Gain phs vs UTC time for 1418+546.MULTI.1 SN 1 Rpol IF 1 - 8

Plot file version 1 created 15-APR-2021 17:39:33

1R UR IF 1

-142444.0 -142444.5 -142445.0 -142445.5 1R UR IF 3

10000 0 -10000

1R UR IF 4 0 -20000 -40000

1R UR IF 6

20200 20000 19800 19600 1R UR IF 7

-60313.5 -60314.0 -60314.5 -60315.0

1R UR IF 8

MilliDegrees

83489.0 83488.5 83488.0 83487.5 2R TR IF 1

100000 50000 0 2R TR IF 2

5000 0 -5000 -10000 2R TR IF 3

3603.5 3603.0 3602.5 3602.0

2R TR IF 4

Time (hours)

06 08 10 12 14 16 18 20 22 1/00 1/02 1/04 1/06

0 -5000

-10000

Gain phs vs UTC time for 1418+546.MULTI.1 SN 1 Rpol IF 1 - 8

Plot file version 2 created 15-APR-2021 17:39:33

2R TR IF 5 0 -5 -10 2R TR IF 6

-9.7060 -9.7065 -9.7070 -9.7075

2R TR IF 7

-12.5335 -12.5340 -12.5345 -12.5350 2R TR IF 8

13.6755 13.6750 13.6745 13.6740

3R MH IF 1 0 -50 -100 -150 3R MH IF 2

Degrees

1.5 1.0 0.5 0.0 -0.5 3R MH IF 3 2 1 0 3R MH IF 4 8 6 4 2 3R MH IF 5 4.0 3.5 3.0 3R MH IF 6

Time (hours)

06 08 10 12 14 16 18 20 22 1/00 1/02 1/04 1/06

4 2 0 -2

Gain phs vs UTC time for 1418+546.MULTI.1 SN 1 Rpol IF 1 - 8

Plot file version 3 created 15-APR-2021 17:39:36

3R MH IF 7

-100 -200 -300 -400

3R MH IF 8

77543.5 77543.0 77542.5 77542.0 4R KU IF 1

350000 300000 250000 200000

4R KU IF 2 0 -20000 -40000 -60000 4R KU IF 3 0 -10000 -20000 -30000

4R KU IF 4

MilliDegrees

20000 0 -20000 4R KU IF 5

150000 100000 50000 0 4R KU IF 6

80000 60000 40000 20000 0 4R KU IF 7

10000 0 -10000 -20000

4R KU IF 8

Time (hours)

06 08 10 12 14 16 18 20 22 1/00 1/02 1/04 1/06

20000

10000 0

Gain phs vs UTC time for 1418+546.MULTI.1 SN 1 Rpol IF 1 - 8

Plot file version 4 created 15-APR-2021 17:39:36

5R KT IF 1 350 300 250 200 150 5R KT IF 2 360 340 320 5R KT IF 3 0 -20 -40 5R KT IF 4 20 0 -20 -40 5R KT IF 5 200 100 0 5R KT IF 6

Degrees

80 60 40 20 0 -20 5R KT IF 7 0 -20 -40 -60 -80 5R KT IF 8 100 50 0 6R KY IF 1 350 300 250 200 6R KY IF 2

Time (hours)

06 08 10 12 14 16 18 20 22 1/00 1/02 1/04 1/06

10 0 -10 -20

Gain phs vs UTC time for 1418+546.MULTI.1 SN 1 Rpol IF 1 - 8

Plot file version 5 created 15-APR-2021 17:39:36

6R KY IF 3 0 -10 -20 -30 6R KY IF 4 20 0 -20 -40 -60 6R KY IF 5

175.8690 175.8685 175.8680 175.8675

6R KY IF 6 91 90 89 88 87 6R KY IF 7 20 10 0 -10 6R KY IF 8

Degrees

-8.4115 -8.4120 -8.4125 -8.4130

9R DA IF 1 50 0 -50 9R DA IF 2 5 0 -5 -10 9R DA IF 6

-162.8465 -162.8470 -162.8475 -162.8480

9R DA IF 7

Time (hours)

06 08 10 12 14 16 18 20 22 1/00 1/02 1/04 1/06

111.0150 111.0145 111.0140 111.0135

Gain phs vs UTC time for 1418+546.MULTI.1 SN 1 Rpol IF 1 - 8

Plot file version 6 created 15-APR-2021 17:39:36

10R KN IF 1 60 40 20 10R KN IF 2 80 60 40 20 11R PI IF 1 20 0 -20 -40 11R PI IF 2 0 -10 -20 11R PI IF 7

-46.8265 -46.8270 -46.8275 -46.8280

12R YS IF 1

Degrees

100 50 0 12R YS IF 2 0 -1 -2 12R YS IF 3 0 -50 -100

12R YS IF 4 2 0 -2 12R YS IF 5

Time (hours)

06 08 10 12 14 16 18 20 22 1/00 1/02 1/04 1/06

2 0 -2

Gain phs vs UTC time for 1418+546.MULTI.1 SN 1 Rpol IF 1 - 8

Plot file version 7 created 15-APR-2021 17:39:36

12R YS IF 6 2 1 0 -1 12R YS IF 7 100 50 0 12R YS IF 8

-12.6190 -12.6195 -12.6200 -12.6205

13R EF IF 1

0.001

0.000

-0.001

13R EF IF 2

0.001

0.000

-0.001

13R EF IF 3

Degrees

0.001

0.000

-0.001

13R EF IF 4

0.001

0.000

-0.001

13R EF IF 5

0.001

0.000

-0.001

13R EF IF 6

0.001

0.000

-0.001

13R EF IF 7

Time (hours)

06 08 10 12 14 16 18 20 22 1/00 1/02 1/04 1/06

0.001

0.000

-0.001

Gain phs vs UTC time for 1418+546.MULTI.1 SN 1 Rpol IF 1 - 8

Plot file version 8 created 15-APR-2021 17:39:36

14R SR IF 1 100 50 0 14R SR IF 2 10 0 -10 14R SR IF 3 150 100 50 0 14R SR IF 4 10 5 0 14R SR IF 5 15 10 5 0 14R SR IF 6

Degrees

10 5 0 -5 14R SR IF 7 80 60 40 20 0 15R T6 IF 1 100 50 0 -50 15R T6 IF 2 10 0 -10 -20 15R T6 IF 3

Time (hours)

06 08 10 12 14 16 18 20 22 1/00 1/02 1/04 1/06

0 -10 -20 -30

Gain phs vs UTC time for 1418+546.MULTI.1 SN 1 Rpol IF 1 - 8

Plot file version 9 created 15-APR-2021 17:39:36

15R T6 IF 4 20 0 -20 15R T6 IF 5 300 250 200 15R T6 IF 6

95.4285 95.4280 95.4275 95.4270

15R T6 IF 7

-20.9915 -20.9920 -20.9925 -20.9930

16R SV IF 2 12 10 8 6 4 16R SV IF 3

Degrees

5.4495 5.4490 5.4485 5.4480

16R SV IF 4 15 10 5 0 16R SV IF 5 15 10 5 0 16R SV IF 6

2.0510 2.0505 2.0500 2.0495

16R SV IF 7

Time (hours)

06 08 10 12 14 16 18 20 22 1/00 1/02 1/04 1/06

0 -20 -40

Gain phs vs UTC time for 1418+546.MULTI.1 SN 1 Rpol IF 1 - 8

Plot file version 10 created 15-APR-2021 17:39:36

17R ZC IF 1

178190.0 178189.5 178189.0 178188.5

17R ZC IF 2

40000 20000 0 -20000 -40000

17R ZC IF 3

60000

40000

20000

17R ZC IF 4

20000 15000 10000 5000

17R ZC IF 5

5000 0 -5000

17R ZC IF 6

MilliDegrees

10000 0 -10000 -20000 -30000

17R ZC IF 7

20000 18000 16000 14000 12000

18R BD IF 2

150000 100000 50000 0 18R BD IF 3

-20000

-22000

-24000

18R BD IF 4

Time (hours)

06 08 10 12 14 16 18 20 22 1/00 1/02 1/04 1/06

60000

40000

20000 0

Gain phs vs UTC time for 1418+546.MULTI.1 SN 1 Rpol IF 1 - 8

Plot file version 11 created 15-APR-2021 17:39:36

18R BD IF 5 150 100 50 0 18R BD IF 6

147.8885 147.8880 147.8875 147.8870

18R BD IF 7

-37.5685 -37.5690 -37.5695 -37.5700

18R BD IF 8 150 100 50 0 19R O6 IF 1 100 50 0 19R O6 IF 2

Degrees

360 350 340 19R O6 IF 3 360 355 350 19R O6 IF 4 -5 -10 -15 19R O6 IF 5

-8.9195 -8.9200 -8.9205 -8.9210

19R O6 IF 6

Time (hours)

06 08 10 12 14 16 18 20 22 1/00 1/02 1/04 1/06

-4 -6 -8 -10 -12

Gain phs vs UTC time for 1418+546.MULTI.1 SN 1 Rpol IF 1 - 8

Plot file version 12 created 15-APR-2021 17:39:36

19R O6 IF 7 150 100 50 0 21R MC IF 2 5 0 21R MC IF 3 0 -50 -100 -150

21R MC IF 4 6 4 2 0 -2 21R MC IF 7

Degrees

Time (hours)

06 08 10 12 14 16 18 20 22 1/00 1/02 1/04 1/06

37.0840 37.0835 37.0830 37.0825