Tsys vs UTC time for ed018d_2.MSORT.1 TY 1 Rpol & Lpol IF 1 - 2

Plot file version 1 created 18-FEB-2004 10:34:34

1 EF IF 1R 45 40 35 1 EF IF 1L 42 40 38 36 34 32 1 EF IF 2R 42 40 38 36 34 32 1 EF IF 2L 40 35 30 2 JB IF 1R 180 170 160 150 2 JB IF 1L

Kelvin

166 164 162 160 2 JB IF 2R 170 160 150 2 JB IF 2L 164 162 160 3 CM IF 1R

1.005 1.000 0.995

3 CM IF 1L

TIME (HOURS)

06 40 50 07 00 10 20 30 40 50 08 00

1.005 1.000 0.995

Tsys vs UTC time for ed018d_2.MSORT.1 TY 1 Rpol & Lpol IF 1 - 2

Plot file version 2 created 18-FEB-2004 10:34:34

3 CM IF 2R

1.005 1.000 0.995

3 CM IF 2L

1.005 1.000 0.995

4 MC IF 1R 130 120 110 4 MC IF 1L 135 130 125 120 115 4 MC IF 2R 125 120 115 110 4 MC IF 2L

Kelvin

130 120 110 5 ON IF 1R 104 102 100 98 5 ON IF 1L 125 120 115 110 5 ON IF 2R 106 104 102 100 5 ON IF 2L

TIME (HOURS)

06 40 50 07 00 10 20 30 40 50 08 00

125 120 115

Tsys vs UTC time for ed018d_2.MSORT.1 TY 1 Rpol & Lpol IF 1 - 2

Plot file version 3 created 18-FEB-2004 10:34:34

6 TR IF 1R 180 160 140 120 6 TR IF 1L 240 230 220 210 6 TR IF 2R 170 160 150 140 6 TR IF 2L 280 260 240 7 AR IF 1R

1.005 1.000 0.995

7 AR IF 1L

Kelvin

1.005 1.000 0.995

7 AR IF 2R

1.005 1.000 0.995

7 AR IF 2L

TIME (HOURS)

06 40 50 07 00 10 20 30 40 50 08 00

1.005 1.000 0.995