Gain phs vs UTC time for 0641+392.MULTI.1 SN 1 Rpol IF 1 - 8

Plot file version 1 created 15-APR-2021 17:43:07

1R UR IF 3 20 0 -20 -40 -60 -80 1R UR IF 4 20 0 -20 -40 -60 -80 1R UR IF 5

-68.1780 -68.1785 -68.1790 -68.1795 1R UR IF 6 0 -50 -100

1R UR IF 7 100 50 0 1R UR IF 8

Degrees

18.9765 18.9760 18.9755 18.9750

2R TR IF 1 10 0 -10 2R TR IF 2

-3.2360 -3.2365 -3.2370 -3.2375 2R TR IF 3 10 0 -10 2R TR IF 4

Time (hours)

08 10 12 14 16 18 20 22 1/00 1/02 1/04

150 100 50

Gain phs vs UTC time for 0641+392.MULTI.1 SN 1 Rpol IF 1 - 8

Plot file version 2 created 15-APR-2021 17:43:07

2R TR IF 5

-6676.5 -6677.0 -6677.5 -6678.0 2R TR IF 8

-155766.5 -155767.0 -155767.5 -155768.0

3R MH IF 1

8718.0 8717.5 8717.0 8716.5 3R MH IF 3

4765.0 4764.5 4764.0 4763.5 3R MH IF 4 0 -50000 -100000 3R MH IF 5

MilliDegrees

-20000

-40000

-60000

3R MH IF 6

-16096.5 -16097.0 -16097.5 -16098.0

3R MH IF 7

100000

50000 0 3R MH IF 8

300000 250000 200000

4R KU IF 1

Time (hours)

08 10 12 14 16 18 20 22 1/00 1/02 1/04

45000 40000 35000 30000 25000

Gain phs vs UTC time for 0641+392.MULTI.1 SN 1 Rpol IF 1 - 8

Plot file version 3 created 15-APR-2021 17:43:07

4R KU IF 2 20 0 -20 4R KU IF 3 0 -50 -100 4R KU IF 4 50 0 -50 4R KU IF 5 -20 -40 -60 4R KU IF 6 0 -50 -100 -150 4R KU IF 7

Degrees

150 100 50 4R KU IF 8 200 100 0 5R KT IF 1 50 0 -50 -100 5R KT IF 2 60 40 20 5R KT IF 3

Time (hours)

08 10 12 14 16 18 20 22 1/00 1/02 1/04

50 0 -50

Gain phs vs UTC time for 0641+392.MULTI.1 SN 1 Rpol IF 1 - 8

Plot file version 4 created 15-APR-2021 17:43:07

5R KT IF 4 20 0 -20 -40 -60 -80 5R KT IF 5 0 -50 -100

5R KT IF 6 100 0 -100

5R KT IF 7 100 80 60 40 20 5R KT IF 8 15 10 5 0 6R KY IF 1

Degrees

50 0 -50 -100

6R KY IF 2 50 0 -50 6R KY IF 3

0.001

0.000

-0.001

6R KY IF 4 0 -50 -100 -150

6R KY IF 5

Time (hours)

08 10 12 14 16 18 20 22 1/00 1/02 1/04

350 340 330

Gain phs vs UTC time for 0641+392.MULTI.1 SN 1 Rpol IF 1 - 8

Plot file version 5 created 15-APR-2021 17:43:08

6R KY IF 6 150 100 50 0 -50 6R KY IF 7 50 0 6R KY IF 8 4 2 0 -2 -4 9R DA IF 7

-5.3875 -5.3880 -5.3885 -5.3890

10R KN IF 1

82.5300 82.5295 82.5290 82.5285

10R KN IF 2

Degrees

-14.8115 -14.8120 -14.8125 -14.8130

10R KN IF 7

90.5320 90.5315 90.5310 90.5305

11R PI IF 2

43.3970 43.3965 43.3960 43.3955

11R PI IF 6 250 200 150 100 12R YS IF 1

Time (hours)

08 10 12 14 16 18 20 22 1/00 1/02 1/04

10 0 -10 -20 -30

Gain phs vs UTC time for 0641+392.MULTI.1 SN 1 Rpol IF 1 - 8

Plot file version 6 created 15-APR-2021 17:43:08

12R YS IF 2 40 20 0 -20 -40 12R YS IF 3

-13.7505 -13.7510 -13.7515 -13.7520

12R YS IF 4 350 340 330 12R YS IF 5 350 345 340 12R YS IF 6

-28.7380 -28.7385 -28.7390 -28.7395

12R YS IF 8

Degrees

19.2440 19.2435 19.2430 19.2425

13R EF IF 1

0.001

0.000

-0.001

13R EF IF 2

0.001

0.000

-0.001

13R EF IF 3

0.001

0.000

-0.001

13R EF IF 4

Time (hours)

08 10 12 14 16 18 20 22 1/00 1/02 1/04

0.001

0.000

-0.001

Gain phs vs UTC time for 0641+392.MULTI.1 SN 1 Rpol IF 1 - 8

Plot file version 7 created 15-APR-2021 17:43:08

13R EF IF 5 1 0 -1 13R EF IF 7 1 0 -1 14R SR IF 1 0 -50000

-100000

14R SR IF 2 0 -5000 -10000 -15000

14R SR IF 3

-25557.5 -25558.0 -25558.5 -25559.0

14R SR IF 4

MilliDegrees

350000 345000 340000

14R SR IF 5

44661.0 44660.5 44660.0 44659.5

14R SR IF 6

13980.0 13979.5 13979.0 13978.5

14R SR IF 7

-13957.0 -13957.5 -13958.0 -13958.5

15R T6 IF 1

Time (hours)

08 10 12 14 16 18 20 22 1/00 1/02 1/04

20000 0 -20000 -40000

Gain phs vs UTC time for 0641+392.MULTI.1 SN 1 Rpol IF 1 - 8

Plot file version 8 created 15-APR-2021 17:43:08

15R T6 IF 2

24.8 24.6 24.4 24.2 24.0 23.8

15R T6 IF 3 260 240 220 15R T6 IF 4 20 0 -20 -40 -60 -80 15R T6 IF 5

-32.4160 -32.4165 -32.4170 -32.4175

15R T6 IF 6

0.001

0.000

-0.001

15R T6 IF 7

Degrees

-1.6665 -1.6670 -1.6675 -1.6680

15R T6 IF 8

26.6310 26.6305 26.6300 26.6295

16R SV IF 3

85.1605 85.1600 85.1595 85.1590

16R SV IF 4 40 20 0 16R SV IF 5

Time (hours)

08 10 12 14 16 18 20 22 1/00 1/02 1/04

40 20 0 -20

Gain phs vs UTC time for 0641+392.MULTI.1 SN 1 Rpol IF 1 - 8

Plot file version 9 created 15-APR-2021 17:43:08

16R SV IF 6

97432.0 97431.5 97431.0 97430.5

16R SV IF 7

90658.5 90658.0 90657.5 90657.0

16R SV IF 8

176000 174000 172000 170000

17R ZC IF 4

11059.5 11059.0 11058.5 11058.0

17R ZC IF 5 0 -50000

-100000

17R ZC IF 7

MilliDegrees

19829.5 19829.0 19828.5 19828.0

18R BD IF 2

-50000 -100000 -150000

18R BD IF 4

50000 0 -50000 -100000

18R BD IF 5

35000 30000 25000 20000

19R O6 IF 1

Time (hours)

08 10 12 14 16 18 20 22 1/00 1/02 1/04

17667.0 17666.5 17666.0 17665.5

Gain phs vs UTC time for 0641+392.MULTI.1 SN 1 Rpol IF 1 - 8

Plot file version 10 created 15-APR-2021 17:43:08

19R O6 IF 2 20 10 0 -10 19R O6 IF 3 30 20 10 0 19R O6 IF 4 50 0 -50 19R O6 IF 5 -75 -80 -85 19R O6 IF 6 0 -5 -10 19R O6 IF 7

Degrees

0.001

0.000

-0.001

19R O6 IF 8

-154.2925 -154.2930 -154.2935 -154.2940 20R HH IF 1

-28.6910 -28.6915 -28.6920 -28.6925

20R HH IF 3

-114.2450 -114.2455 -114.2460 -114.2465 20R HH IF 5

Time (hours)

08 10 12 14 16 18 20 22 1/00 1/02 1/04

20.3150 20.3145 20.3140 20.3135

Gain phs vs UTC time for 0641+392.MULTI.1 SN 1 Rpol IF 1 - 8

Plot file version 11 created 15-APR-2021 17:43:08

21R MC IF 2 20 0 -20 -40 21R MC IF 3

-29.7835 -29.7840 -29.7845 -29.7850

21R MC IF 4

8.1345 8.1340 8.1335 8.1330

21R MC IF 7

Degrees

Time (hours)

08 10 12 14 16 18 20 22 1/00 1/02 1/04

50 0 -50 -100