Gain phs vs UTC time for 2143-156.MULTI.1 SN 1 Rpol IF 1 - 8

Plot file version 1 created 15-APR-2021 17:42:42

1R UR IF 1

123555.0 123554.5 123554.0 123553.5 1R UR IF 2

-120382.0 -120382.5 -120383.0 -120383.5

1R UR IF 3

25000 20000 15000 10000

1R UR IF 4 0 -50000 -100000 -150000 1R UR IF 6

35000 34000 33000

1R UR IF 7

MilliDegrees

897.0 896.5 896.0 895.5 2R TR IF 1

32000 30000 28000

2R TR IF 2

4000

2000 0 2R TR IF 3

5000 0 -5000 -10000 2R TR IF 4

Time (hours)

10 12 14 16 18 20 22

0 -20000 -40000

Gain phs vs UTC time for 2143-156.MULTI.1 SN 1 Rpol IF 1 - 8

Plot file version 2 created 15-APR-2021 17:42:42

2R TR IF 5 12 10 8 6 2R TR IF 6 32 30 28 2R TR IF 7 6 4 2 0 -2 -4 2R TR IF 8 20 0 -20 -40 -60 3R MH IF 1

-1.3175 -1.3180 -1.3185 -1.3190

3R MH IF 2

Degrees

8.3560 8.3555 8.3550 8.3545 3R MH IF 3 5 0 -5 -10 -15 3R MH IF 4 14 12 10 3R MH IF 5

7.9370 7.9365 7.9360 7.9355

3R MH IF 6

Time (hours)

10 12 14 16 18 20 22

-12.0590 -12.0595 -12.0600 -12.0605

Gain phs vs UTC time for 2143-156.MULTI.1 SN 1 Rpol IF 1 - 8

Plot file version 3 created 15-APR-2021 17:42:42

3R MH IF 7

14309.5 14309.0 14308.5 14308.0

4R KU IF 1

10000 0 -10000 -20000 -30000 4R KU IF 2

30000 20000 10000 0 4R KU IF 3

120000 100000 80000 60000 40000

4R KU IF 4

100000 80000 60000 40000 20000 4R KU IF 5

MilliDegrees

40000 20000 0 -20000 -40000

4R KU IF 6

100000

50000 0 4R KU IF 7

120000 100000 80000 60000 40000 20000 4R KU IF 8

-40274.5 -40275.0 -40275.5 -40276.0

5R KT IF 1

Time (hours)

10 12 14 16 18 20 22

20000 0 -20000 -40000 -60000

Gain phs vs UTC time for 2143-156.MULTI.1 SN 1 Rpol IF 1 - 8

Plot file version 4 created 15-APR-2021 17:42:42

5R KT IF 2 353 352 351 350 349 5R KT IF 3 120 100 80 60 40 5R KT IF 4 80 60 40 5R KT IF 5

27.9085 27.9080 27.9075 27.9070 5R KT IF 6

-13.8630 -13.8635 -13.8640 -13.8645 5R KT IF 7

Degrees

100 80 60 40 5R KT IF 8 100 50 0 6R KY IF 1 0 -20 -40 6R KY IF 2 0 -5 -10 -15 6R KY IF 3

Time (hours)

10 12 14 16 18 20 22

3 2 1 0

Gain phs vs UTC time for 2143-156.MULTI.1 SN 1 Rpol IF 1 - 8

Plot file version 5 created 15-APR-2021 17:42:42

6R KY IF 4 15 10 5 0 6R KY IF 5 30 20 10 0 6R KY IF 6 80 60 40 20 0 6R KY IF 7

15.1895 15.1890 15.1885 15.1880

6R KY IF 8 0 -20 -40 9R DA IF 1

Degrees

30 20 10 0 -10 9R DA IF 2 20 10 0 9R DA IF 7

-68.2270 -68.2275 -68.2280 -68.2285

11R PI IF 1 14 12 10 11R PI IF 2

Time (hours)

10 12 14 16 18 20 22

10 8 6 4 2

Gain phs vs UTC time for 2143-156.MULTI.1 SN 1 Rpol IF 1 - 8

Plot file version 6 created 15-APR-2021 17:42:42

12R YS IF 1 5 0 -5 12R YS IF 2 5 0 -5 12R YS IF 3 5 0 -5 12R YS IF 4 5 0 -5 12R YS IF 5 5 0 -5 12R YS IF 6

Degrees

355 350 345 340 12R YS IF 7 5 0 -5 -10 12R YS IF 8

0.001

0.000

-0.001

13R EF IF 1

0.001

0.000

-0.001

13R EF IF 2

Time (hours)

10 12 14 16 18 20 22

0.001

0.000

-0.001

Gain phs vs UTC time for 2143-156.MULTI.1 SN 1 Rpol IF 1 - 8

Plot file version 7 created 15-APR-2021 17:42:42

13R EF IF 3 1 0 -1 13R EF IF 4 1 0 -1 13R EF IF 5 1 0 -1 13R EF IF 6 1 0 -1 13R EF IF 7 1 0 -1 14R SR IF 1

MilliDegrees

4000 2000 0 -2000

14R SR IF 2

357200 357000 356800 356600 356400 356200

14R SR IF 3

5000 4000 3000 2000 1000

14R SR IF 4

5000 0 -5000

14R SR IF 5

Time (hours)

10 12 14 16 18 20 22

-1500

-2000

-2500

Gain phs vs UTC time for 2143-156.MULTI.1 SN 1 Rpol IF 1 - 8

Plot file version 8 created 15-APR-2021 17:42:42

14R SR IF 6 80 60 40 20 0 14R SR IF 7 30 20 10 0 14R SR IF 8 60 40 20 0 15R T6 IF 1

0.001

0.000

-0.001

15R T6 IF 2

0.001

0.000

-0.001

15R T6 IF 3

Degrees

0.001

0.000

-0.001

15R T6 IF 4

0.001

0.000

-0.001

15R T6 IF 7

0.001

0.000

-0.001

16R SV IF 2

8.1825 8.1820 8.1815 8.1810

16R SV IF 3

Time (hours)

10 12 14 16 18 20 22

10.812

10.811

10.810

Gain phs vs UTC time for 2143-156.MULTI.1 SN 1 Rpol IF 1 - 8

Plot file version 9 created 15-APR-2021 17:42:42

16R SV IF 4

5597.5 5597.0 5596.5 5596.0

16R SV IF 5

-13052.0 -13052.5 -13053.0 -13053.5

16R SV IF 6

7142.0 7141.5 7141.0 7140.5

16R SV IF 7

1548.0 1547.5 1547.0 1546.5

17R ZC IF 3

28015.5 28015.0 28014.5 28014.0

17R ZC IF 4

MilliDegrees

40847.5 40847.0 40846.5 40846.0

17R ZC IF 6

-21008.0 -21008.5 -21009.0 -21009.5

17R ZC IF 7

80000 60000 40000 20000 0 -20000

18R BD IF 4

-20000 -40000 -60000 -80000 -100000 -120000

18R BD IF 6

Time (hours)

10 12 14 16 18 20 22

-66996.5 -66997.0 -66997.5 -66998.0

Gain phs vs UTC time for 2143-156.MULTI.1 SN 1 Rpol IF 1 - 8

Plot file version 10 created 15-APR-2021 17:42:42

18R BD IF 7 20 0 -20 19R O6 IF 1

-3.5580 -3.5585 -3.5590 -3.5595

19R O6 IF 2

2.3390 2.3385 2.3380 2.3375

19R O6 IF 3 7 6 5 4 19R O6 IF 4

12.4840 12.4835 12.4830 12.4825

19R O6 IF 5

Degrees

0 -10 -20 19R O6 IF 7 12 10 8 19R O6 IF 8

41.4010 41.4005 41.4000 41.3995

20R HH IF 1 30 20 10 0 20R HH IF 2

Time (hours)

10 12 14 16 18 20 22

5 4 3 2

Gain phs vs UTC time for 2143-156.MULTI.1 SN 1 Rpol IF 1 - 8

Plot file version 11 created 15-APR-2021 17:42:42

20R HH IF 3 0 -10 -20 20R HH IF 4 0 -20 -40 -60 -80 20R HH IF 5

-3.1315 -3.1320 -3.1325 -3.1330

20R HH IF 6 0 -20 -40 20R HH IF 7 10 5 0 -5 20R HH IF 8

Degrees

-71.9935 -71.9940 -71.9945 -71.9950

21R MC IF 2 18 17 16 15 21R MC IF 3 25 20 15 21R MC IF 4 20 18 16 14 22R HO IF 2

Time (hours)

10 12 14 16 18 20 22

-41.4105 -41.4110 -41.4115 -41.4120

Gain phs vs UTC time for 2143-156.MULTI.1 SN 1 Rpol IF 1 - 8

Plot file version 12 created 15-APR-2021 17:42:42

22R HO IF 6

MilliDegrees

Time (hours)

10 12 14 16 18 20 22

-40294.0 -40294.5 -40295.0 -40295.5