Plot file version 1 created 12-FEB-2004 11:13:32 V vs U for J2023+3153.MULTI.1 Source:J2023+3153 Ants * - * Stokes I IF# 1 - 2 Chan# 1

Freq = 6.0310 GHz, Bw = 0.500 MHz

Mega Wavlngth

Mega Wavlngth

-100 -50 0 50 100

100

50

0

-50

-100