Center at RA 19 25 59.60537 DEC 21 06 26.1622

CONT: J1925+21 IPOL 6032.125 MHZ J1925+2106.ICL001.5

PLot file version 1 created 18-FEB-2004 15:20:07

Cont peak flux = 9.4598E-01 JY/BEAM Levs = 9.460E-01 * (-0.051, 0.051, 0.102, 0.204, 0.408, 0.817)

MilliARC SEC

MilliARC SEC

100 50 0 -50 -100

100

80

60

40

20

0

-20

-40

-60

-80

-100