Gain amp vs UTC time for ed018c.MSORT.1 CL 2 Rpol & Lpol IF 1 - 2

Plot file version 1 created 12-FEB-2004 11:12:07

1 EF IF 1R 5.0 4.9 4.8 4.7 1 EF IF 1L 4.8 4.7 4.6 1 EF IF 2R 4.9 4.8 4.7 1 EF IF 2L 4.8 4.7 4.6 2 JB IF 1R 148 146 144 142 140 138 2 JB IF 1L

Gain

136 135 134 133 2 JB IF 2R 135 130 125 2 JB IF 2L 135 130 125 120 3 CM IF 1R

22.370 22.365 22.360 22.355

3 CM IF 1L

TIME (HOURS)

07 00 10 20 30 40 50 08 00

22.370 22.365 22.360 22.355

Gain amp vs UTC time for ed018c.MSORT.1 CL 2 Rpol & Lpol IF 1 - 2

Plot file version 2 created 12-FEB-2004 11:12:07

3 CM IF 2R

22.370 22.365 22.360 22.355

3 CM IF 2L

22.370 22.365 22.360 22.355

5 ON IF 1R

42.5 42.0 41.5

5 ON IF 1L

45.5 45.0 44.5 44.0 43.5 5 ON IF 2R

42.5 42.0 41.5

5 ON IF 2L

Gain

46 45 44 6 TR IF 1R 30 25 20 6 TR IF 1L 120 100 80 6 TR IF 2R 30 25 20 6 TR IF 2L

TIME (HOURS)

07 00 10 20 30 40 50 08 00

120 100 80

Gain amp vs UTC time for ed018c.MSORT.1 CL 2 Rpol & Lpol IF 1 - 2

Plot file version 3 created 12-FEB-2004 11:12:07

7 AR IF 1R

3.010 3.005 3.000 2.995

7 AR IF 1L

3.010 3.005 3.000 2.995

7 AR IF 2R

3.010 3.005 3.000 2.995

7 AR IF 2L

Gain

TIME (HOURS)

07 00 10 20 30 40 50 08 00

3.010 3.005 3.000 2.995