Gain phs vs UTC time for 2214+350.MULTI.1 SN 1 Rpol IF 1 - 8

Plot file version 1 created 15-APR-2021 17:42:49

1R UR IF 3 20 10 0 -10 1R UR IF 4 20 10 0 -10 1R UR IF 5 0 -50 -100 -150

1R UR IF 6 5 0 -5 -10 1R UR IF 7 0 -5 -10 1R UR IF 8

Degrees

2.5880 2.5875 2.5870 2.5865 2R TR IF 1 40 20 0 2R TR IF 2 -8 -9 -10 -11 2R TR IF 3

-2.0 -2.5 -3.0 -3.5

2R TR IF 4

Time (hours)

10 12 14 16 18 20 22 1/00 1/02 1/04

0 -20 -40

Gain phs vs UTC time for 2214+350.MULTI.1 SN 1 Rpol IF 1 - 8

Plot file version 2 created 15-APR-2021 17:42:49

2R TR IF 5 100 50 0 2R TR IF 6 350 300 250 200 2R TR IF 7

0.7740 0.7735 0.7730 0.7725 2R TR IF 8 100 50 0 -50 3R MH IF 1 10 0 -10 -20 3R MH IF 2

Degrees

100 0 -100 3R MH IF 3 0 -20 -40 3R MH IF 4 -10 -20 -30 3R MH IF 5 10 5 0 3R MH IF 6

Time (hours)

10 12 14 16 18 20 22 1/00 1/02 1/04

60 40 20 0 -20

Gain phs vs UTC time for 2214+350.MULTI.1 SN 1 Rpol IF 1 - 8

Plot file version 3 created 15-APR-2021 17:42:49

3R MH IF 7 2 0 -2 3R MH IF 8

-153.5265 -153.5270 -153.5275 -153.5280 4R KU IF 1 80 60 40 20 0 4R KU IF 2 200 100 0 4R KU IF 3 100 50 0 4R KU IF 4

Degrees

100 50 0 4R KU IF 5 200 100 0 4R KU IF 6 150 100 50 0 4R KU IF 7 0 -10 -20 4R KU IF 8

Time (hours)

10 12 14 16 18 20 22 1/00 1/02 1/04

0 -10 -20

Gain phs vs UTC time for 2214+350.MULTI.1 SN 1 Rpol IF 1 - 8

Plot file version 4 created 15-APR-2021 17:42:49

5R KT IF 1 20 0 -20 5R KT IF 2 100 50 0 5R KT IF 3 20 0 -20 -40 5R KT IF 4 10 0 -10 -20 -30 5R KT IF 5 150 100 50 0 5R KT IF 6

Degrees

360 350 340 5R KT IF 7 60 40 20 0 -20 5R KT IF 8 40 20 0 6R KY IF 1

-1.0595 -1.0600 -1.0605 -1.0610

6R KY IF 2

Time (hours)

10 12 14 16 18 20 22 1/00 1/02 1/04

0 -5 -10 -15

Gain phs vs UTC time for 2214+350.MULTI.1 SN 1 Rpol IF 1 - 8

Plot file version 5 created 15-APR-2021 17:42:49

6R KY IF 3 10 0 -10 6R KY IF 4 10 0 -10 6R KY IF 5

354.8980 354.8975 354.8970 354.8965

6R KY IF 6 20 10 0 -10 6R KY IF 7

0.001

0.000

-0.001

6R KY IF 8

Degrees

0 -20 -40 9R DA IF 1

10.4455 10.4450 10.4445 10.4440

9R DA IF 2 360 340 320 300 9R DA IF 6

14.6335 14.6330 14.6325 14.6320

10R KN IF 1

Time (hours)

10 12 14 16 18 20 22 1/00 1/02 1/04

-80.4975 -80.4980 -80.4985 -80.4990

Gain phs vs UTC time for 2214+350.MULTI.1 SN 1 Rpol IF 1 - 8

Plot file version 6 created 15-APR-2021 17:42:49

10R KN IF 6

26494.0 26493.5 26493.0 26492.5

10R KN IF 7

73516.0 73515.5 73515.0 73514.5

11R PI IF 1

15000 10000 5000 0 11R PI IF 2

-4000 -6000 -8000

11R PI IF 6

50000 0 12R YS IF 1

MilliDegrees

100000

50000 0 12R YS IF 2

30000 20000 10000 0 -10000

12R YS IF 3

10000 5000 0 -5000

12R YS IF 4

20000 10000 0 -10000

12R YS IF 5

Time (hours)

10 12 14 16 18 20 22 1/00 1/02 1/04

200000

100000 0

Gain phs vs UTC time for 2214+350.MULTI.1 SN 1 Rpol IF 1 - 8

Plot file version 7 created 15-APR-2021 17:42:49

12R YS IF 6 5 0 -5 12R YS IF 7 1 0 -1 -2 12R YS IF 8 0 -10 -20 -30 13R EF IF 1

0.001

0.000

-0.001

13R EF IF 2

0.001

0.000

-0.001

13R EF IF 3

Degrees

0.001

0.000

-0.001

13R EF IF 4

0.001

0.000

-0.001

13R EF IF 5

0.001

0.000

-0.001

13R EF IF 6

0.001

0.000

-0.001

13R EF IF 7

Time (hours)

10 12 14 16 18 20 22 1/00 1/02 1/04

0.001

0.000

-0.001

Gain phs vs UTC time for 2214+350.MULTI.1 SN 1 Rpol IF 1 - 8

Plot file version 8 created 15-APR-2021 17:42:49

13R EF IF 8 1 0 -1 14R SR IF 1

40000 20000 0 14R SR IF 2

10000 0 -10000 -20000

14R SR IF 3

30000 20000 10000 0 -10000

14R SR IF 4

10000 0 -10000

14R SR IF 5

MilliDegrees

0 -20000 -40000

14R SR IF 6

20000

10000 0 14R SR IF 7 0 -50000 -100000 -150000

14R SR IF 8

12059.0 12058.5 12058.0 12057.5

15R T6 IF 1

Time (hours)

10 12 14 16 18 20 22 1/00 1/02 1/04

-3655.5 -3656.0 -3656.5 -3657.0

Gain phs vs UTC time for 2214+350.MULTI.1 SN 1 Rpol IF 1 - 8

Plot file version 9 created 15-APR-2021 17:42:49

15R T6 IF 2 -10 -12 -14 15R T6 IF 3 5 0 -5 -10 -15 15R T6 IF 4 0 -5 -10 -15 15R T6 IF 5

0.001

0.000

-0.001

16R SV IF 2 -5 -10 -15 16R SV IF 3

Degrees

100 0 -100

16R SV IF 4 20 0 -20 16R SV IF 6

-9.0340 -9.0345 -9.0350 -9.0355

16R SV IF 7 -20 -40 -60 -80 -100 -120

17R ZC IF 3

Time (hours)

10 12 14 16 18 20 22 1/00 1/02 1/04

-110.8270 -110.8275 -110.8280 -110.8285

Gain phs vs UTC time for 2214+350.MULTI.1 SN 1 Rpol IF 1 - 8

Plot file version 10 created 15-APR-2021 17:42:49

17R ZC IF 4 1 0 -1 18R BD IF 1

163769

163768

163767

18R BD IF 2

-6577.0 -6577.5 -6578.0 -6578.5

18R BD IF 3 0 -5000 -10000 -15000

18R BD IF 4

20000

10000 0 19R O6 IF 1

MilliDegrees

10000 0 -10000

19R O6 IF 2 0 -10000 -20000

19R O6 IF 3 0 -10000

-20000

19R O6 IF 4

5000 0 -5000 -10000

19R O6 IF 5

Time (hours)

10 12 14 16 18 20 22 1/00 1/02 1/04

100000 50000 0

Gain phs vs UTC time for 2214+350.MULTI.1 SN 1 Rpol IF 1 - 8

Plot file version 11 created 15-APR-2021 17:42:49

19R O6 IF 6 0 -10 -20 -30 19R O6 IF 7 0 -10 -20 19R O6 IF 8 6 4 2 0 21R MC IF 2 10 0 -10 -20 21R MC IF 3 10 0 -10 -20 21R MC IF 4

Degrees

4 2 0 -2 21R MC IF 8

Time (hours)

10 12 14 16 18 20 22 1/00 1/02 1/04

-22.0055 -22.0060 -22.0065 -22.0070