Gain amp vs UTC time for J1850+2825.MULTI.1 SN 2 Rpol & Lpol IF 1 - 2

Plot file version 1 created 18-FEB-2004 15:19:40

1 EF IF 1R 755 750 745 740 1 EF IF 1L 775 770 765 760 755 1 EF IF 2R

1190 1180 1170 1160

1 EF IF 2L 850 840 830 2 JB IF 1R 805 800 795 790 785 2 JB IF 1L

MilliGain

750 740 730 2 JB IF 2R 770 760 750 3 CM IF 1R 835 830 825 3 CM IF 1L 865 860 855 850 845 3 CM IF 2R

TIME (HOURS)

05 08 30 09 00 30 10 00 30

820 800 780 760

Gain amp vs UTC time for J1850+2825.MULTI.1 SN 2 Rpol & Lpol IF 1 - 2

Plot file version 2 created 18-FEB-2004 15:19:40

3 CM IF 2L

1000 980 960 940 920 5 ON IF 1R 740 720 700 5 ON IF 1L 760 750 740 5 ON IF 2R 930 920 910 5 ON IF 2L

1050 1000 950 7 AR IF 2R

MilliGain

1085 1080 1075 1070

7 AR IF 2L

TIME (HOURS)

05 08 30 09 00 30 10 00 30

1000 995 990 985