Tsys vs UTC time for ed023_1.MSORT.1 TY 1 Rpol IF 1

Plot file version 3 created 12-AUG-2003 10:09:49

3R MC 220 210 200 190 4R CM

1.005 1.000 0.995

6R MH 135 130 125 120 8R SH

Kelvin

TIME (HOURS)

09 00 10 20 30 40 50

181 180 179 178

Tsys vs UTC time for ed023_1.MSORT.1 TY 1 Lpol IF 1

Plot file version 4 created 12-AUG-2003 10:09:50

3L MC 210 200 190 180 4L CM

1.005 1.000 0.995

5L ON 140 138 136 6L MH 100 95 90 7L UR

320300 280260 240220

8L SH

Kelvin

TIME (HOURS)

09 00 10 20 30 40 50

181 180 179 178