19R O6 IF 4

360000 355000 350000 345000

19R O6 IF 5

Time (hours)

16 18 20 22 1/00 1/02 1/04

0 -20000 -40000 -60000 -80000

Gain phs vs UTC time for 0524+034.MULTI.1 SN 1 Rpol IF 1 - 8

Plot file version 10 created 15-APR-2021 17:39:53

19R O6 IF 6 0 -20 -40 -60 19R O6 IF 7 0 -20 -40 -60 19R O6 IF 8

-22.418

-22.419

-22.420

20R HH IF 1 20 10 0 20R HH IF 2

354.8210 354.8205 354.8200 354.8195

20R HH IF 3

Degrees

150 100 50 0 20R HH IF 4

-4.0620 -4.0625 -4.0630 -4.0635

20R HH IF 5 8 7 6 5 20R HH IF 6

3.9450 3.9445 3.9440 3.9435

20R HH IF 7

Time (hours)

16 18 20 22 1/00 1/02 1/04

0 -20 -40 -60

Gain phs vs UTC time for 0524+034.MULTI.1 SN 1 Rpol IF 1 - 8

Plot file version 11 created 15-APR-2021 17:39:53

20R HH IF 8

-8121.0 -8121.5 -8122.0 -8122.5

21R MC IF 2

40000 20000 0 21R MC IF 3

30000 20000 10000 0 21R MC IF 4

345000

340000

335000

21R MC IF 6

2276.5 2276.0 2275.5 2275.0

22R HO IF 2

MilliDegrees

177362.5 177362.0 177361.5 177361.0

22R HO IF 4

-48181.5 -48182.0 -48182.5 -48183.0

22R HO IF 6

43100.5 43100.0 43099.5 43099.0

22R HO IF 7

Time (hours)

16 18 20 22 1/00 1/02 1/04

139888.5 139888.0 139887.5 139887.0