Tsys vs UTC time for ed018c.MSORT.1 TY 1 Rpol & Lpol IF 1 - 2

Plot file version 1 created 12-FEB-2004 11:25:31

1 EF IF 1R

0.10 0.08 0.06 0.04

1 EF IF 1L

0.10 0.08 0.06 0.04

1 EF IF 2R

0.10 0.08 0.06 0.04

1 EF IF 2L

0.10 0.08 0.06 0.04

2 JB IF 1R 3.8 3.6 3.4 3.2 3.0 2.8 2 JB IF 1L

Kilo Kelvin

3.5 3.0 2.5 2 JB IF 2R 4.5 4.0 3.5 3.0 2.5 2 JB IF 2L 3.5 3.0 2.5 2.0 3 CM IF 1R 0.001

3 CM IF 1L

TIME (HOURS)

05 00 30 06 00 30 07 00

0.001

Tsys vs UTC time for ed018c.MSORT.1 TY 1 Rpol & Lpol IF 1 - 2

Plot file version 2 created 12-FEB-2004 11:25:31

3 CM IF 2R 0.001

3 CM IF 2L 0.001

4 MC IF 1R

0.14 0.13 0.12

4 MC IF 1L

0.14 0.13 0.12

4 MC IF 2R

0.14 0.13 0.12

4 MC IF 2L

Kilo Kelvin

0.14

0.13

0.12

5 ON IF 1R

0.11

0.10

0.09

5 ON IF 1L

0.135 0.130 0.125 0.120

5 ON IF 2R

0.110 0.105 0.100 0.095 5 ON IF 2L

TIME (HOURS)

05 00 30 06 00 30 07 00

0.135 0.130 0.125 0.120

Tsys vs UTC time for ed018c.MSORT.1 TY 1 Rpol & Lpol IF 1 - 2

Plot file version 3 created 12-FEB-2004 11:25:31

6 TR IF 1R

0.30 0.25 0.20 0.15

6 TR IF 1L

0.45 0.40 0.35 0.30 0.25

6 TR IF 2R

0.30

0.25

0.20

0.15

6 TR IF 2L

0.45 0.40 0.35 0.30 0.25

7 AR IF 1R 0.001

7 AR IF 1L

Kilo Kelvin

0.001

7 AR IF 2R 0.001

7 AR IF 2L

TIME (HOURS)

05 00 30 06 00 30 07 00

0.001