Gain amp vs UTC time for 3C395.MULTI.1 SN 2 Rpol & Lpol IF 1 - 2

Plot file version 1 created 18-FEB-2004 10:35:53

1 EF IF 1R

1.10

1.05

1.00

1 EF IF 1L

0.88 0.86 0.84

1 EF IF 2R

1.16

1.14

1.12 1 EF IF 2L

0.960 0.955 0.950

2 JB IF 1R

1.05 1.00 0.95 0.90

2 JB IF 1L

Gain

1.135 1.130 1.125

2 JB IF 2R

0.795 0.790 0.785 0.780 3 CM IF 1R

0.605 0.600 0.595 0.590 3 CM IF 1L

0.715 0.710 0.705 0.700 3 CM IF 2R

TIME (HOURS)

06 47 30 48 00 30 49 00 30 50 00

0.830 0.825 0.820 0.815

Gain amp vs UTC time for 3C395.MULTI.1 SN 2 Rpol & Lpol IF 1 - 2

Plot file version 2 created 18-FEB-2004 10:35:53

3 CM IF 2L

0.970 0.965 0.960 0.955 5 ON IF 1R

0.95

0.90

0.85

5 ON IF 1L

1.20

1.15

1.10

5 ON IF 2R

0.808 0.806 0.804 0.802 0.800 0.798

5 ON IF 2L

1.05 1.00 0.95 0.90

6 TR IF 1R

Gain

3.0 2.8 2.6 2.4 2.2 6 TR IF 1L

0.64 0.62 0.60 0.58 0.56

6 TR IF 2R

1.46

1.44

1.42

6 TR IF 2L

0.36

0.35

0.34

7 AR IF 2R

TIME (HOURS)

06 47 30 48 00 30 49 00 30 50 00

1.06

1.05

1.04

Gain amp vs UTC time for 3C395.MULTI.1 SN 2 Rpol & Lpol IF 1 - 2

Plot file version 3 created 18-FEB-2004 10:35:53

7 AR IF 2L

Gain

TIME (HOURS)

06 47 30 48 00 30 49 00 30 50 00

0.92 0.90 0.88