Center at RA 18 50 27.58981 DEC 28 25 13.1556

CONT: J1850+28 IPOL 6032.125 MHZ J1850+2825.ICL001.5

PLot file version 1 created 18-FEB-2004 15:20:11

Cont peak flux = 4.0901E-01 JY/BEAM Levs = 4.090E-01 * (-0.065, 0.065, 0.130, 0.261, 0.521)

MilliARC SEC

MilliARC SEC

100 50 0 -50 -100

100

80

60

40

20

0

-20

-40

-60

-80

-100