Center at RA 20 23 19.01735 DEC 31 53 02.3059

CONT: J2023+31 IPOL 6033.345 MHZ J2023+3153.IIM001.1

PLot file version 1 created 12-FEB-2004 11:12:45

Cont peak flux = 4.3462E-01 JY/BEAM Levs = 4.346E-01 * (-0.174, 0.174, 0.348, 0.697)

MilliARC SEC

MilliARC SEC

100 50 0 -50 -100

100

80

60

40

20

0

-20

-40

-60

-80

-100