Gain phs vs UTC time for 1846+322.MULTI.1 SN 1 Rpol IF 1 - 8

Plot file version 1 created 15-APR-2021 17:42:25

1R UR IF 1

113387.0 113386.5 113386.0 113385.5

1R UR IF 2

10000 0 -10000

1R UR IF 3 0 -20000

-40000 1R UR IF 4

60000 40000 20000 0 -20000 -40000 1R UR IF 5 0 -20000 -40000

1R UR IF 6

MilliDegrees

0 -50000 -100000 -150000 1R UR IF 7

300000 250000 200000 150000

1R UR IF 8

200000

100000 0 2R TR IF 1

-8436.0 -8436.5 -8437.0 -8437.5 2R TR IF 2

Time (hours)

06 08 10 12 14 16 18 20 22 1/00 1/02 1/04 1/06

-4067.5 -4068.0 -4068.5 -4069.0

Gain phs vs UTC time for 1846+322.MULTI.1 SN 1 Rpol IF 1 - 8

Plot file version 2 created 15-APR-2021 17:42:25

2R TR IF 3

-3244.5 -3245.0 -3245.5 -3246.0

2R TR IF 4

-2796.5 -2797.0 -2797.5 -2798.0 2R TR IF 5

-1920.0 -1920.5 -1921.0 -1921.5

2R TR IF 6

-1919.0 -1919.5 -1920.0 -1920.5

2R TR IF 8

2303.0 2302.5 2302.0 2301.5 3R MH IF 1

MilliDegrees

50000 0 -50000 3R MH IF 2

80000 60000 40000 20000 0 3R MH IF 3

60000 40000 20000 0 -20000 3R MH IF 4

150000 100000 50000 0 -50000 3R MH IF 5

Time (hours)

06 08 10 12 14 16 18 20 22 1/00 1/02 1/04 1/06

20000 0 -20000

Gain phs vs UTC time for 1846+322.MULTI.1 SN 1 Rpol IF 1 - 8

Plot file version 3 created 15-APR-2021 17:42:25

3R MH IF 6 300 200 100 3R MH IF 7 0 -50 -100

3R MH IF 8 150 100 50 0 4R KU IF 1 285 280 275 270 4R KU IF 2 -7 -8 -9 -10 -11 4R KU IF 3

Degrees

2 1 0 -1 4R KU IF 4 4 3 2 4R KU IF 5

5.8400 5.8395 5.8390 5.8385

4R KU IF 6 10 9 8 4R KU IF 7

Time (hours)

06 08 10 12 14 16 18 20 22 1/00 1/02 1/04 1/06

-89.168

-89.169

-89.170

Gain phs vs UTC time for 1846+322.MULTI.1 SN 1 Rpol IF 1 - 8

Plot file version 4 created 15-APR-2021 17:42:25

4R KU IF 8

12.0

11.5

11.0

5R KT IF 1 285 280 275 270 265 5R KT IF 2 340 320 300 280 260 5R KT IF 3 360 340 320 300 280 5R KT IF 4 20 0 -20 -40 -60 -80 5R KT IF 5

Degrees

360 340 320 300 280 5R KT IF 6 20 0 -20 -40 -60 -80 5R KT IF 7

-100

-120

-140

-160

5R KT IF 8 20 0 -20 -40 -60 -80 6R KY IF 1

Time (hours)

06 08 10 12 14 16 18 20 22 1/00 1/02 1/04 1/06

274 272 270

Gain phs vs UTC time for 1846+322.MULTI.1 SN 1 Rpol IF 1 - 8

Plot file version 5 created 15-APR-2021 17:42:25

6R KY IF 2 -10 -20 -30 -40 6R KY IF 3 0 -2 -4 6R KY IF 4 10 5 0 6R KY IF 5 8 6 4 2 6R KY IF 6 20 15 10 5 6R KY IF 7

Degrees

260 240 220 6R KY IF 8 10 0 -10 9R DA IF 1

-104.1615 -104.1620 -104.1625 -104.1630 9R DA IF 2 40 20 0 10R KN IF 2

Time (hours)

06 08 10 12 14 16 18 20 22 1/00 1/02 1/04 1/06

-8.7365 -8.7370 -8.7375 -8.7380

Gain phs vs UTC time for 1846+322.MULTI.1 SN 1 Rpol IF 1 - 8

Plot file version 6 created 15-APR-2021 17:42:25

11R PI IF 1 -75 -76 -77 11R PI IF 2 40 20 0 12R YS IF 1 0 -2 -4 12R YS IF 2 0 -2 -4 12R YS IF 3 0 -2 -4 12R YS IF 4

Degrees

0 -2 -4 12R YS IF 5 2 0 -2 -4 12R YS IF 6 1 0 -1 -2 -3 12R YS IF 7 0 -50 -100 -150

12R YS IF 8

Time (hours)

06 08 10 12 14 16 18 20 22 1/00 1/02 1/04 1/06

-47.7025 -47.7030 -47.7035 -47.7040

Gain phs vs UTC time for 1846+322.MULTI.1 SN 1 Rpol IF 1 - 8

Plot file version 7 created 15-APR-2021 17:42:25

13R EF IF 1 1 0 -1 13R EF IF 2 1 0 -1 13R EF IF 3 1 0 -1 13R EF IF 4 1 0 -1 13R EF IF 5 1 0 -1 13R EF IF 6

MilliDegrees

1 0 -1 13R EF IF 7 1 0 -1 14R SR IF 1 0 -2000

-4000

14R SR IF 2

5000 0 -5000

14R SR IF 3

Time (hours)

06 08 10 12 14 16 18 20 22 1/00 1/02 1/04 1/06

4000 2000 0 -2000 -4000 -6000

Gain phs vs UTC time for 1846+322.MULTI.1 SN 1 Rpol IF 1 - 8

Plot file version 8 created 15-APR-2021 17:42:26

14R SR IF 4 5 0 -5 14R SR IF 5 5 0 -5 14R SR IF 6 5 0 14R SR IF 7 0 -20 -40 -60 14R SR IF 8 -50 -52 -54 15R T6 IF 1

Degrees

40 20 0 15R T6 IF 2 0 -20 -40 -60 -80 15R T6 IF 3 100 50 0 15R T6 IF 4 80 60 40 20 0 15R T6 IF 6

Time (hours)

06 08 10 12 14 16 18 20 22 1/00 1/02 1/04 1/06

150 100 50 0

Gain phs vs UTC time for 1846+322.MULTI.1 SN 1 Rpol IF 1 - 8

Plot file version 9 created 15-APR-2021 17:42:26

16R SV IF 1

124466.5 124466.0 124465.5 124465.0

16R SV IF 2

20000 0 -20000 -40000

16R SV IF 3

10000 0 -10000

16R SV IF 4 0 -10000 -20000

16R SV IF 5

-11617.5 -11618.0 -11618.5 -11619.0

16R SV IF 6

MilliDegrees

8000

6000

4000

16R SV IF 7 1 0 -1 16R SV IF 8

18173.5 18173.0 18172.5 18172.0

17R ZC IF 2

5000 0 -5000 -10000

17R ZC IF 5

Time (hours)

06 08 10 12 14 16 18 20 22 1/00 1/02 1/04 1/06

10000 0 -10000 -20000

Gain phs vs UTC time for 1846+322.MULTI.1 SN 1 Rpol IF 1 - 8

Plot file version 10 created 15-APR-2021 17:42:26

17R ZC IF 6

-1456.5 -1457.0 -1457.5 -1458.0

18R BD IF 1

80000 60000 40000

18R BD IF 2

100000 0 -100000

18R BD IF 3

100000 0 -100000

18R BD IF 4

150000 100000 50000 0 -50000

18R BD IF 5

MilliDegrees

100000 0 -100000

18R BD IF 6

100000 50000 0 18R BD IF 7

50000 0 -50000 -100000 -150000

18R BD IF 8

300000 250000 200000 150000

19R O6 IF 1

Time (hours)

06 08 10 12 14 16 18 20 22 1/00 1/02 1/04 1/06

-75000 -80000 -85000 -90000

Gain phs vs UTC time for 1846+322.MULTI.1 SN 1 Rpol IF 1 - 8

Plot file version 11 created 15-APR-2021 17:42:26

19R O6 IF 2 10 0 -10 -20 -30 19R O6 IF 3

-24.8090 -24.8095 -24.8100 -24.8105

19R O6 IF 4

-23.6070 -23.6075 -23.6080 -23.6085

19R O6 IF 5 40 20 0 -20 19R O6 IF 6 60 40 20 0 -20 19R O6 IF 7

Degrees

-41.0980 -41.0985 -41.0990 -41.0995

19R O6 IF 8

-23.0535 -23.0540 -23.0545 -23.0550

20R HH IF 1

18.3630 18.3625 18.3620 18.3615

20R HH IF 2 -4 -6 -8 -10 20R HH IF 3

Time (hours)

06 08 10 12 14 16 18 20 22 1/00 1/02 1/04 1/06

60 40 20 0

Gain phs vs UTC time for 1846+322.MULTI.1 SN 1 Rpol IF 1 - 8

Plot file version 12 created 15-APR-2021 17:42:26

20R HH IF 4 356 354 352 350 348 20R HH IF 5 40 20 0 20R HH IF 6 100 50 0 20R HH IF 7

-1.7920 -1.7925 -1.7930 -1.7935

20R HH IF 8 360 350 340 330 21R MC IF 2

Degrees

20 10 0 -10 21R MC IF 3 30 20 10 0 21R MC IF 4

Time (hours)

06 08 10 12 14 16 18 20 22 1/00 1/02 1/04 1/06

30 20 10 0